Frontiers in Neurology

Front Neurol. 9: 414

Incidence, Risk Factors and Consequences of Epilepsy-Related Injuries and Accidents: A Retrospective, Single Center Study

Laurent M. Willems¹*, Nina Watermann², Saskia Richter², Lara Kay¹, Anke M. Hermsen¹, Susanne Knake², Felix Rosenow¹², Adam Strzelczyk¹²

¹Department of Neurology, Epilepsy Center Frankfurt Rhine-Main, Goethe University Frankfurt, Frankfurt, Germany

²Department of Neurology, Epilepsy Center Hessen, Philipps University of Marburg, Marburg, Germany

Edited by: Fernando Cendes, Universidade Estadual de Campinas, Brazil

Reviewed by: Dieter Schmidt, Epilepsy Research Group, Germany; Martin Holtkamp, Charité Universitätsmedizin Berlin, Germany

*Correspondence: Laurent M. Willems laurent.willems@kgu.de

This article was submitted to Epilepsy, a section of the journal Frontiers in Neurology

Copyright © 2018 Willems, Watermann, Richter, Kay, Hermsen, Knake, Rosenow and Strzelczyk.

DOI: 10.3389/fneur.2018.00414

Published online: 15 June 2018

Abstract

Introduction: This study was designed to evaluate risk factors and incidence of epilepsy-related injuries and accidents (ERIA) at an outpatient clinic of a German epilepsy center providing healthcare to a mixed urban and rural population of over one million inhabitants.

Methods: Data acquisition was performed between 10/2013 and 09/2014 using a validated patient questionnaire on socioeconomic status, course of epilepsy, quality of life (QoL), depression, injuries and accidents associated with seizures or inadequate periictal patterns of behavior concerning a period of 3 months. Univariate analysis, multiple testing and regression analysis were performed to identify possible variables associated with ERIA.

Results: A total of 292 patients (mean age 40.8 years, range 18–86; 55% female) were enrolled and analyzed. Focal epilepsy was diagnosed in 75% of the patients. The majority was on an antiepileptic drug (AEDs) polytherapy (mean number of AEDs: 1.65). Overall, 41 patients (14.0%) suffered from epilepsy-related injuries and accidents in a 3-month period. Besides lacerations (n = 18, 6.2%), abrasions and bruises (n = 9, 3.1%), fractures (n = 6, 2.2%) and burns (n = 3, 1.0%), 17 mild injuries (5.8%) were reported. In 20 (6.8% of the total cohort) cases, urgent medical treatment with hospitalization was necessary. Epilepsy-related injuries and accidents were related to active epilepsy, occurrence of generalized tonic-clonic seizures (GTCS) and drug-refractory course as well as reported ictal falls, ictal loss of consciousness and abnormal peri-ictal behavior in the medical history. In addition, patients with ERIA had significantly higher depression rates and lower QoL.

Conclusion: ERIA and their consequences should be given more attention and standardized assessment for ERIA should be performed in every outpatient visit.

Introduction

Epilepsy is a common and chronic neurological disorder that affects about 39 million people worldwide (1, 2). People with epilepsy are subject to social and vocational stigma, have only restricted access to the labor market and significantly reduced employment opportunities (3). Moreover, quality of life (QoL) is significantly reduced for themselves and their caregivers (4–9). Active epilepsy with persisting seizures is associated with loss of consciousness, uncontrolled movements, falls or periictal abnormal behavior may predispose to accidents and injuries such as burns, contusions, lacerations or fractures (10–12).

A prospective longitudinal analysis from Finland on 245 children with epilepsy since 1964 showed a significantly increased age- and sex-adjusted mortality. During the 40-year follow up, 60 (24%) subjects died and 33 (55%) of these events were attributed to the underlying epilepsy. Besides sudden unexpected death in epilepsy (SUDEP) and status epilepticus, epilepsy-related injuries and accidents (ERIA), such as peri-ictal drowning, were common causes of death. Within this cohort, pneumonia, cardiovascular diseases and suicide have been reported as most frequent causes of death not related to seizures or epilepsy (13–15). ERIA were shown to be a major cost factor for hospitalizations among patients with epilepsy (16). One major problem with ERIA is unreported cases in daily practice. If not investigated in detail, it can be assumed that approximately 50% of ERIA are falsely not documented as seizure-related in medical documentation (17).

The main aim of our study was to assess the frequency and types of ERIA in a cohort of consecutive patients with epilepsy using a validated questionnaire (18) and to search for variables associated with ERIA. Improved screening parameters for ERIA may help in reducing the frequency and severity of ERIA. A second aim was to assess QoL and depression as possible consequences of ERIA.

Patients and methods

Study settings, patients and design

This study was performed as a survey at the epilepsy outpatient clinic of the University Hospital Marburg. The University Hospital Marburg is a large multispecialty tertiary care hospital in the center of Germany that provides healthcare to a population of over 1,000,000 inhabitants. Marburg is located within the postal code area 35, which was used previously for a population-based estimation of the incidence of status epilepticus and different cost-of-illness studies (3, 19–21). After receiving written informed consent, all adult epilepsy patients aged 18 years or older were eligible. Socioeconomic data and information on injuries or accidents as well as on QoL were accessed between 10/2013 and 09/2014 using a validated questionnaire (18). Patients were asked to complete the questionnaire concerning their individual epilepsy related experiences during the last 3 months. The diagnosis was based on the definitions proposed by the International League Against Epilepsy and the International Bureau for Epilepsy (22) and was provided by the treating physician. Any patient with at least one seizure during the last 12 months at enrolment was classified as having an “active epilepsy.” Patients were excluded when the diagnosis of epilepsy could not be determined without doubt. The study had the approval of the local ethics committee.

Variables associated with epilepsy-related injuries and accidents

Specification of epilepsy syndromes as well as information regarding intake of AEDs was assessed by the attending physician. The following factors were identified as possible parameters influencing injuries or accidents in patients with epilepsy according to published literature (18): patient age, duration of epilepsy, sex, epilepsy syndrome, postictal patterns of behavior as well as seizure frequency and semiology (loss of consciousness, nocturnal seizures). Abnormal postictal behavior patterns were classified in line with the guidelines of the German employers' liability insurance association (Unfallversicherung, DGUV 250-001), which classifies seizures with abnormal postictal behavior as “high risk” for related injuries or accidents at work (23). Refractory epilepsy was classified according to ILAE definitions (24). Moreover, different sociodemographic and clinical characteristics were documented.

Changes in mood and quality of life due to ERIA

To evaluate the psychological aspects of ERIA, various established neuropsychological inventories were assessed using already established questionnaires: To measure health related QoL, the QOLIE31 score (Quality of Life in Epilepsy Inventory) (25) and EQ5D score (Euro Quality of Life) were used (26). For EQ5D, both relevant parameters, i.e., overall TTO (time trade-off) and VAS (visual analog scale), were determined (26). To evaluate health-related depression, NDDI-E (Neurological Disorders Depression Inventory for Epilepsy) (27) and BDI-II (Becks Depression Inventory) were used (28). As an independent parameter, ABNAS (A-B Neuropsychological Assessment Schedule) was assessed (29). Liverpool Adverse Events Profile (LAEP) was measured to detect AED-specific aspects in QoL (30, 31).

Data entry and statistical analysis

Data entry and analysis were performed using the File Maker Pro 8.5 database (Filemaker Inc., Santa Clara, CA, USA). A double-entry procedure was employed to assure a high level of data accuracy. Statistical analyses were performed using IBM SPSS Statistics 22 (IBM Corporation, Armonk, NY, USA). For the calculation of variables that potentially influence injuries and accidents in patients with active epilepsy, a chi-square test following Pearson and Benjamini-Hochberg-Adjustment was used to exclude multiple testing bias (32, 33). In addition, regression analysis was performed. P-values < 0.05 were considered as significant.

Results

Sociodemographic and clinical characteristics

We enrolled 292 patients with epilepsy and a mean age of 40.8 years (SD ± 15.6; range 18–86 years). Gender ratio was nearly balanced with 55% female patients. Two-thirds of patients (67.8%) had an active epilepsy with at least one seizure within the last 12 months. The majority of 75% (n = 219) suffered from focal epilepsy (FE), 19.5% (n = 57) from an idiopathic generalized epilepsy (IGE) and, in 5.5%, the epilepsy syndrome was reported as unclassified; details are presented in Table 1. Between the two cohorts with IGE or FE, there were no significant differences in gender distribution, number of AED or seizure freedom. The mean age in the IGE cohort was significantly younger. Detailed information of sociodemographic and clinical characteristics for all patients and the FE and IGE cohorts are displayed in Table 2.

See full tableTable 1. Epilepsy syndromes within the cohort.

See full tableTable 2. Sociodemographic and clinical characteristics of the entire cohort and for patients with focal and idiopathic generalized epilepsies.

The five most frequently prescribed AEDs were levetiracetam (LEV, 53.1%), lamotrigine (LTG, 35.6%) and valproate (VPA, 16.1%) followed by carbamazepine (CBZ) and lacosamide (LCM) (each 11.6%). A wide variability of newer AEDs (second and third generation) were used, while 28.8% of prescribed AEDs were so called “old” substances like VPA, CBZ, phenobarbital (PB) and phenytoine (PHT). Only 13.7% of the AEDs had enzyme-inducing properties (i.e., CBZ, PB, primidone, PHT). For a more detailed listing, please refer to Table 3.

See full tableTable 3. Prescription pattern of anticonvulsant drugs within the cohort.

Clinical characteristics of patients with epilepsy-related injuries and accidents

In total, 41 patients (14.0%) suffered from epilepsy-related injuries and accidents (ERIA) within the 3-month observation period. Of these, 20 patients (6.8% of total cohort) required hospitalization. Out of a total of 292 patients, two independent injuries were reported in two cases and one patient suffered from three independent injuries. Besides lacerations (n = 18, 6.2%), abrasions and bruises (n = 9, 3.2%), fractures (n = 6, 2.1%) and burns (n = 3, 1.0%), 17 other mild injuries (5.8%) were reported. Among the patients with injuries, 48.8% were male, the mean age was 39.2 years (SD ± 14.1, range 18–67 years). Mean disease duration in patients with ERIA was 14.7 years (SD ± 15.2, range 0.1–40 years). Only one patient in this group reported no AED therapy, 14 participants (14/41; 34.2%) were under anticonvulsant monotherapy, 26 reported taking two or more AEDs (63.4%), and the mean number of AEDs was 2.0 (SD 1.0, range 0–4). The majority of seizure-related injuries was observed in patients suffering from generalized tonic-clonic seizures (n = 24, 58.5%, i.e., bilateral tonic-clonic seizures). Another 14 patients (34.2%) reported predominantly simple partial seizures (SPS, i.e., focal seizures with preserved awareness) or complex partial seizures (CPS, i.e., focal onset seizures with impaired awareness); in three cases (7.3%), the habitual seizure type was not stated. In nearly all cases (40 of 41 patients, 97.6%) suffering from ERIA, certain semiological features were reported. Most of the injured patients reported ictal loss of consciousness (n = 39, 95.1%) or ictal falls (n = 36, 87.8%) or both (n = 35, 85.4%). Isolated peri-ictal abnormal behavior (n = 14, 34.2%) was less often seen in patients with ERIA, but several patients reported periictal abnormal behavior in association with ictal falls and ictal loss of consciousness (n = 12, 29.3%). Only two patients with ERIA reported to suffer from sleep-bound seizures only (4.9%). For a detailed list of all patients that reported ERIA see Table 4.

See full tableTable 4. Overview of patients with epilepsy-related injuries and accidents (ERIA, n = 41).

Variables associated with epilepsy-related injuries and accidents

Reported sociodemographic and clinical characteristics were analyzed as potential variables associated with ERIA. Comparing patients with (n = 41, 14.0%) to patients without (n = 251, 86.0%) ERIA, we identified an active epilepsy (p < 0.001), regular GTCS (p < 0.001) and a refractory course of disease (p = 0.005) as variables associated with ERIA using a univariate analysis. Moreover, ictal falls (p = 0.012), ictal loss of consciousness (p = 0.022) and inadequate postictal behavior (p = 0.017) were significantly increased in patients suffering ERIA. After post hoc multivariate analysis all reported parameters remained significant. No difference was determined for patient age, duration of epilepsy, gender, epilepsy syndrome or sleep-related seizures in our cohort; for details please refer to Table 5. Multiple regression analysis revealed a strong positive correlation of ERIA with active epilepsy (p = 0.006, B = 0.140), all other tested characteristics (i.e., age, sex, disease duration, seizure semiology, epilepsy syndrome, refractive epilepsy) did not reach levels of significance.

See full tableTable 5. Frequency and clinical characteristics of patients with epilepsy-related injuries and accidents (ntotal = 292, nERIA = 41).

Epilepsy-related injuries and accidents are accompanied by a decreased quality of life (QoL)

People suffering from ERIA reported significantly more symptoms indicative of a manifest depression (BDI ≥ 14 [p = 0.021], NDDIE ≥ 13 [p = 0.002]). Patients with ERIA (overall T 38.9 ± 9.0) had a significant lower (QoL) compared to patients without ERIA (overall T 49.2 ± 10.4 [p < 0.001]) in QOLIE-31. Regarding each single item of the QOLIE-31 inventory, patients with ERIA showed a significantly increased seizure worry (p ≤ 0.001) and decreased overall QoL (p < 0.001), emotional well-being (p = 0.001) and energy level (p = 0.019) as well as cognitive (p < 0.001) and social functions (p < 0.001). Medication effects did not reach any level of significance in QOLIE-31 (p = 0.68), even if the results for Liverpool Adverse Events Profile (LEAP) were significantly different between patients with and without ERIA (p = 0.006). Similar results for QoL were obtained in EQ5D Score [VAS (visual analog scale) 56.0 ±19.1 vs. 68.4 ±18.7, p < 0.001]. In addition, ABNAS showed a significant distinction between patients with (22.2 ± 15.7) and without ERIA (35.8 ± 17.9, p < 0.001). After post hoc multivariate analysis all reported parameters remained significant. For a detailed statistical analysis of QoL and depression scores please refer to Table 6.

See full tableTable 6. Changes in mood and quality of life due to epilepsy-related injuries and accidents (ntotal = 292, nERIA = 41).

Discussion

This study analyzed in detail a cohort of epilepsy patients in Germany showing the high burden imposed on patients due to ERIA. In addition, patients with ERIA showed a decreased QoL and increased depression rates. Our results are in line with other studies on ERIA, showing that number and frequency of injuries and accidents are significantly increased in epilepsy patients compared to matched controls. However, there are certain limitations of the study design (e.g., a missing epidemiologic approach) that may display limitations of the acquired data and findings. The finding that most enrolled patients had focal and active epilepsy may also affect the comparability with other studies.

In a large database study published in 2010, 8,890 subjects with epilepsy were analyzed, resulting in a 1-year incidence of one or more injuries in 20.6% of patients with and 16.1% of patients without epilepsy (p < 0.001) (34). Active epilepsy and refractory course of disease, as demonstrated in our cohort, are variables associated with ERIA. Within the 3-month observation period, 41 of 292 patients (14.0%) reported ERIA. The most common symptoms were lacerations (n = 18, 6.2%) followed by abrasions and bruises (n = 9, 3.1%), fractures (n = 6, 2.1%) and burns (n = 3, 1.0%). In 20 cases, urgent medical treatment and hospitalization was necessary. These results are well in line with previously published data on ERIA from a pilot study from 2008 among our outpatients (18, 35) and other international publications reporting ERIA in children, adolescents and adults with epilepsy in Nigeria, the United States, Australia and the UK (34, 36–41). In addition, a study reporting on 52 patients with refractory focal epilepsy led to comparable results with epilepsy-related injuries in 21% of cases with TLE and 8% with other focal epilepsies within a mean disease duration of 22 and 17 years. Lifetime prevalence of ERIA was estimated to 57%. Moreover, this study reported that only 45% of ERIA in general, and especially severe ones, had been documented (17). This is in contrast to another study with 247 enrolled patients showing a rather low frequency for ERIA of 1 per 44 patient years and which claimed a minor severity for the most reported cases (41).

Another prospective study analyzed ERIA using a control group of healthy relatives, showing that epilepsy patients have a 21% higher likelihood to harm themselves over a 1–2 year observation period, however, mainly mild and trivial injuries were reported (42). In children aged 2–16 years, ERIA were reported in 4.7% (43) and children with epilepsy were shown to have a 18–23% increased risk of fracture, a 49% increased risk of thermal injury and more than twice the risk of poisoning from medicinal products (39). Differences between the mentioned studies are probably due to diverging study designs (prospective vs. retrospective), different cohort characteristics and may be influenced by local factors as well as awareness and ascertainment issues. ERIA are commonly underreported and there is a high estimated number of underreported cases (17). The high frequency of ERIA in our study can be attributed to the targeted questions and precise documentation reducing underascertainment.

The vast majority of patients reporting ERIA (96.0%) presented specific ictal features and we were able to identify a significant correlation between ERIA with epilepsy characteristics and semiological aspects. Variables associated with ERIA were active epilepsy, drug-refractory course as well as reported ictal falls and ictal loss of consciousness or abnormal peri-ictal behavior in the medical history. These findings are similar to the results of past studies (18). Moreover, the presence of GTCS was significantly associated with ERIA, which is in line with previous studies, in which over 80% of ERIA occurred during GTCS (41). Additionally, we were able to show a significant coherence between ERIA and abnormal peri-ictal behavior, which was previously controversially discussed (18). Patients with frequent and prolonged ictal auras seem to be at lower risk, which is probably based on the possibility of informing bystanders, calling for help and creating a secure surrounding. As another high-risk subgroup, individuals with active epilepsy could be identified. There was no significant difference in the occurrence of ERIA between patients with FE or IGE, which is surprising because of the common presence of GTCS in patients with IGE. Overall, 75% of IGE patients presented with GTCS compared to 51% with FE in an ERIA cohort (40).

A second focus of our study was to assess QoL and depression as possible consequence of ERIA using a battery of neuropsychological inventories (BDI-II, NDDIE, EQ5D, QOLIE-31, ABNAS, and LEAP) that have been already established and validated in patients with epilepsy (25–29). Subjects reporting ERIA showed significantly increased depression rates and had a lower QoL, which has not been reported so far. The association of lower QoL and a trend to depression with drug-refractory epilepsy has been already shown (12, 27, 28, 31, 44, 45) and ERIA might be associated or rather aggravate these aspects. However, this study was not designed to further analyse and correlate these aspects. Also, adverse effects due to AEDs were significantly higher in patients with ERIA.

The most practical solution to injury prevention is a better seizure control (40, 41). However, this may not be achieved, especially in patients with drug-refractory epilepsies who have been shown to be a high-risk group for ERIA. Therefore, another focus should aim at reducing the risk for ERIA. We propose a prophylactic pathway focusing on three major aspects: (1) identifying high risk patients by a standardized assessment of ERIA, (2) optimising antiepileptic therapy, and (3) developing individual safety assessments to reduce the future risk of ERIA (see Table 7). Individual safety assessments may contain information and education on the risks and consequences of ERIA, possibilities to avoid injuries (behavior, early detection) and suggestions for auxiliary means (helmets, hip protectors, in-house emergency calls, wearables). Even if the majority of epilepsy-related injuries and accidents occur at home (88%) and not in a public space (10%), a professional and epilepsy-specific assessment of the actual or aspired profession and the concomitant work environment seems to be unavoidable, hence, the fact that only 2% of epilepsy-related injuries and accidents occur at work (46, 47).

See full tableTable 7. Standardized assessment and management of variables associated with ERIA.

Conclusion

ERIA, as well as their clinical consequences, are an underreported but highly relevant aspect in the treatment of patients with active epilepsy. Moreover, ERIA might be associated or rather aggravate neuropsychological symptoms such as depression or decreased QOL in this severely affected subgroup of patients with epilepsy. However, ERIA are only sporadically considered in the development of tailored anti-epileptic therapies. More effort should be spent on the identification and assessment of ERIA or patients at risk as well as on prevention and general education on this topic to increase patient safety, satisfaction and QoL.

Author contributions

LW and AS generated the research idea, study design, and concept. NW, SR, and AS acquired the data. LW and AS analyzed the data and drafted the work. LW, NW, SR, LK, AH, SK, FR, and AS made critical revisions for important intellectual content and interpreted the data. LW and AS wrote the manuscript. LW, NW, SR, LK, AH, SK, FR, and AS approved the final manuscript.

Conflict of interest statement

SK reports personal fees from Desitin, Eisai, UCB, as well as support for scientific meetings from AD-tech, Desitin, Eisai, GW pharma, LivaNova, Nihon Kohden and Novartis outside the submitted work. FR reports personal fees from Eisai, grants and personal fees from UCB, grants and personal fees from Desitin Arzneimittel, personal fees and other from Novartis, personal fees from Medronic, personal fees from Cerbomed, personal fees from ViroPharma and Shire, grants from European Union, grants from Deutsche Forschungsgemeinschaft, outside the submitted work. AS reports personal fees and grants from Desitin Arzneimittel, Eisai, LivaNova, Sage Therapeutics, UCB Pharma and Zogenix, outside the submitted work. The remaining authors declare that the research was conducted in the absence of any commercial or financial relationships that could be construed as a potential conflict of interest.

Acknowledgments

We are grateful to the patients participating in this study and to our colleagues for their assistance in conducting this study.

Articles from Frontiers in Neurology are provided here courtesy of Frontiers Media SA

PMC Copyright Notice

The articles available from the PMC site are protected by copyright, even though access is free. Copyright is held by the respective authors or publishers who provide these articles to PMC. Users of PMC are responsible for complying with the terms and conditions defined by the copyright holder.

Users should assume that standard copyright protection applies to articles in PMC, unless an article contains an explicit license statement that gives a user additional reuse or redistribution rights. PMC does not allow automated/bulk downloading of articles that have standard copyright protection.

See the copyright notice on the PMC site, https://www.ncbi.nlm.nih.gov/pmc/about/copyright/, for further details and specific exceptions.

References

GBD 2015 Disease and Injury Incidence and Prevalence Collaborators. Global, regional, and national incidence, prevalence, and years lived with disability for 310 diseases and injuries, 1990-2015: a systematic analysis for the Global Burden of Disease Study 2015. Lancet (2016) 388:1545–602. 10.1016/S0140-6736(16)31678-627733282

A StrzelczykJP ReeseR DodelHM Hamer. Cost of epilepsy: a systematic review. Pharmacoeconomics (2008) 26:463–76. 10.2165/00019053-200826060-0000218489198

LM WillemsS RichterN WatermannS BauerKM KleinJP Reese. Trends in resource utilization and prescription of anticonvulsants for patients with active epilepsy in Germany from 2003 to 2013 - a ten-year overview. Epilepsy Behav. (2018) 83:28–35. 10.1016/j.yebeh.2018.03.02529649671

I ForsgrenE BeghiM Ekman. Cost of epilepsy in Europe. Eur J Neurol. (2005) 12(Suppl. 1):54–8. 10.1111/j.1468-1331.2005.01191.x15877780

VMJ SmeetsBAG van LieropJPG VanhoutvinAP AldenkampFJN Nijhuis. Epilepsy and employment: literature review. Epilepsy Behav. (2007) 10:354–62. 10.1016/j.yebeh.2007.02.00617369102

A HaagA StrzelczykS BauerS KuhneHM HamerF Rosenow. Quality of life and employment status are correlated with antiepileptic monotherapy versus polytherapy and not with use of “newer” versus “classic” drugs: Results of the “Compliant 2006” survey in 907 patients. Epilepsy Behav. (2010) 19:618–22. 10.1016/j.yebeh.2010.09.03721115406

A Jacoby. Stigma, epilepsy, and quality of life. Epilepsy Behav. (2002) 3:S10–20. 10.1016/S1525-5050(02)00545-012609301

SL HelmersR KobauM SajatovicBC JobstM PriviteraO Devinsky. Self-management in epilepsy: Why and how you should incorporate self-management in your practice. Epilepsy Behav. (2017) 68:220–4. 10.1016/j.yebeh.2016.11.01528202408

L JehiG TesarN ObuchowskiE NovakI Najm. Quality of life in 1931 adult patients with epilepsy: seizures do not tell the whole story. Epilepsy Behav. (2011) 22:723–7. 10.1016/j.yebeh.2011.08.03922019018

D BuckGA BakerA JacobyDF SmithDW Chadwick. Patients' experiences of injury as a result of epilepsy. Epilepsia (1997) 38:439–44. 9118849

EC Wirrell. Epilepsy-related injuries. Epilepsia (2006) 47(Suppl. 1):79–86. 10.1111/j.1528-1167.2006.00666.x17044832

A StrzelczykC GriebelW LuxF RosenowJP Reese. The burden of severely drug-refractory epilepsy: a comparative longitudinal evaluation of mortality, morbidity, resource use and cost using German Health insurance data. Front Neurol. (2017) 8:712. 10.3389/fneur.2017.0071229312132

L NashefEL SoP RyvlinT Tomson. Unifying the definitions of sudden unexpected death in epilepsy. Epilepsia (2012) 53:227–33. 10.1111/j.1528-1167.2011.03358.x22191982

JF Annegers. United States perspective on definitions and classifications. Epilepsia (1997) 38:S9–12. 10.1111/j.1528-1157.1997.tb06137.x19909336

M SillanpaaS Shinnar. Long-term mortality in childhood-onset epilepsy. N Engl J Med. (2010) 363:2522–9. 10.1056/NEJMoa091161021175314

A StrzelczykT NickolayS BauerA HaagS KnakeWH Oertel. Evaluation of health-care utilization among adult patients with epilepsy in Germany. Epilepsy Behav. (2012) 23:451–7. 10.1016/j.yebeh.2012.01.02122381385

DE FriedmanFG Gilliam. Seizure-related injuries are underreported in pharmacoresistant localization-related epilepsy. Epilepsia (2010) 51:43–7. 10.1111/j.1528-1167.2009.02170.x19519796

A StrzelczykA HermsenWH OertelS KnakeF RosenowHM Hamer Risk factors and incidence of epilepsy-related injuries an accidents. Nervenheilkunde (2014) 2014:331–4. 10.4081/ni.2009.e20

LM KortlandA AlfterO BahrB CarlR DodelTM Freiman. Costs and cost-driving factors for acute treatment of adults with status epilepticus: a multicenter cohort study from Germany. Epilepsia (2016) 57:2056–66. 27753082

J RiechmannA StrzelczykJP ReeseR BoorU StephaniC Langner. Costs of epilepsy and cost-driving factors in children, adolescents, and their caregivers in Germany. Epilepsia (2015) 56:1388–97. 10.1111/epi.1358426235849

A StrzelczykA HaagJP ReeseT NickolayWH OertelR Dodel. Trends in resource utilization and prescription of anticonvulsants for patients with active epilepsy in Germany. Epilepsy Behav. (2013) 27:433–8. 10.1016/j.yebeh.2013.03.00723591262

RS FisherJH CrossJA FrenchN HigurashiE HirschFE Jansen. Operational classification of seizure types by the International League Against Epilepsy: Position Paper of the ILAE Commission for Classification and Terminology. Epilepsia (2017) 58:522–30. 10.1111/epi.1367028276060

Deutsche Gesetzliche Unfallversicherung e.V. (DGUV) DGUV Information 250-001: Berufliche Beurteilung bei Epilepsie und nach erstem epileptischen Anfall. Berlin: Ausschuss Arbeitsmedizin der Gesetzlichen Unfallversicherung (2015).

P KwanA ArzimanoglouAT BergMJ BrodieW Allen HauserG Mathern. Definition of drug resistant epilepsy: consensus proposal by the ad hoc task force of the ILAE Commission on therapeutic strategies. Epilepsia (2010) 51:1069–77. 10.1111/j.1528-1167.2009.02397.x19889013

TW MayM PfafflinJA Cramer. Psychometric properties of the german translation of the QOLIE-31. Epilepsy Behav. (2001) 2:106–14. 10.1006/ebeh.2001.017012609192

R RabinF de Charro. EQ-5D: a measure of health status from the EuroQol Group. Ann Med. (2001) 33:337–43. 10.3109/0785389010900208711491192

B MetternichK WagnerF BuschmannR AngerA Schulze-Bonhage. Validation of a German version of the neurological disorders depression inventory for Epilepsy (NDDI-E). Epilepsy Behav. (2012) 25:485–8. 10.1016/j.yebeh.2012.10.00423153711

GN de OliveiraJM LessaAP GoncalvesEJ PortelaJW SanderAL Teixeira. Screening for depression in people with epilepsy: comparative study among neurological disorders depression inventory for epilepsy (NDDI-E), hospital anxiety and depression scale depression subscale (HADS-D), and Beck depression inventory (BDI). Epilepsy Behav. (2014) 34:50–4. 10.1016/j.yebeh.2014.03.00324681386

SR SamarasekeraC HelmstaedterM Reuber. Cognitive impairment in adults with epilepsy: the relationship between subjective and objective assessments of cognition. Epilepsy Behav. (2015) 52:9–13. 10.1016/j.yebeh.2015.08.01326398591

RJ PanelliC KilpatrickSM MooreZ MatkovicWJ D'SouzaTJ O'Brien. The liverpool adverse events profile: relation to AED use and mood. Epilepsia (2007) 48:456–63. 10.1111/j.1528-1167.2006.00956.x17284301

LM KortlandS KnakeF von PodewilsF RosenowA Strzelczyk. Socioeconomic outcome and quality of life in adults after status epilepticus: a multicenter, longitudinal, matched case-control analysis from Germany. Front Neurol. (2017) 8:507. 10.3389/fneur.2017.0050729018404

Y BenjaminiD DraiG ElmerN KafkafiI Golani. Controlling the false discovery rate in behavior genetics research. Behav Brain Res. (2001) 125:279–84. 10.1016/S0166-4328(01)00297-211682119

Y BenjaminiY Hochberg Controlling the false discovery rate - a practical and powerful approach to multiple testing. J R Stat Soc Ser B-Methodol. (1995) 57:289–300. 10.2307/2346101

CS KwonM LiuH QuanS WiebeJ McChesneyE WirrellL HamiwkaN Jette. The incidence of injuries in persons with and without epilepsy–a population-based study. Epilepsia (2010) 51:2247–53. 10.1111/j.1528-1167.2010.02697.x20726876

A StrzelczykJP ReeseWH OertelR DodelF RosenowHM Hamer Costs of epilepsy and their predictors: Cross-sectional study in Germany and review of literature. Nervenheilkund. Epileptology (2013) 1:55–60. 10.1016/j.epilep.2013.01.004

IA LagunjuAO OyinladeOD Babatunde. Seizure-related injuries in children and adolescents with epilepsy. Epilepsy Behav. (2016) 54:131–4. 10.1016/j.yebeh.2015.11.01926708062

CB BacaBG VickreySD VassarA CookAT Berg. Injuries in adolescents with childhood-onset epilepsy compared with sibling controls. J Pediatr. (2013) 163:1684–91 e4. 10.1016/j.jpeds.2013.07.04624054432

M BellonC WalkerC Peterson. Seizure-related injuries and hospitalizations: self-report data from the 2010 Australian epilepsy longitudinal survey. Epilepsy Behav. (2013) 26:7–10. 10.1016/j.yebeh.2012.10.01923201608

V PrasadD KendrickK SayalSL ThomasJ West. Injury among children and young adults with epilepsy. Pediatrics (2014) 133:827–35. 10.1542/peds.2013-255424733872

C CamfieldP Camfield. Injuries from seizures are a serious, persistent problem in childhood onset epilepsy: a population-based study. Seizure (2015) 27:80–3. 10.1016/j.seizure.2015.02.03125891933

ND LawnWR BamletK RadhakrishnanPC O'BrienEL So. Injuries due to seizures in persons with epilepsy: a population-based study. Neurology (2004) 63:1565–70. 10.1212/01.WNL.0000142991.14507.B515534237

E BeghiC CornaggiaRE Group. Morbidity and accidents in patients with epilepsy: results of a European cohort study. Epilepsia (2002) 43:1076–83. 10.1046/j.1528-1157.2002.18701.x12199734

S SajjanP JainS SharmaA SethS Aneja. Injuries in children with epilepsy: a hospital based study. Indian Pediatr. (2016) 53:883–885. 10.1007/s13312-016-0952-727771668

C CianchettiE BianchiR GuerriniMG BagliettoM BriguglioS Cappelletti. Symptoms of anxiety and depression and family's quality of life in children and adolescents with epilepsy. Epilepsy Behav. (2017) 79:146–53. 10.1016/j.yebeh.2017.11.03029289902

Y XuML HackettN GlozierA NikpourA BleaselE Somerville. Frequency and predictors of psychological distress after a diagnosis of epilepsy: a community-based study. Epilepsy Behav. (2017) 75:190–5. 10.1016/j.yebeh.2017.07.04428881320

R MartinL VogtleF GilliamE Faught. What are the concerns of older adults living with epilepsy? Epilepsy Behav. (2005) 7:297–300. 10.1016/j.yebeh.2005.05.00315996527

J SchulzA BeicherG MayerWH OertelS KnakeF RosenowA Strzelczyk. Counseling and social work for persons with epilepsy: observational study on demand and issues in Hessen, Germany. Epilepsy Behav. (2013) 28:358–62. 10.1016/j.yebeh.2013.05.02723832132

[Back]

Table 1.

Epilepsy syndromes within the cohort.

Epilepsy syndrome (n = 292) | % (n)
Focal epilepsy | 75.0(219)
   TLE | 49.0(143)
   FLE | 10.6(31)
   Other lobes | 5.1(15)
   Multilobar | 4.5(13)
Other/cryptogenic | 5.8(17)
Idiopathic generalized epilepsy | 19.5(57)
   IGE with grand mal on awakening | 0.3(1)
   JME (Janz syndrome) | 4.8(14)
   Juvenile absence epilepsy | 1.7(5)
   Other | 12.7(37)
Unclassified | 5.5(16)

TLE, temporal lobe epilepsy; FLE, frontal lobe epilepsy; IGE, idiopathic generalized epilepsy; JME, juvenile myoclonic epilepsy.

[Back]

[Back]

Table 2.

Sociodemographic and clinical characteristics of the entire cohort and for patients with focal and idiopathic generalized epilepsies.

|  | Total n = 292 | Focal epilepsy n = 219 | IGE n = 57 | p-value
Age in yearsa | 40.8 ± 15.6 | 43.1 ± 15.5 | 31.4 ± 12.5 | <0.001b
|  | Range:18–86 | Range: 18–86 | Range: 18–63 |
Disease duration in yearsa | 14.2 ± 19.8 | 14.3 ± 14.1 | 14.7 ± 13.6 | 0.881b
|  | Range: 0.1–63 | Range: 0.1–63 | Range: 0.1–55 |
Sex
   Male |  | 45.2 (132) | 46.1 (101) | 40.4 (23) | 0.121c,d
   Female |  | 54.9 (160) | 53.9 (118) | 59.7 (34) |
Anticonvulsants | Mean no of AED | 1.6 (±0.8)a | 1.7(±0.8)a | 1.5 (±0.6)a |
|  | % (n) | % (n) | % (n) |
| No AEDs | 1.7 (5) | 0.18 (4) | 0.3 (1) | 0.958c
| Monotherapy | 48.3 (141) | 45.7 (100) | 54.4 (31) |
| 2 AEDs | 34.6 (101) | 34.7 (76) | 38.6 (22) |
| ≥3 AEDs | 15.4 (45) | 17.8 (39) | 7.0 (4) |
Seizures |  | % (n) | % (n) | % (n) |
Seizure freedom >1 year | 32.2 (94) | 29.2 (64) | 45.6 (26) | 0.019c
Active epilepsy | 67.8 (198) | 70.8 (155) | 54.5 (31) |

a. Mean ± standard deviation.

b. p-value calculated using T-Test.

c. p-value calculated using chi2-test.

d. Male vs. female.

[Back]

[Back]

Table 3.

Prescription pattern of anticonvulsant drugs within the cohort.

AED | % Total patients (n)
Levetiracetam | 53.1(155)
Lamotrigine | 35.6(104)
Valproate | 16.1(47)
Carbamazepine | 11.6(34)
Lacosamide | 11.6(34)
Zonisamide | 9.2(27)
Oxcarbazepine | 7.5(22)
Perampanel | 6.2(18)
Topiramate | 3.8(11)
Pregabalin | 2.4(7)
Gabapentin | 1.7(5)
Clonazepam | 1.0(3)
Primidone | 1.0(3)
Ethosuximide | 1.0(3)
Phenobarbital | 0.7(2)
Eslicarbazepine | 0.3(1)
Stiripentol | 0.3(1)
Methsuximide | 0.3(1)
Phenytoine | 0.3(1)
Piracetam | 0.3(1)
Percentage of “old” AEDsa | 28.8%
Percentage of enzyme-inducing AEDsa | 13.7%

a. Enzyme-inducing AEDs: carbamazepine, phenobarbital, primidone, and phenytoin; “old” AEDs: valproate, carbamazepine, phenobarbital and phenytoine.

[Back]

[Back]

Table 4.

Overview of patients with epilepsy-related injuries and accidents (ERIA, n = 41).

Epilepsy | Patient | Semiology | Potential associated factors | Injuries and accidents
Duration (y) | FE/IGE | AEDs (n) | Decade of life | SPS | CPS | sGTCS | pGTCS | Ictal falls | Ictal loss of consciousness | Abnormal postictal behavior | Sleep-associated seizures | Fracture | Burn | Laceration | Sprain/bruise | Mild injuries | Hospitalization required
– | FE | 3 | 61–70 |  |  |  |  | x | x |  |  | x |  | x |  |  | x
0.1 | IGE | 1 | 11–20 |  |  |  | x | x | x |  |  |  |  | x |  |  |
0.1 | FE | 1 | 31–40 | x |  | x |  | x | x |  |  |  |  |  |  | x | x
0.1 | IGE | 1 | 21–30 |  |  |  | x | x | x |  |  |  |  |  |  | x |
1 | FE | 1 | 51–60 |  |  |  |  | x | x |  |  |  |  |  | x |  | x
1 | FE | 1 | 51–60 |  |  | x |  | x | x |  |  | x |  |  |  |  | x
1 | FE | 2 | 51–60 |  |  | x |  | x | x |  |  |  |  |  | x |  |
1 | FE | 3 | 21–30 |  | x | x |  | x | x |  |  |  |  |  | x |  |
1 | FE | 1 | 11–20 | x |  | x |  | x | x |  |  |  |  |  | x |  |
2 | FE | 3 | 61–70 |  | x |  |  | x | x |  |  | x | x |  |  |  | x
2 | FE | 2 | 31–40 | x |  |  |  | x | x | x |  |  |  |  | x | x |
4 | FE | 1 | 11–20 | x |  | x |  | x | x |  |  |  |  |  |  | x | x
5 | FE | 1 | 61–70 | x |  | x |  | x | x |  |  |  |  |  |  | x | x
5 | IGE | 1 | 11–20 |  | x |  |  |  | x |  |  |  |  | x |  |  |
6 | FE | 2 | 31–40 |  | x |  |  | x | x | x |  |  |  | x |  |  |
7 | FE | 2 | 31–40 |  |  | x |  | x | x | x |  |  |  | x |  |  |
7 | IGE | 2 | 41–50 | x |  |  |  | x | x |  |  |  |  |  |  | x |
7 | FE | 1 | 11–20 |  |  | x | x |  | x |  | x |  |  |  | x |  |
7 | FE | 3 | 41–50 |  |  | x |  | x | x | x |  |  |  | x |  |  |
8 | FE | 2 | 21–30 | x |  |  |  | x | x |  |  | x |  |  |  |  |
10 | IGE | 3 | 21–30 |  |  | x |  |  | x | x |  |  | x | x |  | x | x
11 | FE | 3 | 21–30 | x |  |  |  | x | x | x |  | x |  | x |  |  | x
11 | FE | 1 | 21–30 | x |  | x |  |  |  |  |  |  |  |  |  | x |
11 | FE | 3 | 31–40 | x |  |  |  | x | x | x |  |  |  |  |  | x | x
11 | FE | 3 | 21–30 | x |  | x |  | x |  |  |  |  |  |  | x |  |
13 | FE | 2 | 51–60 | x |  |  |  | x | x | x |  |  |  | x |  | x |
13 | FE | 3 | 31–40 | x |  |  |  | x | x | x |  |  |  | x |  |  | x
13 | FE | 0 | 41–40 | x |  | x |  | x | x |  |  |  |  | x |  |  | x
18 | FE | 3 | 31–40 | x |  |  |  | x | x | x |  |  |  |  |  | x |
18 | IGE | 1 | 21–30 | x |  | x |  | x | x |  |  |  |  | x |  |  |
22 | FE | 3 | 41–50 |  |  |  | x | x | x |  |  |  |  | x |  | x |
26 | FE | 1 | 31–40 |  |  | x |  |  | x | x | x |  |  |  |  | x | x
27 | FE | 3 | 41–50 |  |  | x |  | x | x | x |  |  |  |  |  | x |
28 | FE | 3 | 41–50 | x |  |  |  | x | x | x |  |  |  |  |  | x |
29 | IGE | 2 | 31–40 | x |  | x |  | x | x |  |  | x |  | x |  |  | x
29 | FE | 2 | 41–50 |  |  | x |  | x | x |  |  |  |  | x | x |  |
37 | FE | 3 | 41–50 | x |  | x |  | x | x |  |  |  |  |  |  | x | x
41 | FE | 3 | 51–60 | x |  |  |  | x | x | x |  |  | x | x |  |  | x
48 | IGE | 4 | 41–50 | x |  | x |  | x | x |  |  |  |  | x |  | x |
53 | FE | 1 | 51–60 |  |  |  |  | x | x |  |  |  |  | x |  |  |
55 | FE | 3 | 61–70 |  | x |  |  | x | x |  |  |  |  |  | x |  | x

AEDs, anticonvulsant drugs; SPS, simple partial seizures; CPS, complex partial seizures; sGTCS, secondary generalized tonic-clonic seizures; pGTCS; primary generalized tonic-clonic seizures; mild injuries: biting of lips and tongue, small scrapes, mild contusion, myogelosis, aching muscles.

[Back]

[Back]

Table 5.

Frequency and clinical characteristics of patients with epilepsy-related injuries and accidents (ntotal = 292, nERIA = 41).

|  | Epilepsy related injuries and accidents
|  | No n (%) | Yes n (%) | Total | Chi-square | p-value | p-value corrected
Age | ≥50years | 82(87.2) | 12(12.8) | 94 | 0.2310 | 0.631 | 0.688c
| <50 years | 166(85.1) | 29(14.9) | 195 |  |  |
Duration of epilepsy | ≥10 years | 114(84.4) | 21(15.5) | 135 | 0.4000 | 0.527 | 0.688c
| <10 years | 128(87.1) | 19(12.9) | 147 |  |  |
Sex | Male | 110(84.6) | 20(15.4) | 130 | 0.2784 | 0.598 | 0.688c
| Female | 138(86.8) | 21(13.2) | 159 |  |  |
EPILEPSY SYNDROME
Focal epilepsy |  | 184(84.8) | 33(15.2) | 217 | 0.8103 | 0.368 | 0.688c
IGE |  | 51(89.5) | 6(10.5) | 57 |  |  |
NEWLY DIAGNOSED EPILEPSY a
| Yes | 16(84.2) | 3(15.8) | 19 | 0.0429 | 0.836 | 0.688c
| No | 232(85.9) | 38(14.1) | 270 |  |  |
SEIZURE FREQUENCY
Seizure free > 1 year | Yes | 91(96.8) | 3(3.2) | 94 | 13.8347 | <0.001 | 0.006c
| No | 157(80.5) | 38(19.5) | 195 |  |  |
No GTCS > 1 year | Yes | 179(92.3) | 15(7.7) | 194 | 20.1980 | <0.001 | 0.006c
| No | 69(72.6) | 26(27.4) | 95 |  |  |
Refractory epilepsyb | Yes | 57(76.0) | 18(24.0) | 75 | 8.0117 | 0.005 | 0.02c
| No | 191(89.3) | 23(10.7) | 214 |  |  |
SEIZURE SEMIOLOGY
Ictal falls | Yes | 169(82.4) | 36(17.6) | 205 | 6.2858 | 0.012 | 0.036c
| No | 77(93.9) | 5(6.1) | 82 |  |  |
Ictal loss of consciousness | Yes | 198(83.5) | 39(16.5) | 237 | 5.2314 | 0.022 | 0.044c
| No | 48(96.0) | 2(4.0) | 50 |  |  |
Inadequate peri-ictal behavior | Yes | 44(75.9) | 14(24.1) | 58 | 4.3352 | 0.017 | 0.036c
| No | 202(88.2) | 27(11.8) | 229 |  |  |
Nocturnal seizures only | Yes | 6(75.0) | 2(25.0) | 8 | 0.8299 | 0.362 | 0.688c
| No | 240(86.3) | 38(13.7) | 278 |  |  |

a. Newly diagnosed epilepsy, new onset epilepsy with ≥ 2 seizures within the last 12 months.

b. According to ILAE guidelines, IGE, idiopathic generalized epilepsy; GTCS, generalized tonic clonic seizure.

c. Adjusted for multiple testing using Benjamini-Hochberg-Adjustment.

[Back]

[Back]

Table 6.

Changes in mood and quality of life due to epilepsy-related injuries and accidents (ntotal = 292, nERIA = 41).

|  | Epilepsy related injuries and accidents
|  | No | Yes | Total | Chi-square | p-value | p-value corrected
DEPRESSION
BDI | Depression | 41 (75.9) | 13 (24.1) | 54 | 5.3325 | 0.021 | 0.021a
| (Score ≥ 14) |  |  |  |  |  |
| No depression | 207 (88.1) | 28 (11.9) | 235 |  |  |
| (Score < 14) |  |  |  |  |  |
NDDI-E | Major depression | 34 (72.3) | 13 (27.7) | 47 | 9.7522 | 0.002 | 0.003a
| (Score ≥ 13) |  |  |  |  |  |
| No major depression | 154 (90.1) | 17 (9.9) | 171 |  |  |
| (Score < 13) |  |  |  |  |  |
|  | All patients | Patients with ERIA | Patients without ERIA | p -value |  |
QUALITY OF LIFE
QOLIE-31 | Overall T (mean ±SD) | 48.1 ± 10.8 | 38.9 ± 9.0 | 49.2 ± 10.4 | <0.001 | 0.002a |
| Range | 17–68 | 22–56 | 17–68 |  |  |
EQ5D | VAS (mean ± SD) | 66.7 ± 19.3 | 56.0 ±19.1 | 68.4 ± 18.7 | <0.001 | 0.002a |
| Range | 10–100 | 10–90 | 20–100 |  |  |
MEDICATION
LEAP | Total (mean ± SD) | 39.9 ± 10.8 | 39.2± 10.9 | 44.6 ± 9.3 | 0.007 | 0.008a |
| Range | 19–64 | 19–64 | 26–63 |  |  |
OTHERS
ABNAS | Total (mean ± SD) | 24.0 ± 16.7 | 35.8 ±17.9 | 22.2 ± 15.7 | <0.001 | 0.002a |
| Range | range 0–72 | range 1–72 | range 0–63 |  |  |

NDDI-E, Neurological Disorders Depression Inventory for Epilepsy; BDI, Becks depression inventory; QOLIE31, Quality of Life in Epilepsy Inventory; ABNAS, A-B Neuropsychological Assessment Schedule; EQ5D, Euro Quality of Life; LEAP, Liverpool Adverse Events Profile; a adjusted for multiple testing using Benjamini-Hochberg-Adjustment.

[Back]

[Back]

Table 7.

Standardized assessment and management of variables associated with ERIA.

(1) Structured assessment of ERIA
(2) Individual evaluation of variables associated with ERIA
(3) Development of individual avoidance strategies for ERIA

Medical history
Seizure semiology
Information and consultation

Short-term:
“Have you had any injury or accident since the last visit?”
“Was this injury related to an epileptic seizure”
Generalized tonic clonic seizuresb
Status epilepticusa
Peri-ictal fallsb
Peri-ictal loss of consciousnessb
Peri-ictal inadequate behaviorb
Average risk for ERIA
Individual risk for ERIA due to
Medical history
Seizure semiology
Epilepsy syndrome
Possible consequences

Long-term:
“Have you ever had an injury or accident that was related to an epileptic seizure?”
Epilepsy syndrome
Avoiding strategies

Active epilepsyb
Refractory epilepsyb
Safe surrounding
Information of caretakers
Early detection of seizures

Examination

Auxiliary means

“Where have you got this scar/wound from?”
“Was the injury related to an epileptic seizure?”

Protective helmets
Hip protectors In-house-emergency calls Wearables
Seizure dog

ERIA epilepsy-related injuries and accidents.

a. Variables associated with ERIA proposed by other publications.

b. Variables associated with ERIA according to our cohort.

[Back]