PLoS ONE

PLoS One. 9(7): e101575

Molecular Characterization of the Na⁺/H⁺-Antiporter NhaA from Salmonella Typhimurium

Christopher J. Lentes¹², Syed H. Mir¹³, Marc Boehm⁴, Constanta Ganea⁵, Klaus Fendler⁶, Carola Hunte¹*

Dipshikha Chakravortty, Editor

1. Institute for Biochemistry and Molecular Biology, ZBMZ, BIOSS Centre for Biological Signalling Studies, University of Freiburg, Freiburg, Germany

2. Faculty of Biology, University of Freiburg, Freiburg, Germany

3. Department of Clinical Biochemistry, University of Kashmir, Srinagar, India

4. Department of Molecular Membrane Biology, Max Planck Institute of Biophysics, Frankfurt am Main, Germany

5. Biophysical Department, Faculty of Medicine, Carol Davila University of Medicine and Pharmacy, Bucharest, Romania

6. Department of Biophysical Chemistry, Max Planck Institute of Biophysics, Frankfurt am Main, Germany

Indian Institute of Science, India

* E-mail: carola.hunte@biochemie.uni-freiburg.de

Competing Interests: The authors have declared that no competing interests exist.

Conceived and designed the experiments: KF CH. Performed the experiments: CJL SHM MB CG. Analyzed the data: CJL KF CH. Contributed reagents/materials/analysis tools: KF CH. Contributed to the writing of the manuscript: CJL KF CH.

Copyright © 2014 Lentes et al

DOI: 10.1371/journal.pone.0101575

Published online: 10 July 2014

Abstract

Na⁺/H⁺ antiporters are integral membrane proteins that are present in almost every cell and in every kingdom of life. They are essential for the regulation of intracellular pH-value, Na⁺-concentration and cell volume. These secondary active transporters exchange sodium ions against protons via an alternating access mechanism, which is not understood in full detail. Na⁺/H⁺ antiporters show distinct species-specific transport characteristics and regulatory properties that correlate with respective physiological functions. Here we present the characterization of the Na⁺/H⁺ antiporter NhaA from Salmonella enterica serovar Thyphimurium LT2, the causing agent of food-born human gastroenteritis and typhoid like infections. The recombinant antiporter was functional in vivo and in vitro. Expression of its gene complemented the Na⁺-sensitive phenotype of an E. coli strain that lacks the main Na⁺/H⁺ antiporters. Purified to homogeneity, the antiporter was a dimer in solution as accurately determined by size-exclusion chromatography combined with multi-angle laser-light scattering and refractive index monitoring. The purified antiporter was fully capable of electrogenic Na⁺(Li⁺)/H⁺-antiport when reconstituted in proteoliposomes and assayed by solid-supported membrane-based electrophysiological measurements. Transport activity was inhibited by 2-aminoperimidine. The recorded negative currents were in agreement with a 1Na⁺(Li⁺)/2H⁺ stoichiometry. Transport activity was low at pH 7 and up-regulation above this pH value was accompanied by a nearly 10-fold decrease of KmNa (16 mM at pH 8.5) supporting a competitive substrate binding mechanism. K⁺ does not affect Na⁺ affinity or transport of substrate cations, indicating that selectivity of the antiport arises from the substrate binding step. In contrast to homologous E. coli NhaA, transport activity remains high at pH values above 8.5. The antiporter from S. Typhimurium is a promising candidate for combined structural and functional studies to contribute to the elucidation of the mechanism of pH-dependent Na⁺/H⁺ antiporters and to provide insights in the molecular basis of species-specific growth and survival strategies.

Introduction

Na⁺/H⁺ antiporter are integral membrane proteins that are crucial for control of intracellular pH, cellular Na⁺ concentration and cell volume in all biological kingdoms of life [1], [2]. They are secondary active transporters that exchange sodium ions against protons across the membrane. Eukaryotic, prokaryotic and archael Na⁺/H⁺ antiporters or exchangers were grouped in two clades of the cation-proton-antiporter (CPA) superfamily [1]–[3]. They share in general a common alternating access mechanism. Yet, in line with their broad range of physiological functions, they have distinct individual transport characteristics and regulatory properties. The human NHE isoforms, which belong to the CPA1 family, carry out neutral exchange with a 1Na⁺/1H⁺ stoichiometry [3]. They are crucial for numerous physiological processes and changes in their activities are implicated in the pathogenesis of several diseases as for instance essential hypertension, congenital secretory diarrhea, diabetes, epilepsy, and ischemia–reperfusion injury [4]. Na+/H⁺ antiporter are also important for ion homoeostasis of bacteria, which have to survive in rapidly changing or adverse environments [2]. Recently, deletion of the two major Na⁺/H⁺ antiporters NhaA and NhaB of Yersinia pestis showed that their function is indispensable for virulence of the causative agent of plague [5]. NhaA and NhaB are electrogenic transporters with stoichiometries of 1Na⁺/2H⁺ and 2Na⁺/3H⁺, respectively. The Na⁺/H⁺ antiporter NhaA from Escherichia coli (EcNhaA) is the best characterized member of the CPA2 family [2], [6]. NhaA is essential for growth of E. coli at alkaline pH-values in the presence of Na⁺- or Li⁺-ions [7], [8]. The transport is highly selective for Na⁺ and Li⁺ [9], [10]. The X-ray structure of EcNhaA revealed a new fold and provided first insights into the structural basis of an alternating access mechanism [11]–[13]. The position of key catalytic residues were identified and a potential Na⁺ binding site in the centre of the antiporter was suggested [11]. Binding as the determinant of selectivity was recently challenged by computational and experimental data which indicated that all alkali ions competitively bind to bacterial NhaA suggesting a promiscuous binding site with selectivity arising from a later step of the transport cycle [14]. A further interesting aspect is that Na⁺/H⁺ antiporters have characteristic individual pH-dependent activity profiles, which are important for their specific homoeostatic functions [6], [15]. EcNhaA transport activity drastically increases between pH 7.0 and pH 8.5 [7], [16]. A cytosolic pH-sensor responsible for pH-dependent regulation has been proposed and intensively studied for EcNhaA [17]. Electrophysiological characterization of pure, reconstituted transporter did confirm the pH profile [18], [19]. Yet, a recent study revealed that at asymmetrical pH conditions with a high pH at the Na⁺ uptake side, the transporter is highly active at low pH, even if the putative pH-sensor is exposed to acidic pH-values [20]. Based on this observation, a kinetic competition model was suggested in which Na⁺ and H⁺ compete for a common binding site [20], [21]. To date, the mechanism of pH-dependent transport is not understood in detail. Furthermore, species-specific differences in activity profile have been studied in few cases only, for instance for NhaA from Helicobacter pylori (HpNhaA) which was reported to be active in the pH-range between 6.0 and pH 8.5 [22]. Notably, transport activity of both EcNhaA and HpNhaA declines above pH 8.5 which was proposed to be caused by H⁺ substrate depletion at high alkaline pH-values [20]. Further characterization of species-specific properties of NhaA is important for a detailed understanding of the mechanism of pH-dependent transport and will contribute to the understanding of the molecular basis of species-specific growth and survival strategies.

To obtain insights in the pH-dependent Na⁺/H⁺ exchange of Salmonella enterica, we choose NhaA of Salmonella enterica serovar Typhimurium LT2 (S. Typhimurium), as this serovar is extensively characterized and the genome sequence is available [23]. Salmonella enterica species are Gram-negative, facultatively anaerobic bacteria of the family of Enterobacteriaceae. Several serovars can cause nontyphoidal foodborn human gastroenteritis with 94 million cases and 155,000 deaths estimated globally per year [24]. Salmonella enteriditis nhaA was originally identified in a larger DNA fragment cloned by complementation [25]. That fragment harboured two open reading frames which encoded proteins homologous to the antiporter nhaA and the gen regulator nhaR, expression increased Na⁺/H⁺ antiport activity and also showed activity for Li⁺.

Here we show functionality of recombinant NhaA from S. Typhimurium in vivo and in vitro and describe species-specific properties, notably stable transport activity at alkaline pH-values. Electrophysiological measurements support the proposed competition mechanism and oppose the concept of a promiscuous cation binding site. The transporter is an attractive candidate to obtain further mechanistic insights in pH-dependent Na⁺/H⁺ antiport by combined structure/function analysis.

Materials and Methods

Production of recombinant STNhaA

The coding region for STNhaA (nhaA, STM0039) was amplified from genomic DNA of S. Typhimurium using the primer sequences CTTGGGATCCTTAAACATCTGCACCGA-TTTTTTAGCAGCG and CTGAGGAATTCGTTGCCGGCGCGTTCAAACGC, which include BamHI and EcoRI restriction sites, respectively. The PCR-fragment was inserted via these restriction sites into the expression plasmid pTTQ18A1 [26], a derivative of pTTQ18 [27], resulting in the expression construct pTTQ18A1-STNhaA-His₆ which encodes for wild-type STNhaA with a TEV protease cleavable hexahistidine-tag fused to the carboxy-terminus (additional C-terminal residues FENLYFQGGRGGHHHHHH) and adds five amino acid residues NLGIL at the amino-terminus. For heterologous over-expression in E. coli, cells of strain NM554 [26] were transformed with pTTQ18A1-STNhaA-His₆. Expression cultures were grown in LB medium at 37°C in shaking flasks. Protein production was induced at OD600 nm = 0.5 with 0.5 mM isopropyl-β-D-thiogalactopyranoside for 3 h. Cells were harvested by centrifugation and membranes were prepared as previously described for EcNhaA [13] with minor modifications.

IMAC purification of STNhaA

Membranes were solubilized in buffer (1% n-dodecyl-β-D-maltopyranoside (β-DDM), 50 mM HEPES pH 7.5, 100 mM NaCl), incubated for 1 h at 4°C and centrifuged at 4°C for 15 min at 310,000×g. The supernatant was loaded onto a 5 ml HisTrap HP (GE-Healthcare) column equilibrated with loading buffer (20 mM Tris/HCl pH 7.5, 500 mM NaCl, 5 mM imidazole and 0.03% β-DDM). The protein was eluted using 20 mM Na-Citrat pH 4.0, 100 mM NaCl, 0.03% DDM, with 500 mM imidazol. After desalting chromatography (HiTrap, GE-Healthcare), the protein was concentrated to 6 mg/ml by spin filtration.

Blue-native-PAGE

IMAC purified STNhaA (7 µg) was incubated on ice for 45 min in presence of 1x sample buffer (Invitrogen, BN2003) and 3x cathode buffer (Invitrogen, BN2002). After centrifugation at 10,000×g for 5 min at 4°C, supernatant was loaded on a 4–16% BisTris NativePage gel (Invitrogen) and separated in Dark Blue Buffer (Invitrogen) for 2 h at 150 V.

Size exclusion chromatography multi-angle laser-light scattering analysis

STNhaA solution (40 µl) was filtered using a 0.1 µm filter and subjected to two coupled Superdex 200 5/15 (GE-Healthcare) gel filtration columns equilibrated with size exclusion chromatography (SEC)-buffer (10 mM MES pH 6, 150 mM NaCl, 0.03% β-DDM). Separation was performed on an Äkta Micro System (GE-Healthcare) with in line monitoring of static light scattering (miniDAWN Treos, Wyatt Technology), differential refractive index (Optilab rEX, Wyatt Technology) and UV₂₈₀ absorption. Data were processed with the ASTRA software package using the protein conjugate analysis tool (Wyatt Technology) with the calculated UV₂₈₀ extinction coefficient (Expasy ProtParam tool [28]) of 57535 M−1 cm⁻¹ for STNhaA and a dn/dcprotein value of 0.185 ml/mg [29]. The dn/dc value for β-DDM in SEC buffer was determined experimentally by injecting different β-DDM concentrations into the differential refractive index detector and measuring the β-DDM concentration dependent change in refractive index.

Semiautomated micro-culture growth complementation under salt stress

Production of functional STNhaA was probed with a growth complementation assay using the Na⁺/H⁺-antiporter deficient E. coli strain EP432 (melBLid, ΔnhaA1::kan, ΔnhaB1::cat, ΔlacZY, thr1 [30]. EP432 cells were transformed either with pTTQ18A1-STNhaA-His₆ or with pTTQ18A1 vector. Pre-cultures in LBK were inoculated with a single colony. Aliquots of the pre-culture were diluted to an OD600 nm of 0.02 in buffered (50 mM HEPES pH 7.5 or Tris/HCl pH 8.0) LB-medium (10 g/l bactotryptone, 5 g/l yeast extract) complemented with either 200 mM NaCl, 800 mM NaCl or 200 mM LiCl. 100 µl aliquots of the diluted suspension were applied to each well of a 96-well microtiterplate, which was sealed with an adhesive membrane (Breathe-Easy, Sigma-Aldrich). Growth was monitored every 10 min at 600 nm for up to 22 h using a microplate reader (Powerwave XS2, Biotek) at 37°C and under continues shaking. Assays were performed in triplicates in at least three independent experiments.

Background expression of pTTQ18A1-STnhaA

Presence of STNhaA in non-induced cultures was determined with 5 ml cultures of EP432 E. coli cells transformed with pTTQ18A1-STnhaA in LB-medium containing 200 mM LiCl buffered at pH 8.0 for 22 h at 37°C. At different time points, 1 ml samples were taken, cells sedimented and resuspended in SDS sample buffer. Samples were normalized to 1 ml of culture with an OD₆₀₀ = 0.8 and 20 µl were applied to 12% Tris/Glycin gels. After SDS-PAGE separation, samples were transferred to a polyvinylidene fluoride membrane and STNhaA was probed by Western immunoblotting with antibodies against the His-tag.

Solid-supported-membrane (SSM) based electrophysiology

Purified STNhaA was reconstituted in proteoliposomes using the protocol described for EcNhaA [19]. SSM measurements were performed as described previously [31]. Briefly, 20 µl of proteoliposomes at a lipid concentration of ∼5 mg/ml were adsorbed to an octadecanethiol/phospholipid hybrid bilayer on a gold surface (sensor). Proteoliposomes were allowed to adsorb to the sensor for 60–90 min. Electrogenic transport was initiated by a rapid Na⁺ concentration jump. Solution exchange protocol: nonactivating solution (no Na⁺) 0.5 s; activating solution (with Na⁺) 0.5 s; nonactivating solution 0.5 s. Currents recorded throughout the measurements were amplified with a current amplifier set to a gain of 10⁸–109 V/A and low pass filtering set to 300–1000 Hz. To minimize Na⁺ concentration jump artefacts, Na⁺ was replaced by an equal amount on an inert cation (K⁺ or choline⁺) in the nonactivating solution. In addition, the ionic strength was kept high by adding K⁺ (or choline⁺) to a total cation concentration of 300 mM. The experiments were performed at room temperature.

The peak currents of each Na⁺-dependence (3 data sets) were normalized to the corresponding Vmax values resulting from a hyperbolic fit to the individual data sets and then averaged. The peak currents of the pH-dependence (3 data sets) were approximated using a spline function and the individual data sets normalized to the maximal value of the corresponding spline function. Then, the normalized data sets were averaged. Details of the measurement and analysis procedure were previously published [20].

Results

NhaA from S. Typhimurium is functional in vivo

Recombinant NhaA from S. Typhimurium was produced with a carboxy-terminal hexa-histidine tag by heterologous overexpression in E. coli (STNhaA hereafter). Functionality in vivo was analysed by growth complementation of the salt-sensitive Na⁺/H⁺ antiporter deficient E. coli strain EP432. This strain lacks the genes for NhaA and NhaB, does not grow on Na⁺- or Li⁺-supplemented selection media, and was previously used in physiological studies to probe functionality of Na⁺/H⁺ antiporter [6], [32], [33]. Growth complementation was performed with a semiautomated micro-culture growth assay [34] using media buffered at pH 7.5 (Fig. 1). Control cultures of cells transformed with the plasmid pTTQ18A1 grew on KCl-supplemented media and showed no growth upon addition of 200 mM NaCl or LiCl (Fig. 1a). Growth characteristics are similar to those previously described for shaking flask cultures [33] or micro-cultures of this strain [35] with stable growth over 2–3 hours. Complementation was analysed for EP432/STnhaA-pTTQ18A1 cultures. As cells are less viable when overexpression is induced (data not shown), the basal expression of non-induced cultures was used. The presence of STNhaA in non-induced cells after 8 h and 22 h growth was confirmed by SDS-PAGE and consecutive Western-immunoblot probing the His-tag (Fig. 1c). Basal STnhaA expression fully conferred resistance to 200 mM NaCl or LiCl. It could ameliorate toxicity of high NaCl concentration (800 mM), though growth of these cultures is impaired. Taken together, STNhaA functionally complemented the salt-sensitive phenotype of the antiporter deficient E. coli strain under Na⁺ as well as Li⁺ stress at pH 7.5. Micro-cultures provide an efficient assay format which might be of interest for inhibitor screening.

Figure 1View larger versionFigure 1. Expression of S. Typhimurium nhaA complements salt-sensitive phenotype of Na⁺/H⁺ antiporter deficient E. coli strain EP432.Growth characteristics were monitored in microscale liquid growth complemention assays. Cells transformed with pTTQ18A1 (a) and with pTTQ18A1-STNhaA (b) were grown on LBK medium (67 mM KCl) as control. Salt-stress was induced with 200 mM NaCl, 200 mM LiCl, or 800 mM NaCl supplemented media buffered at pH 7.5. Triplicate samples were averaged and standard deviations for each trace ranged between 0.3 and 2.3%. Basal expression levels without chemical induction were used for the complementation assays. The leaky expression system resulted in substantial STNhaA production in cultures as used in (b). NhaA was detected by Western-immunoblot with anti-His-tag antibodies after SDS-PAGE separation of total cell extracts after 8 h (A) and 22 h (B) cultivation. As a control, cells were transformed with pTTQ18A1 and cultivated in LBK medium for 22 h (C).

Dimeric STNhaA was purified to homogeneity

STNhaA was purified from solubilized membranes by immobilized metal affinity chromatography (IMAC) with an average yield of 1.6 mg protein per litre of cell culture. The protein was highly pure as shown by SDS-PAGE analysis with silver-staining (Fig. 2a). It migrated with an apparent molecular mass of 33 kDa, faster as compared to the calculated mass (44.01 kDa). The higher electrophoretic mobility is often observed for integral membrane proteins which lack soluble domains and largely consist of transmembrane helices [36]. A second band at higher molecular mass (53 kDa) was present, most likely a dimeric association of the protein. The carboxy-terminal affinity-tag of the antiporter was intact as shown by Western-immunoblot with His-tag specific antibodies, which decorated both bands (Fig. 2a).

Figure 2View larger versionFigure 2. Purity and oligomeric state of STNhaA. (a) IMAC-purified STNhaA probed by SDS-PAGE analysis, Western-immunoblot and BN-PAGE.Shown is the silver-stained gel (12% Bis/Tris gel) after electrophoretic separation of 200 ng of STNhaA (left panel, left lane). Molecular masses of co-separated standard proteins are indicated in kDa. NhaA (33 kDa) and its SDS-resistant oligomer (53 kDa) were positively probed in Western-immunoblot with anti-His-tag antibodies (left panel, right lane). Coomassie-stained gel (4–16% Bis/Tris gel) after BN-PAGE analysis of 7 µg of IMAC purified STNhaA (right panel). The molecular masses of co-separated standard proteins are indicated on the left in kDa. (b) Chromatogram of SEC-MALLS analysis of β-DDM solubilized STNhaA. 80 µg of IMAC-purified STNhaA were applied to size-exclusion chromatography on a Superdex 200 column. The chromatogram shows detector readings of the 90 light scattering detector, the UV₂₈₀ detector, and the refractive index detector in black, dark gray and light gray, respectively. The horizontal black lines indicate the calculated mass of STNhaA, detergent micelle, STNhaA/detergent complex and indicate a high degree of monodispersity throughout the elution peak.

BN-PAGE analysis of purified STNhaA resulted in a single band at 176 kDa, suggesting an oligomeric state of native STNhaA (Fig. 2a, right panel). Purified STNhaA was stable and monodisperse in solution as documented by subsequent analytical size exclusion chromatography (SEC) (Fig. 2b). SEC analysis was combined with online multi-angle laser-light scattering and refractive index monitoring (SEC-MALLS). A mass of 88 kDa was determined for STNhaA in solution, in accurate agreement with the theoretical mass of the antiporter dimer. For analysis of the mass of the entire detergent/protein complex and the contribution of the detergent micelle, the dn/dc value of β-dodecyl-maltopyranoside (DDM) in SEC-buffer was experimentally determined to be 0.122 ml/g (Fig. S1). Comparison with previous values of 0.133 ml/g [37] and 0.143 ml/g [38] for DDM emphasizes that dn/dc values for detergents vary with buffer conditions [38]. Based on the specific dn/dc value, the STNhaA/DDM complex had a mass of 307 kDa for the entire complex, of which a substantial mass of 219 kDa were contributed by the associated detergent micelle. For comparison, a pure β-DDM micelle has a mass of 72 kDa [37]. A similar contribution of 233 kDa DDM was reported for the protein/detergent complex of the dimeric metal transporter YiiP [39], [40]. The pure, monodisperse preparation of STNhaA suggests this transporter as a promising candidate for structural and functional characterization. Antibody-mediated crystallization may be a good strategy to accommodate the large detergent micelle [41].

Electrophysiological characterization of Na⁺(Li⁺)/H⁺ transport of reconstituted STNhaA

For functional characterization, purified STNhaA was reconstituted in liposomes and transport activity was assayed with direct current measurements using SSM-based electrophysiology. Transient electrical currents generated by STNhaA were observed after imposing concentration jumps of Na⁺ or Li⁺ on proteoliposomes. Typical currents recorded upon a 10 mM Na⁺ (Li⁺) concentration jump are shown in Fig. 3a. The peak currents correspond to stationary turnover of the Na⁺/H⁺ exchanger and can be used to characterize its transport activity [19]. According to the transport stoichiometry of 1Na⁺/2H⁺, negative currents corresponding to the displacement of positive charge out of the proteoliposomes were recorded upon a Na⁺ concentration jump. Clearly, Na⁺ and Li⁺ were both transported by STNhaA. Li⁺ had a slightly lower turnover than Na⁺. The amiloride-analogue 2-aminoperimidine (2-AP) was described as specific inhibitor of bacterial NhaA Na⁺/H⁺ antiporters [42]. In agreement, the transient current generated by a 10 mM Na⁺ concentration jump was nearly completely suppressed by addition of 25 µM 2-AP (Fig. 3a).

Figure 3View larger versionFigure 3. Kinetic characterization of STNhaA.(a) Transient electrical currents generated by purified STNhaA reconstituted in proteoliposomes using SSM-based electrophysiology after 10 mM Na⁺ and Li⁺ concentration jumps at pH 8.5. The buffers contained 25 mM Tris/25 mM MOPS/25 mM HEPES pH 8.5 (Tris), 290 mM KCl and 0.1 mM DTT. In addition, the activating and the nonactivating solutions contained 10 mM NaCl and KCl, respectively. The dashed line shows inhibition of the NaCl concentration jump signal with 25 µM 2-aminoperimidine. (b) The pH dependence of STNhaA peak currents after a 100 mM Na⁺ concentration jump. The buffers contained 25 mM Tris/25 mM MOPS/25 mM HEPES at pH values indicated (HCl or Tris), 200 mM KCl and 0.1 mM DTT. In addition, the activating and the non-activating solutions contained 100 mM NaCl and KCl, respectively. The dashed line represents the corresponding pH dependence of EcNhaA [20], [21].

STNhaA transport and affinity for Na⁺ are pH dependent

The pH-dependence of STNhaA transport activity was characterized with currents recorded after concentration jumps of 10 mM Na⁺ performed at pH-values ranging from pH 7.0 to pH 9.5 (Fig. 3b). Currents were small at pH 7 and increased in a sigmoidal manner with rising pH-values reaching 50% at ∼pH 7.8 and a maximum at pH 9.0. The transport activity remained high at pH 9.5. The pH-profile was slightly shifted as compared to NhaA from Escherichia coli (EcNhaA, Fig. 3b) and, notably, transport activity of that transporter steadily declined above pH 8.5 [19]. A competitive mechanism in which Na⁺ and H⁺ compete for a common binding site has been suggested for down regulation of transport activity at low pH [20]. In order to extend this hypothesis on STNhaA, the binding constants for Na⁺ at pH 8.5 and 7.0 were determined (Fig. 4). Indeed, the Km for Na⁺ increased from 16 mM at pH 8.5 to 144 mM at pH 7.0, in line with a competitive mechanism.

Figure 4View larger versionFigure 4. Na⁺ concentration dependence of STNhaA peak currents after a Na⁺ concentration jump of the indicated concentration at pH 8.5 and pH 7.0.Experiments were performed with reconstituted STNhaA as in Fig. 3. The buffers contained 25 mM Tris/25 mM MOPS/25 mM Hepes pH 8.5 or 7.0 (adjusted with HCl at pH 7.0 or Tris at pH 8.5). In addition, the activating solution contained×mM of NaCl with (300-x) mM background of KCl, the non-activating solution only 300 mM KCl. Currents were normalized and averaged from 3 different data sets as described in Materials and Methods. The solid line is a fit to the data using hyperbolic concentration dependence. The respective Km values for Na⁺ are indicated in the figure.

Selectivity of cation binding and transport

Promiscuous ion binding in bacterial NhaA was recently suggested, as computational data showed that all alkali ions bind to the active site of EcNhaA without particular preference and that they inhibit NhaA activity in everted membrane vesicles [14]. This is in contrast to the high selectivity for Na⁺ and Li⁺ shown for that transporter [9], [10], [19]. To challenge the hypothesis for bacterial NhaA, we analysed whether elevated concentrations of K⁺ impair transport function of STNhaA. For this purpose, Na⁺-dependent electrical currents were measured with KCl and choline chloride (CholCl) background adjusted to a total salt concentration of 300 mM using SSM-based electrophysiology. Normalised and averaged data are presented in Fig. 5. The Km for Na⁺ determined with KCl background (8.6 mM) and CholCl background (8.0 mM) were identical within the experimental error as were the saturation values for the peak currents Ipeak(max) determined before normalization (Fig. 5 see insert). These measurements correspond to a 30-fold excess of KCl or CholCl at half-saturating Na⁺ concentrations without a detectable effect of K⁺ on the Km for Na⁺. We also performed experiments in the absence of a salt background at half-saturating Li⁺ concentrations (3 mM) with and without 100 mM KCl (data not shown). No inhibition of Li⁺ transport was observed. In conclusion, neither STNhaA transport activity nor affinity for Na⁺ were affected by KCl, demonstrating that substrate selectivity of STNhaA already arises at the ion binding step.

Figure 5View larger versionFigure 5. Probing competitive K⁺ inhibition of the peak currents generated by STNhaA after a Na⁺ concentration jump.Experiments were performed with reconstituted STNhaA as in Fig. 3. The buffers contained 25/25 mM MOPS/25 mM HEPES pH 8.5 (adjusted with Tris). In addition, the activating solution contained×mM of NaCl with (300-x) mM background of KCl (black squares) or CholCl (green circles), the non-activating solution only 300 mM KCl or CholCl. The red line shows a fit to the data obtained with KCl background. Three independent measurements with KCl and CholCl were perfomed, normalized and averaged as described in Experimental Procedures. The saturating currents determined before normalization for KCl and CholCl are indicated.

Discussion

The Na⁺/H⁺ antiporter NhaA from S. Typhimurium was produced in functional form by heterologous expression in E. coli. STnhaA expression efficiently complements the Na⁺ and Li⁺ sensitive growth phenotype of the Na⁺/H⁺ antiporter (ΔnhaA ΔnhaB) deficient E. coli strain EP432. This in vivo functionality is in agreement with the initial characterization of a larger DNA fragment containing nhaA and the gene regulator nhaR [25]. Overproduction and purification of STNhaA resulted in milligram amounts of pure and stable protein per litre of expression culture ideal for biochemical and biophysical characterization. BN-PAGE separation of purified STNhaA showed a homogenous oligomeric state with an apparent mass of 176 kDa. A factor of 1.8 to be applied to the theoretical mass of integral membrane transport proteins was suggested to correct for bound detergent, lipid and Coomassie-Blue molecules in BN-PAGE [43]. Based on this correction, a dimeric association of STNhaA in BN-PAGE can be assumed, as the experimental result is close to the corrected apparent mass of a dimer (158 kDa). One should note that PN-PAGE mobility can be substantially influenced by detergent, lipid and dye molecules, as recently shown for the mitochondrial ADP/ATP carrier for which the apparent mass varied between 60 and 130 kDa depending on solubilisation conditions [44]. Alternatively, SEC-MALLS permits a precise analysis of the oligomeric state of membrane proteins in solution, as protein and detergent contributions can be discriminated for a monodisperse protein detergent complex that elutes as a single peak in size exclusion chromatography. The STNhaA homodimer in solution was accurately identified with a mass of 88 kDa by SEC-MALLS. Bacterial Na⁺/H⁺-antiporters appear to be physiological dimers. EcNhaA is dimeric in native as well as artificial membrane environments shown by cryo-electron microscopy of two-dimensional crystals [45] and by genetic and biochemical methods [46]. Cross-linking of monomers at the dimer interface changed the pH profile of EcNhaA transport [46]. The functional role of the dimeric association is not entirely clear, as monomers of EcNhaA are fully functional. Dimerization may be beneficial under extreme stress conditions at alkaline pH in the presence of Na⁺ or Li⁺ [33].

Purified STNhaA is fully capable of electrogenic Na⁺/H⁺ and Li⁺/H⁺ exchange in vitro when reconstituted in proteoliposomes and assayed by SSM-based electrophysiology. The characterization showed that 1) the negative currents are in agreement with a 1Na⁺/2H⁺ stoichiometry, 2) the is 16 mM at pH 8.5 when the transport rate is close to maximum, 3) transporter activity is low at pH 7 and steadily increases with rising pH, and 4) acidic down-regulation is accompanied by a nearly 10-fold increase of (144 mM at pH 7.0). The kinetic properties compare overall well with those of EcNhaA, for which values of 11 mM and 178 mM were reported at pH 8.5 and pH 7, respectively [20]. Importantly, the distinct change in Na⁺ affinity of STNhaA supports the hypothesis that a competitive mechanism is responsible for acidic pH regulation of bacterial NhaA Na⁺/H⁺ antiporters, in which Na⁺ and H⁺ compete for the same binding site [20].

The cation/proton antiport activity of bacterial NhaA is highly efficient for Na⁺ and Li⁺. STNhaA as well as EcNhaA [9], [10] activity supports growth of antiporter deficient E. coli cells at high Li⁺ concentrations or at alkaline pH in the presence of Na⁺. Cation specificity was emphasised by characterization of transport kinetics of EcNhaA with SSM-based electrophysiology. Whereas Na⁺ and Li⁺ generated similar peak currents at pH 8.0 and were transported with similar turnover rates, neither K⁺ or Rb⁺ elicited current signals [19]. In line with these data, STNhaA cation/proton antiport activity was shown for Na⁺ and Li⁺ with similar peak currents. A conflicting study suggested, based on computational analysis of ion binding and transport studies on isolated membranes, that all alkali ions compete for substrate binding and that for instance K⁺ or Rb⁺ binding inhibits NhaA transport activity [14]. However, the SSM studies with purified reconstituted STNhaA clearly showed that K⁺ is not competing with Na⁺ binding or Na⁺/H⁺ transport activity, clearly indicating that selectivity is already conveyed at the binding step.

The overall agreement in kinetic properties of STNhaA and EcNhaA coincides with the amino acid sequence identity of 92%. Residues Asp163 and Asp164, which are essential for ion transport in EcNhaA [47], and other residues of structural and mechanistic importance, for instance Thr132, Asp133, Lys300 [48] are fully conserved. However, the two transporters differ in one aspect of function despite their high sequence identity. While EcNhaA activity irreversibly decreases above pH 8.5 [19], the transporter from S. Typhimurium maintains its maximum activity in electrophysiological measurements at least up to pH 9.5. Alkaline down regulation in EcNhaA has been explained by substrate H⁺ depletion [20], a mechanism which is in the physiological transport mode of NhaA a function of periplasmic pH. For STNhaA, high activity at pH 9.5 indicates that the H⁺ transport step is fast, permitting the transporter to operate without rate limitation even at low H⁺ concentration. It may also reflect a higher stability of the protein at alkaline pH. Further experiments need to address structure/function relationships that lead to the species-specific pH profile and may also explore the functional role of STNhaA for growth and survival of Salmonella in adverse environments. Further species-specific properties were recently described for NhaA from Helicobacter pylori, for which the pH profile is shifted by 1.2 pH units to a more acidic range as compared to STNhaA [49]. In addition, the Na⁺/H⁺ antiporter NapA from Thermus thermophilus shows down-regulation at pH 6 only for Na⁺/H⁺ antiport, whereas Li⁺/H⁺ activity remains high at acidic pH [35]. A detailed structural and functional characterization of different bacterial Na⁺/H⁺ antiporters is required for a full understanding of species-specific activities and will contribute to elucidation of the pH-dependent Na⁺/H⁺ transport mechanism in general. The X-ray structure of EcNhaA was obtained at low pH in inward-open conformation [11] and conformational changes upon pH activation are debated [17]. The structure of the Na+/H⁺ antiporter NapA from Thermus thermophilus displays an outward-open conformation [50] but also lacks a bound sodium ion. The good biochemical properties and the sustained high activity of STNhaA at pronounced alkaline pH might be beneficial for crystallization of the protein in an active conformation.

Supplementary Material

Open In Web Browser

Acknowledgments

We thank Etana Padan for providing E. coli strain EP432.

Articles from PLoS ONE are provided here courtesy of Public Library of Science

PMC Copyright Notice

The articles available from the PMC site are protected by copyright, even though access is free. Copyright is held by the respective authors or publishers who provide these articles to PMC. Users of PMC are responsible for complying with the terms and conditions defined by the copyright holder.

Users should assume that standard copyright protection applies to articles in PMC, unless an article contains an explicit license statement that gives a user additional reuse or redistribution rights. PMC does not allow automated/bulk downloading of articles that have standard copyright protection.

See the copyright notice on the PMC site, http://www.ncbi.nlm.nih.gov/pmc/about/copyright/, for further details and specific exceptions.

References

Brett CL, Donowitz M, Rao R (2005) Evolutionary origins of eukaryotic sodium/proton exchangers. Am J Physiol Cell Physiol288: 223–239

Krulwich TA, Sachs G, Padan E (2011) Molecular aspects of bacterial pH sensing and homeostasis. Nat Rev Microbiol9: 330–34321464825

Orlowski J, Grinstein S (2004) Diversity of the mammalian sodium/proton exchanger SLC9 gene family. Pflugers Arch447: 549–56512845533

Donowitz M, Ming Tse C, Fuster D (2013) SLC9/NHE gene family, a plasma membrane and organellar family of Na(+)/H(+) exchangers. Mol Aspects Med34: 236–25123506868

Minato Y, Ghosh A, Faulkner WJ, Lind EJ, Bartra SS, et al (2013) Na⁺/H⁺ Antiport Is Essential for Yersinia pestis Virulence. Infection and Immunity81: 3163–317223774602

Padan E, Bibi E, Ito M, Krulwich TA (2005) Alkaline pH homeostasis in bacteria: New insights. Biochim Biophys Acta1717: 67–8816277975

Taglicht D, Padan E, Schuldiner S (1991) Overproduction and purification of a functional Na⁺/H⁺ antiporter coded by nhaA (ant) from Escherichia coli.. J Biol Chem266: 11289–112941645730

Padan E, Tzubery T, Herz K, Kozachkov L, Rimon A, et al (2004) NhaA of Escherichia coli, as a model of a pH-regulated Na⁺/H⁺antiporter. Biochim Biophys Acta1658: 2–1315282168

Goldberg EB, Arbel T, Chen J, Karpel R, Mackie GA, et al (1987) Characterization of a Na⁺/H⁺ antiporter gene of Escherichia coli.. Proc Natl Acad Sci U S A84: 2615–26193033655

Taglicht D, Padan E, Schuldiner S (1993) Proton-sodium stoichiometry of NhaA, an electrogenic antiporter from Escherichia coli. J Biol Chem268: 5382–53878383669

Hunte C, Screpanti E, Venturi M, Rimon A, Padan E, et al (2005) Structure of a Na⁺/H⁺ antiporter and insights into mechanism of action and regulation by pH. Nature435: 1197–120215988517

Screpanti E, Hunte C (2007) Discontinuous membrane helices in transport proteins and their correlation with function. Journal of Structural Biology159: 261–26717350860

Screpanti E, Padan E, Rimon A, Michel H, Hunte C (2006) Crucial steps in the structure determination of the Na⁺/H⁺ antiporter NhaA in its native conformation. Journal of Molecular Biology362: 192–20216919297

Alhadeff R, Ganoth A, Krugliak M, Arkin IT (2011) Promiscuous Binding in a Selective Protein: The Bacterial Na(+)/H(+) Antiporter. Plos One6: e2518222022382

Orlowski J, Grinstein S (2004) Diversity of the mammalian sodium/proton exchanger SLC9 gene family. Pflugers Arch447: 549–56512845533

Tzubery T, Rimon A, Padan E (2004) Mutation E252C increases drastically the Km value for Na⁺ and causes an alkaline shift of the pH dependence of NhaA Na⁺/H⁺ antiporter of Escherichia coli.. J Biol Chem279: 3265–327214604993

Padan E (2013) Functional and structural dynamics of NhaA, a prototype for Na⁺ and H⁺ antiporters, which are responsible for Na⁺ and H⁺ homeostasis in cells. Biochim Biophys Acta1837: 1047–106224361841

Grewer C, Gameiro A, Mager T, Fendler K (2013) Electrophysiological Characterization of Membrane Transport Proteins. Annu Rev Biophys. 42: 95–120

Zuber D, Krause R, Venturi M, Padan E, Bamberg E, et al (2005) Kinetics of charge translocation in the passive downhill uptake mode of the Na⁺/H⁺ antiporter NhaA of Escherichia coli.. Biochim Biophys Acta1709: 240–25016139785

Mager T, Rimon A, Padan E, Fendler K (2011) Transport mechanism and pH regulation of the Na⁺/H⁺ antiporter NhaA from Escherichia coli: An electrophysiological study. J Biol Chem. 286: 23570–23581

Mager T, Braner M, Kubsch B, Hatahet L, Alkoby D, et al (2013) Differential Effects of Mutations on the Transport Properties of the Na⁺/H⁺ Antiporter NhaA from Escherichia coli. J Biol Chem288: 24666–2467523836890

Inoue H, Sakurai T, Ujike S, Tsuchiya T, Murakami H, et al (1999) Expression of functional Na⁺/H⁺ antiporters of Helicobacter pylori in antiporter-deficient Escherichia coli mutants. FEBS Lett443: 11–169928943

McClelland M, Sanderson KE, Spieth J, Clifton SW, Latreille P, et al (2001) Complete genome sequence of Salmonella enterica serovar Typhimurium LT2. Nature413: 852–85611677609

Majowicz SE, Musto J, Scallan E, Angulo FJ, Kirk M, et al (2010) The global burden of nontyphoidal Salmonella gastroenteritis. Clin Infect Dis50: 882–88920158401

Pinner E, Carmel O, Bercovier H, Sela S, Padan E, et al (1992) CLONING, SEQUENCING AND EXPRESSION OF THE NHAA AND NHAR GENES FROM SALMONELLA-ENTIRITIDIS. Archives of Microbiology157: 323–3281317153

Surade S, Klein M, Stolt-Bergner PC, Muenke C, Roy A, et al (2006) Comparative analysis and “expression space” coverage of the production of prokaryotic membrane proteins for structural genomics. Protein Science15: 2178–218916943447

Stark MJR (1987) Multicopy Expression Vectors Carrying the Lac Repressor Gene for Regulated High-Level Expression of Genes in Escherichia coli. Gene51: 255–2673110013

Gasteiger E, Hoogland C, Gattiker A, Duvaud S, Wilkins M, et al. (2005) Protein Identification and Analysis Tools on the ExPASy Server. In: Walker JM, editor. The Proteomics Protocols Handbook. 571–607.

Folta-Stogniew E, Williams KR (1999) Determination of molecular masses of proteins in solution: Implementation of an HPLC size exclusion chromatography and laser light scattering service in a core laboratory. Journal of biomolecular techniques10: 51–6319499008

Pinner E, Kotler Y, Padan E, Schuldiner S (1993) Physiological role of nhaB, a specific Na⁺/H⁺ antiporter in Escherichia coli. J Biol Chem268: 1729–17348093613

Schulz P, Garcia-Celma JJ, Fendler K (2008) SSM-based electrophysiology. Methods46: 97–10318675360

Pinner E, Kotler Y, Padan E, Schuldiner S (1993) Physiological-Role of Nhab, a Specific Na⁺/H⁺ Antiporter in Escherichia coli. Journal of Biological Chemistry268: 1729–17348093613

Rimon A, Tzubery T, Padan E (2007) Monomers of the NhaA Na⁺/H⁺ antiporter of Escherichia coli are fully functional yet dimers are beneficial under extreme stress conditions at alkaline pH in the presence of Na⁺ or Li⁺. J Biol Chem282: 26810–2682117635927

Toussaint M, Conconi A (2006) High-throughput and sensitive assay to measure yeast cell growth: a bench protocol for testing genotoxic agents. Nat Protoc1: 1922–192817487177

Furrer EM, Ronchetti MF, Verrey F, Pos KM (2007) Functional characterization of a NapA Na(+)/H(+) antiporter from Thermus thermophilus.. Febs Letters581: 572–57817254570

Rath A, Glibowicka M, Nadeau VG, Chen G, Deber CM (2009) Detergent binding explains anomalous SDS-PAGE migration of membrane proteins. Proc Natl Acad Sci U S A106: 1760–176519181854

Strop P, Brunger AT (2005) Refractive index-based determination of detergent concentration and its application to the study of membrane proteins. Protein Sci14: 2207–221116046633

Slotboom DJ, Duurkens RH, Olieman K, Erkens GB (2008) Static light scattering to characterize membrane proteins in detergent solution. Methods46: 73–8218625320

Lu M, Chai J, Fu D (2009) Structural basis for autoregulation of the zinc transporter YiiP. Nature Structural & Molecular Biology16: 1063–1081

Wei YN, Li HL, Fu D (2004) Oligomeric state of the Escherichia coli metal transporter YiiP. Journal of Biological Chemistry279: 39251–3925915258151

Hunte C, Michel H (2002) Crystallisation of membrane proteins mediated by antibody fragments. Current Opinion in Structural Biology12: 503–50812163074

Dibrov P, Rimon A, Dzioba J, Winogrodzki A, Shalitin Y, et al (2005) 2-Aminoperimidine, a specific inhibitor of bacterial NhaA Na⁺/H⁺ antiporters. FEBS Letters579: 373–37815642346

Heuberger EH, Veenhoff LM, Duurkens RH, Friesen RH, Poolman B (2002) Oligomeric state of membrane transport proteins analyzed with blue native electrophoresis and analytical ultracentrifugation. J Mol Biol317: 591–60011955011

Crichton PG, Harding M, Ruprecht JJ, Lee Y, Kunji ER (2013) Lipid, detergent, and Coomassie Blue G-250 affect the migration of small membrane proteins in blue native gels: mitochondrial carriers migrate as monomers not dimers. J Biol Chem288: 22163–2217323744064

Appel M, Hizlan D, Vinothkumar KR, Ziegler C, Kuhlbrandt W (2009) Conformations of NhaA the Na⁺/H⁺ Exchanger from Escherichia coli, in the pH-Activated and Ion-Translocating States (vol 386, pg 351, 2009). Journal of Molecular Biology388: 659–67219396973

Gerchman Y, Rimon A, Venturi M, Padan E (2001) Oligomerization of NhaA, the Na⁺/H⁺ antiporter of Escherichia coli in the membrane and its functional and structural consequences. Biochemistry40: 3403–341211258962

Inoue H, Noumi T, Tsuchiya T, Kanazawa H (1995) Essential aspartic acid residues, Asp-133, Asp-163 and Asp-164, in the transmembrane helices of a Na⁺/H⁺ antiporter (NhaA) from Escherichia coli. FEBS Lett363: 264–2687737413

Padan E, Kozachkov L, Herz K, Rimon A (2009) NhaA crystal structure: functional-structural insights. J Exp Biol212: 1593–160319448069

Călinescu O, Danner E, Bohm M, Hunte C, Fendler K (2014) Species differences in bacterial NhaA Na⁺/H⁺ exchangers. Febs Letters. In press.

Lee C, Kang HJ, von Ballmoos C, Newstead S, Uzdavinys P, et al (2013) A two-domain elevator mechanism for sodium/proton antiport. Nature501: 573–57723995679

[Back]

Figure 1. Expression of S. Typhimurium nhaA complements salt-sensitive phenotype of Na⁺/H⁺ antiporter deficient E. coli strain EP432.

Growth characteristics were monitored in microscale liquid growth complemention assays. Cells transformed with pTTQ18A1 (a) and with pTTQ18A1-STNhaA (b) were grown on LBK medium (67 mM KCl) as control. Salt-stress was induced with 200 mM NaCl, 200 mM LiCl, or 800 mM NaCl supplemented media buffered at pH 7.5. Triplicate samples were averaged and standard deviations for each trace ranged between 0.3 and 2.3%. Basal expression levels without chemical induction were used for the complementation assays. The leaky expression system resulted in substantial STNhaA production in cultures as used in (b). NhaA was detected by Western-immunoblot with anti-His-tag antibodies after SDS-PAGE separation of total cell extracts after 8 h (A) and 22 h (B) cultivation. As a control, cells were transformed with pTTQ18A1 and cultivated in LBK medium for 22 h (C).

[Back]

[Back]

Figure 2. Purity and oligomeric state of STNhaA. (a) IMAC-purified STNhaA probed by SDS-PAGE analysis, Western-immunoblot and BN-PAGE.

Shown is the silver-stained gel (12% Bis/Tris gel) after electrophoretic separation of 200 ng of STNhaA (left panel, left lane). Molecular masses of co-separated standard proteins are indicated in kDa. NhaA (33 kDa) and its SDS-resistant oligomer (53 kDa) were positively probed in Western-immunoblot with anti-His-tag antibodies (left panel, right lane). Coomassie-stained gel (4–16% Bis/Tris gel) after BN-PAGE analysis of 7 µg of IMAC purified STNhaA (right panel). The molecular masses of co-separated standard proteins are indicated on the left in kDa. (b) Chromatogram of SEC-MALLS analysis of β-DDM solubilized STNhaA. 80 µg of IMAC-purified STNhaA were applied to size-exclusion chromatography on a Superdex 200 column. The chromatogram shows detector readings of the 90 light scattering detector, the UV₂₈₀ detector, and the refractive index detector in black, dark gray and light gray, respectively. The horizontal black lines indicate the calculated mass of STNhaA, detergent micelle, STNhaA/detergent complex and indicate a high degree of monodispersity throughout the elution peak.

[Back]

[Back]

Figure 3. Kinetic characterization of STNhaA.

(a) Transient electrical currents generated by purified STNhaA reconstituted in proteoliposomes using SSM-based electrophysiology after 10 mM Na⁺ and Li⁺ concentration jumps at pH 8.5. The buffers contained 25 mM Tris/25 mM MOPS/25 mM HEPES pH 8.5 (Tris), 290 mM KCl and 0.1 mM DTT. In addition, the activating and the nonactivating solutions contained 10 mM NaCl and KCl, respectively. The dashed line shows inhibition of the NaCl concentration jump signal with 25 µM 2-aminoperimidine. (b) The pH dependence of STNhaA peak currents after a 100 mM Na⁺ concentration jump. The buffers contained 25 mM Tris/25 mM MOPS/25 mM HEPES at pH values indicated (HCl or Tris), 200 mM KCl and 0.1 mM DTT. In addition, the activating and the non-activating solutions contained 100 mM NaCl and KCl, respectively. The dashed line represents the corresponding pH dependence of EcNhaA [20], [21].

[Back]

[Back]

Figure 4. Na⁺ concentration dependence of STNhaA peak currents after a Na⁺ concentration jump of the indicated concentration at pH 8.5 and pH 7.0.

Experiments were performed with reconstituted STNhaA as in Fig. 3. The buffers contained 25 mM Tris/25 mM MOPS/25 mM Hepes pH 8.5 or 7.0 (adjusted with HCl at pH 7.0 or Tris at pH 8.5). In addition, the activating solution contained×mM of NaCl with (300-x) mM background of KCl, the non-activating solution only 300 mM KCl. Currents were normalized and averaged from 3 different data sets as described in Materials and Methods. The solid line is a fit to the data using hyperbolic concentration dependence. The respective Km values for Na⁺ are indicated in the figure.

[Back]

[Back]

Figure 5. Probing competitive K⁺ inhibition of the peak currents generated by STNhaA after a Na⁺ concentration jump.

Experiments were performed with reconstituted STNhaA as in Fig. 3. The buffers contained 25/25 mM MOPS/25 mM HEPES pH 8.5 (adjusted with Tris). In addition, the activating solution contained×mM of NaCl with (300-x) mM background of KCl (black squares) or CholCl (green circles), the non-activating solution only 300 mM KCl or CholCl. The red line shows a fit to the data obtained with KCl background. Three independent measurements with KCl and CholCl were perfomed, normalized and averaged as described in Experimental Procedures. The saturating currents determined before normalization for KCl and CholCl are indicated.

[Back]