PLoS ONE

PLoS One. 13(1): e0191423

An AKAP-Lbc-RhoA interaction inhibitor promotes the translocation of aquaporin-2 to the plasma membrane of renal collecting duct principal cells

Katharina Schrade, Investigation, Methodology¹, Jessica Tröger, Investigation, Methodology¹, Adeeb Eldahshan, Investigation, Methodology¹, Kerstin Zühlke, Investigation, Methodology¹, Kamal R. Abdul Azeez, Conceptualization, Investigation², Jonathan M. Elkins, Conceptualization, Investigation, Writing – review & editing², Martin Neuenschwander, Investigation³, Andreas Oder, Investigation³, Mohamed Elkewedi, Investigation, Methodology, Writing – original draft¹, Sarah Jaksch, Investigation, Methodology¹, Karsten Andrae, Investigation⁴, Jinliang Li, Investigation⁵, Joao Fernandes, Investigation¹, Paul Markus Müller, Investigation¹, Stephan Grunwald, Investigation¹, Stephen F. Marino, Investigation¹, Tanja Vukićević, Investigation¹, Jenny Eichhorst, Investigation³, Burkhard Wiesner, Conceptualization, Data curation, Formal analysis, Methodology³, Marcus Weber, Conceptualization, Writing – review & editing⁴, Michael Kapiloff, Conceptualization, Writing – review & editing⁵, Oliver Rocks, Writing – review & editing¹, Oliver Daumke, Conceptualization, Writing – review & editing¹, Thomas Wieland, Conceptualization, Data curation, Writing – review & editing⁶⁷, Stefan Knapp, Conceptualization, Writing – review & editing²⁸⁹, Jens Peter von Kries, Conceptualization, Data curation, Writing – review & editing³, http://orcid.org/0000-0003-4004-5003Enno Klussmann, Conceptualization, Funding acquisition, Methodology, Project administration, Resources, Supervision, Validation, Writing – original draft¹¹⁰*

Rafael Garcia-Mata, Editor

1. Max Delbrück Center for Molecular Medicine Berlin (MDC), Berlin, Germany

2. Structural Genomics Consortium, University of Oxford, Oxford, United Kingdom

3. Leibniz-Forschungsinstitut für Molekulare Pharmakologie (FMP), Berlin, Germany

4. Zuse Institute Berlin (ZIB), Germany

5. University of Miami Miller School of Medicine, Miami, United States of America

6. Institute of Experimental Pharmacology and Toxicology, Medical Faculty Mannheim, Heidelberg University, Heidelberg, Germany

7. DZHK (German Centre for Cardiovascular Research), partner site Heidelberg/Mannheim, Germany

8. Institute for Pharmaceutical Chemistry and Buchmann Institute, Goethe University, Frankfurt, Germany

9. DKTK (German Cancer Center Network), partner site Frankfurt/Main, Germany

10. DZHK (German Centre for Cardiovascular Research), partner site Berlin, Germany

University of Toledo, UNITED STATES

Competing Interests: The authors have declared that no competing interests exist.

* E-mail: enno.klussmann@mdc-berlin.de

DOI: 10.1371/journal.pone.0191423

Published online: 26 January 2018

Abstract

Stimulation of renal collecting duct principal cells with antidiuretic hormone (arginine-vasopressin, AVP) results in inhibition of the small GTPase RhoA and the enrichment of the water channel aquaporin-2 (AQP2) in the plasma membrane. The membrane insertion facilitates water reabsorption from primary urine and fine-tuning of body water homeostasis. Rho guanine nucleotide exchange factors (GEFs) interact with RhoA, catalyze the exchange of GDP for GTP and thereby activate the GTPase. However, GEFs involved in the control of AQP2 in renal principal cells are unknown. The A-kinase anchoring protein, AKAP-Lbc, possesses GEF activity, specifically activates RhoA, and is expressed in primary renal inner medullary collecting duct principal (IMCD) cells. Through screening of 18,431 small molecules and synthesis of a focused library around one of the hits, we identified an inhibitor of the interaction of AKAP-Lbc and RhoA. This molecule, Scaff10-8, bound to RhoA, inhibited the AKAP-Lbc-mediated RhoA activation but did not interfere with RhoA activation through other GEFs or activities of other members of the Rho family of small GTPases, Rac1 and Cdc42. Scaff10-8 promoted the redistribution of AQP2 from intracellular vesicles to the periphery of IMCD cells. Thus, our data demonstrate an involvement of AKAP-Lbc-mediated RhoA activation in the control of AQP2 trafficking.

Introduction

Antidiuretic hormone (arginine-vasopressin, AVP) stimulates vasopressin V2 receptors (V2R) on the surface of renal collecting duct principal cells, and thereby triggers the redistribution of the water channel, aquaporin-2 (AQP2) from intracellular vesicles into the plasma membrane. The membrane insertion of AQP2 facilitates water reabsorption from primary urine and fine-tunes body water homeostasis [1–5]. Defects of the mechanism lead to diabetes insipidus (DI), a disease characterized by a massive loss of hypotonic urine and by polydipsia. DI can be caused by mutations in the V2 receptor or AQP2 genes or can be acquired, for example, as a consequence of lithium treatment of bipolar disorders. Molecular mechanisms underlying the AVP-induced redistribution of AQP2 are not well understood and targeted treatments of DI are not available. Thus, elucidating molecular mechanisms controlling AQP2 not only provides insight into the mechanism itself but can also pave the way to new concepts for the therapy of water balance disorders such as DI [6, 7].

On the molecular level, AVP stimulates synthesis of cAMP and activation of protein kinase A (PKA). The subsequent PKA-catalyzed phosphorylation of AQP2 at serine (S)256 is considered the key trigger for its redistribution into the plasma membrane [8–14]. In addition, AVP mediates phosphorylations of S264 and S269, which are associated with a predominant plasma membrane localization of AQP2 [15–20], and the dephosphorylation of S261 [15, 18, 21]. The dephosphorylation is associated with decreased poly-ubiquitination and proteasomal degradation and an enhanced abundance of AQP2, and thus contributes to the increase in water reabsorption from primary urine in response to AVP [22].

GTPases are molecular switches cycling between an inactive, GDP-bound and an active, GTP-bound state. RhoA is a small GTPase of the Rho family, which includes Rho, Cdc42 and Rac isoforms. We have previously shown that active RhoA maintains the F-actin cytoskeleton as a physical barrier hindering AQP2-bearing vesicles from reaching the plasma membrane of principal cells under resting conditions [23]. An elevation of cAMP causes PKA-mediated phosphorylation of RhoA, its increased interaction with Rho guanosine nucleotide dissociation inhibitor (GDI) and thus RhoA inhibition [24]. The inhibition is associated with de-polymerization of F-actin and the redistribution of AQP2 to the plasma membrane [14, 23, 25]. How RhoA in resting cells is maintained in an active form is unclear.

The exchange of GDP for GTP and thus activation of GTPases is catalyzed by guanine nucleotide exchange factors (GEFs). The A-kinase anchoring protein (AKAP)-lymphoid blast crisis (Lbc) is a member of the AKAP family of scaffolding proteins. The common property of AKAPs is their ability to directly bind PKA and tether the AKAP-PKA complex to defined cellular compartments to coordinate cellular signaling events spatially and temporally. We had shown that the tethering of PKA by AKAPs is a prerequisite for the AVP/PKA-induced redistribution of AQP2 to the plasma membrane and that PKA is anchored to AQP2-bearing vesicles by AKAP18δ [12, 13, 26, 27]. AKAP-Lbc is the only AKAP which possesses a GEF activity. It selectively activates RhoA but not the other Rho family members, Rac and Cdc42 [28]. The GEF activity is conferred by a GEF domain comprising a tandem Dbl homology (DH) and pleckstrin homology (PH) domain [29–31]. Two distinct pockets of the DH domain directly interact with RhoA and catalyze the exchange of GDP for GTP. PH domains can control the localization and/or the activity of DH domains [29]. The PH domain of AKAP-Lbc does not affect its activity [31]. Upon an elevation of cAMP in HEK293 cells, AKAP-Lbc-bound PKA phosphorylates AKAP-Lbc at S1565 recruiting a 14-3-3 protein and inhibiting the GEF activity [32]. The rat orthologue of AKAP-Lbc, Rt31, is expressed in primary rat inner medullary collecting duct principal (IMCD) cells, a model for the AVP-induced redistribution of AQP2, and forms a complex with RhoA [5, 33]. However, whether AKAP-Lbc-mediated activation of RhoA plays a role in the control of AQP2, in particular in resting cells, is unknown.

Materials and methods

Antibodies

The following antibodies were used for Western blotting: AKAP-Lbc (Abcam; #ab99377; 1:1000), Aquaporin-2 (AQP2) (Santa Cruz; #9882,C17; 1:1000), Hsp90 (Stressgen; #SPA-830; 1:1000), Pan-Cadherin (Abcam; #ab6528; 1:1000), RhoA (Santa Cruz; #sc-418, 1:1000), Cdc42 (Cell Signaling, #2462; 1:1000 for Western blot, 1:250 for PAK-1 pull down), Rac-1 (BD Transduction Laboratories, #610650, 1:1000 for Western blot, 1:250 for PAK-1 pull down), anti-Flag, M2 monoclonal antibody (Sigma, 2 μg/ml), anti-G12QL antibody (rabbit; Gramsch, 1:1000), Peroxidase (POD)-anti-goat IgG (Jackson ImmunoResearch Laboratories; #705-035-147; 1:10,000), POD-anti-mouse IgG (Jackson ImmunoResearch Laboratories; #715-035-151; 1:10,000), POD-F(ab')2-anti-rabbit IgG (Jackson ImmunoResearch Laboratories; #711-036-152; 1:10,000). The following antibodies were used in HTRF assays: GST antibody, coupled to terbium (Donor; Cisbio Bioassays, Codolet, France; #MAb GSS11), His₆-tag antibody, coupled to XL665 (Acceptor; Cisbio Bioassays; #MAb HIS-1). In immunofluorescence microscopy, AQP2 was detected with antibody H27 (1: 600) [12, 34] and Cy3-anti-Rabbit IgG (Jackson ImmunoResearch Laboratories; #211-165-109; 1:300). Nuclei were detected with 4’, 6-Diamidine-2’-phenylindole dihydrochloride (DAPI; Roche Diagnostics GmbH; Mannheim, Germany; #10236276001; 1:100) and F-actin was visualized using Alexa Fluor 647-Phalloidin (Invitrogen; Darmstadt, Germany); #A22287; 1:30).

Protein expression and purification

Purified His₆-RhoA (human RhoA, NP_001655.1, NCBI) and AKAP-Lbc/DHPH (aa 1923–2336 of human AKAP-Lbc; NP_006729.4, NCBI) were used in the GEF assay. Purified GST-RhoA (human RhoA, NP_001655.1) and His₆-AKAP-Lbc/DHPH (aa 1972–2342 of human AKAP-Lbc; NP_006729.4) were used in the HTRF assay (Fig 2 in S2 in S1 File).

RhoA was expressed as an N-terminal His₆-tag fusion from a pET30α plasmid (kindly provided by D. Diviani, University of Lausanne), and AKAP-Lbc/DHPH was expressed from a pPal7 plasmid in E. coli Rosetta (DE3). Bacteria were grown in LB medium and protein expression was induced at an optical density at 600 nm of 0.7–0.9 with 1 mM isopropyl-β-D-thiogalactoside (IPTG). The cells were grown overnight at 16 °C, centrifuged and suspended in protein purification buffer (150 mM NaCl, 10 mM Na₂HPO₄, pH 7.4, 5 mM EDTA) and lysed using a fluidiser (Microfluidics; Newton, US). Lysates were centrifuged (40,000xg, 30 min, 4 °C), and the soluble extract was filtered and purified with the ProfiniaTM affinity chromatography protein purification system (BioRad, Munich, Germany) according to manufacturer’s instructions. His₆-RhoA was eluted in buffer containing 300 mM KCl, 50 mM KH₂PO₄, pH 8.0, 250 mM imidazole and AKAP-Lbc/DHPH in buffer containing 100 mM Na₃PO₄, pH 7.2, 100 mM NaCl. Relevant fractions were pooled, proteins concentrated and snap-frozen in liquid nitrogen. The final yield was 20–30 mg protein/l bacterial culture.

GFP-AKAP-Lbc-His₆ was isolated from HEK293-EBNA cells. 24 h post transfection, the medium volume was doubled and peptone added to a final concentration of 0.5%. After 6 days, cells were lysed and the supernatant concentrated in Amicon tubes (10,000 molecular weight cut-off) to a final volume of 12.5 ml. The soluble extract was filtered and subjected to gel filtration (Superdex200 column). The protein was eluted with gel filtration buffer (50 mM HEPES, pH 7.4, 300 mM NaCl; flow rate 1 ml/min). Relevant fractions were pooled, the protein concentrated and snap-frozen in liquid nitrogen.

Guanine nucleotide exchange (GEF) assay

His₆-RhoA and AKAP-Lbc/DHPH (2 μM each) were incubated with the fluorescently labeled nucleotide analogue 2’/3’-O-(N-Methyl-anthraniloyl)-GTP (mant-GTP) in 1 μM concentration in GEF buffer (40mM Tris, pH 7.5; 100 mM NaCl; 20 mM MgCl₂; 100 μg/ml bovine serum albumine (BSA)). Fluorescence was recorded for 15 min in a 384-well plate in a microplate reader (Tecan, Safire; Durham, US) at 440 nm (360 nm excitation wavelength).

High-throughput screening

The ChemBioNet [35] and CBB2 compound libraries at the Leibniz-Forschungsinstitut für Molekulare Pharmakologie (FMP), in total 18,431 compounds, were screened using the nucleotide exchange assay depicted in Fig 1A. All library compounds are accessible at http://www.fmp-berlin.de, and further information on every compound is available at http://www.ncbi.nlm.nih.gov/pccompound. For all dispensing and washing steps an EL406 washer/dispenser combination (BioTek Instruments, Bad Friedrichshall, Germany) was used. The screen was performed in a 384-well plate format. Obtained data were automatically analyzed as described [35–37]. Z score describes the distance of a sample signal to the mean of all other samples on the plate in units of standard deviation. Percent inhibition describes the relative strength of the signal compared to means of the control samples on the plate (where samples in column 23 received only DMSO and were set to 0% inhibition, and samples in column 24 did not receive GEF and were set to -100%). Samples with a Z score < -3 were considered as potential inhibitors (655 samples). For quality control purposes, Z’-factors describing the effective signal window were calculated for each plate based on the control samples. The Z’-factor was on average 0.51, indicating reliable screening conditions. Potential inhibitors were subjected to a second round of GEF assay for confirming concentration-dependent effects. Compound identity and purity of samples used in this secondary screen were validated by mass spectrometric analysis.

Fig 1View larger versionFig 1. Identification of a small molecule inhibitor of the AKAP-Lbc-mediated activation of RhoA.(A) Principle of the nucleotide exchange assay for the screening. The DHPH domain of the RhoA-specific guanine nucleotide exchange factor (GEF) AKAP-Lbc and RhoA were generated as recombinant proteins. The DHPH domain-catalyzed exchange of GDP for the fluorescent mant-GTP was monitored at the emission wavelength of RhoA-bound mant-GTP at 440 nm. (B) The fluorescence signal intensity changes were determined for all samples including positive and negative controls and percent inhibitions calculated based on the controls. The screening data quality was evaluated as distribution of percent inhibition of all tested compounds and by calculating the Z’-factors for each plate, which were found to be 0.51 on average. (C) Using the GEF assay from (A), 18,431 small molecules were screened for inhibitors of the nucleotide exchange; 100 hits were identified of which 26 candidates were validated. The most promising hit was the compound Scaff10 (structure indicated). (D) Nucleotide exchange assay with Scaff10 and two further hits (for details see S1 Table). IC₅₀ values for the inhibition are indicated.

Synthesis of compounds

Starting materials and solvents for synthesis were purchased from Sigma-Aldrich Chemie GmbH (Munich, Germany), Otava Chemicals (Ontario, CA), Fluka (Munich, Germany), Acros (Geel, Belgium), and ALFA Aesar (Karlsruhe, Germany). For high-performance liquid chromatography (HPLC) and liquid chromatography-mass spectrometry (LC/MS) measurements, acetonitrile (ACN) and methanol (HPLC grade) from J. T. Baker (Center Valley, US) and purified water (Milli-Q-Plus from Millipore) were used. Deuterated solvents for nuclear magnetic resonance (NMR) spectroscopy were purchased from Deutero GmbH (Kastellaun, Germany).

The synthesis of all compounds is described in detail in the Supporting Information. The chemical synthesis of Scaff10 derivatives followed the scheme shown below in Fig 2. Under neutral reaction conditions, acetophenones (1) were transformed into the corresponding α-iodoketones (2) by addition of iodine in methanol (a). Addition of Na₂SO₃-solution (b) reduced excessive iodine to iodide. 7-Hydroxycoumarin derivatives were synthesised based on the Pechmann condensation: in an initial reaction step, resorcinol (3) and diethyl-2-acetylglutarat (4) reacted to the corresponding phenolester in ethanolic HCl (c). Following a Michael addition, the enol form of the acid catalysed keto-enol tautomerisation was nucleophilically attacked by the aromatic system. Finally, rearomatisation and acid-induced condensation yielded the product of the 7-hydroxycoumarin derivative ethyl 3-(7-hydroxy-4-methyl-2-oxo-chromen-3-yl)propanoate (5a). In the presence of potash in excess in acetone (d), 7-hydroxycoumarins (5) reacted with α-haloketones (2) in a Williamson ether synthesis at 55°C overnight to the corresponding substituted 2-oxoethers (6) [38], representing class 6 Scaff10 derivatives. After ester saponification to the carboxylate by adding 1 M sodium hydroxide, Scaff10 derivatives of class 7 were formed. Reaction conditions ranged from 55–95°C and from 0.3-16 hours (e). Cyclisation of Scaff10 derivatives of class 7 to the corresponding furocoumarin derivatives (8) (Scaff10 derivative class 8) was carried out under further heating in NaOH solution (60–110°C) for 0.75–10 h (f). The reaction conditions required for the synthesis of Scaff10 derivatives of class 7 and 8 are indicated.

Fig 2View larger versionFig 2. The small molecule Scaff10-8 inhibits the interaction of the DH domain of AKAP-Lbc and RhoA.(A). Principle of homogenous time-resolved fluorescence (HTRF) assay. Recombinant His-AKAP-Lbc/DHPH and GST-RhoA were generated. The tags are recognized by specific antibodies coupled to fluorescent dyes. When the two proteins interact, donor and acceptor dyes of the antibodies are in close proximity, energy transfer occurs upon excitation at 320 nm and a FRET signal is detected (665 nm). If a compound disrupts the interaction of the DHPH domain and RhoA, the proximity of the fluorescent moieties remains insufficient for a FRET signal to occur. (B) In the HTRF from (A), Scaff10-8 inhibited the interaction of AKAP-Lbc/DHPH and RhoA with an IC₅₀ = 34.1 μM whereas Scaff10-59 did not (example of a negative Scaff10 derivative). As expected, excess untagged Rho decreases the binding between GST-RhoA and His-AKAP-Lbc/DHPH in a dose-dependent manner (lower left panel). Scaff10-8 does not interact with a His-GST fusion protein, excluding any interference of the tags or antibodies used in this assay with Scaff10-8. n = 3–15 independent experiments in duplicate; IC₅₀ values are indicated. (C) The influence of Scaff10-8 on the interaction of RhoA with the recombinant DH domain of AKAP-Lbc in the absence of the PH domain was determined by Alpha screen. Scaff10-7/59 was included as negative controls as they did not interfere with interaction of the DHPH domain and RhoA in the HTRF shown in Fig 2. n = 3–15 independent experiments in duplicate. The IC₅₀ value is indicated.

Scaff10 derivatives were classified into uncondensed (6, 7) and furan (8) derivatives (opening of the furan in position g of the coumarin structure). Class 6 and 7 differ in position 3 of the coumarin structure: class 6 is substituted with either a propionic acidester or with a methyl group whereas class 7 exhibits a carboxylic group at a C1-C5 spacer between coumarin and carboxylic acid at this position.

Solubility of Scaff10 derivatives was assessed nephelometrically. Scaff10 derivatives are moderately to poorly soluble in aqueous solutions due to their large number of aromatic rings having lipophilic character. Details about NMR, LC/MS and HPLC characterization steps are given in the Supplemental Information.

Homogeneous time-resolved fluorescence (HTRF) assay

The assay was essentially carried out as described [39]. Scaff10 derivatives were added to His₆-AKAP-Lbc/DHPH protein (250 nM final concentration) in HTRF buffer (PBS; 4 mM MgCl₂; 0.05% Tween 20) in 384 well plates (Proxiplate-384 Plus, white, #6008289; Perkin Elmer LAS, Rodgau, Germany). Concentrations of Scaff10 derivatives ranged between 1.56–200 μM (2% DMSO final concentration); HTRF buffer with 2% DMSO served as a control. GST-RhoA (30 nM final concentration) in HTRF buffer and anti-GST antibody coupled to terbium (donor) and anti-His₆-tag antibody coupled to XL665 (acceptor) were added to all wells (final antibody concentration: 2 μg/ml). After 1 h incubation at room temperature in the dark, FRET signals were recorded at 620 and 665 nm using a Genios Pro plate reader (Tecan Austria GmbH, Grödig, AT) and the ratios of absorbance of 650 nm to 620 nm were calculated. Wells containing no compound were set to 100% interaction of AKAP-Lbc/DHPH with RhoA, wells containing GST-RhoA only (without His₆-AKAP-Lbc/DHPH) were set to 0% interaction. To exclude any interference of the tags and/or antibodies with Scaff10 derivatives, a His₆-GST fusion protein replaced the two tagged proteins in a control assay. Wells containing His₆-GST fusion protein were set to 100% interaction of His₆-GST, wells containing no fusion protein were set to 0% interaction.

Alpha screen assay

Assays were performed according to the manufacturer’s protocol (PerkinElmer) with minor modifications. All reagents were diluted in buffer containing 25 mM Hepes, pH 7.4, 100 mM NaCl, 0.1% bovine serum albumin, 0.05% CHAPS and 50 μM GDP and allowed to equilibrate to room temperature before addition to plates. The assays were run in 20 μL volumes in low-volume 384-well plates (ProxiPlate-384 Plus, PerkinElmer, USA) at RT. The proteins used were N-terminally His6-tagged AKAP-Lbc-DH domain and C-terminally biotinylated RhoA. To determine ideal assay concentrations of the two proteins, 4 μL volumes of RhoA were incubated with 4 μL His-AKAP-Lbc-DH domain (0–16 μM of each; final assay concentrations: 0–3.2 μM) in 4 μL buffer for 30 min at RT in foil-sealed plates. 8 μL of assay buffer containing donor and acceptor beads at 1:400 dilution was then added, the plate was incubated in the dark for 60 min and then read on a PheraStar FS plate reader (BMG Labtech, Germany) using an AlphaScreenTM 680 excitation/570 emission filter set.

For compound IC₅₀ measurement, a dilution series of the compound dissolved in DMSO in 0.4 μL total volume (final assay concentrations 200 μM to 0.125 μM) were made into the assay plate using an Echo dispenser (Labcyte, California, USA). 11.6 μL of a solution containing 100 nM RhoA and 200 nM AKAP13 in assay buffer was added and incubated with the compounds for 30 min at RT in foil-sealed plates. 8 μL of assay buffer containing donor and acceptor beads at 1:400 dilution was added. The plate was incubated in the dark for 60 min and then read on a PheraStar FS plate reader. Alternatively, for counter-screening of the compounds, 11.6 μL of 75 nM biotinylated and His6-tagged linker peptide (PerkinElmer) was added instead of the protein solution.

Microscale thermophoresis (MST)

The final concentration of GFP-AKAP-Lbc/DHPH was set to 150 nM, 95% LED and 80% MST laser power. The final concentration of Red-NHS-labelled RhoA (647-RhoA; labelling performed according to manufacturer’s instructions; MonolithTM Protein Labeling Kit RED-NHS (Amine Reactive; #MO-L001; NanoTemper Technologies GmbH, Munich, Germany) was set to 100 nM, 20% LED and 20% MST laser power. Thereby, the fluorescence intensity measured for each fluorescent protein was comparable (100–150 fluorescence units). Final concentrations of Scaff10 derivatives ranged from 12.21 nM to 200 μM, control wells received 2% DMSO. For controls, His₆-AKAP-Lbc/DHPH and unlabeled RhoA were added in concentrations of 17.70 nM– 290 μM and 36.01 nM– 590 μM, respectively, in MST buffer (without DMSO). The samples were incubated in the dark for 1 h incubation at room temperature, and measured with 30 sec laser-on and 5 sec laser-off time at a Monolith NT.115 device (NanoTemper). Measured fluorescence (F) was normalised (Fhot/Fcold = Fsteady state/Finitial state, Fig 3). Values of thermophoresis + T-jump were related to average of each measurement row (16 capillaries). Final values are given as ‰.

Fig 3View larger versionFig 3. Scaff10 derivatives.(A) Overview of the synthesis of Scaff10 derivatives. By addition of iodine in methanol (a), acetophenone derivatives (1) reacted with the corresponding α-iodoketones (2a), removal of excessive iodine by addition of Na₂SO₃-solution (b). Resorcinol (3) and diethyl-2-acetylglutarat (4) were transformed into the 7-hydroxycoumarin derivative ethyl 3-(7-hydroxy-4-methyl-2-oxo-chromen-3-yl)propanoate (5a) in ethanolic HCl (c). In the presence of excess potash, 5 reacted with α-haloketone derivatives (2) in a Williamson ether synthesis at 55°C in acetone (d) to 6. Saponification to 7 was carried out in 1 M NaOH at 55–95°C and from 0.3–16 h (e). Final cyclization of ketones to furocoumarin derivatives (8) was carried out upon further heating in NaOH solution (60–110°C) for various times (0.75–10 h) (f). R is indicated in Table 1 and (C). (B) Compounds of the generalized structures 6–8 from (A) were allocated into classes 6–8, respectively. (C) Structures of Scaff10 derivatives, which inhibit the AKAP-Lbc/DHPH-RhoA interaction in the homogenous time-resolved fluorescence (HTRF) assay depicted in Fig 3A and B. IC₅₀ values (μM ± SEM) were obtained from n = 3–15 independent HTRF experiments carried out in duplicate (S3 Table). Structural differences compared to Scaff10-8 are shown in grey. R² indicates the coefficient of determination.

Isothermal titration calorimetry (ITC)

ITC measurements were essentially carried out as previously described [40]. The stabilizing RhoA mutant F25N [41] was purified as a GST-RhoA fusion in its GDP-bound form (final gel filtration purification step in 20 mM HEPES, pH 7.5, 150 mM NaCl, 2 mM DTT, 50 μM GDP). In order to exchange GDP against GTPγS, GST-RhoA loaded with GDP was incubated for 20 min in ITC nucleotide exchange buffer (50 mM HEPES, pH 7.5, 20 mM EDTA) at 25°C followed by three dilution and concentration steps in Amicon tubes (10,000 MWCO) using ITC dialysis buffer (50 mM HEPES, pH 7.4, 150 mM NaCl, 5 mM MgCl2, 2 mM β-mercaptoethanol). The nucleotide-loading state was confirmed by HPLC. All proteins used in ITC measurements were dialyzed overnight against ITC dialysis buffer. Protein concentrations were determined with NanoDrop ND-1000. GDP or GTPγS (final concentration 2 mM) and DMSO (2%) were added to the proteins prior to the ITC measurements. Scaff10-8 was dissolved in the same buffer (including 2% DMSO and 2 mM GDP or GTPγS). ITC measurements were performed on a VP-ITC (GE Healthcare, München, DE) at 15°C. Titrations were conducted using 14.8 μM Scaff10-8 in the cell and 235 μM (GST control), 222 μM (GST-RhoA, GDP-bound) or 210 μM (GST-RhoA, GTPγS-bound) in the syringe. The cell was stirred at 351 rpm and a total of 27 x 10 μl injections were added to the cell, separated by 240 s of equilibration. The data were fitted using the Microcal Origin software (version 7.0) and a one-site binding model. We consistently observed a binding number close to N = 0.5 (RhoA/Scaff10-8). This observation may be due to the binding of two molecules of Scaff10-8 per one molecule of GST-RhoA for both the GDP-bound and GTPγS-bound form of GST-RhoA, or due to some inaccuracy in the determination of protein or compound concentrations. The data were thus fitted using a fixed binding number of N = 0.5.

MTS cytotoxicity assay

The potential cytotoxicity of Scaff10-8 on primary IMCD and several permanent cell lines (MCF7, H9C2, HEK293, MCD4) was assessed using the tetrazolium compound-based CellTiter 96 AQueous One Solution Cell Proliferation (3-(4,5-dimethylthiazol-2-yl)-5-(3-carboxymethoxyphenyl)-2-(4-sulfophenyl)-2H-tetrazolium) (MTS) assay according to the instructions of the manufacturer. In brief, the cells were seeded into 96 well plates (5,000 cells per well) and cultured in their appropriate medium Scaff10-8 (100 μM, 30 μm and 3 μm, 0.3% final DMSO concentration) were added, DMSO (0.3%) was included as a control. Staurosporine (1 μM) was included as a positive control. All conditions were tested in quadruplicate. At the indicated time points, the MTS reagent was added. Absorption was determined 4 h after addition of MTS reagent at 450 nm wavelength. The MST reagent absorbance at 450 nm is proportional to the amount of living cells. A blank measurement determined the medium absorption (background). Values were normalized to untreated cells after 24 h for each cell line.

Luciferase assay

Luciferase reporter gene assays were performed with the Dual Luciferase Reporter Assay System (Promega) according to manufactures protocol and as previously reported [42]. In brief, HEK293 cells were seeded and co-transfected with the indicated plasmids together with pSRE.L reporter plasmid encoding firefly luciferase (kindly provided from Dr J. Mao and Dr. D. Wu, Rochester, NY) and pRL-TK control vector (Promega, Mannheim, Germany) encoding renilla luciferase. The transfected cells were further cultured in DMEM with 0.5% FCS for 24 h, lysed with passive lysis buffer (Promega). Luciferase activities was measured an Envision Instrument (Perkin Elmer, Rodgau, Germany) in white 96-well plates. N-terminally flag-tagged LARG and PDZ-RhoGEF are encoded in the vector pCMV2b, kindly provided by Stefan Offermanns (Max-Planck-Institut für Herz- und Lungenforschung, Bad Nauheim, Germany; [43]). Western blotting for the detection of Flag was carried out with primary anti-Flag, M2 monoclonal antibody (Sigma, 2 μg/ml). G12QL was in pCDNA3, purchased from cDNA.org. In Western blots, the protein was detected with primary polyclonal antibody (rabbit; Gramsch, 1:1000). The vector pEGFP-N1 encoding GFP-tagged AKAP-Lbc was kindly provided by Dr. J. Scott (University of Washington, Seattle, USA; [28]). AKAP-Lbc was detected with a specific anti-AKAP-Lbc antibody (Abcam; #ab99377; 1:1000). For transfection in the luciferase assay, 30 ng of each AKAP-Lbc, LARG or PDZ-RhoGEF, and 10 ng of G12QL were transfected.

Detection of AQP2 and F-actin in primary IMCD cells

Primary rat renal inner medullary collecting duct (IMCD) cells were obtained and cultured as previously described [34, 44]. AQP2 was detected with specific rabbit (H27 antibody) and secondary Cy3-coupled antibodies, and F-actin was visualized with Alexa Fluor 647-Phalloidin by laser scanning microscopy (LSM780; Zeiss Jena, Germany) as described [23].

Biotinylation of cell surface proteins

The assay was performed according to Bogum et al. [44]. IMCD cells were treated with Scaff10-8 at a concentration of 30 μM for 1 or 24 h (0.3% DMSO final concentration). DMSO (0.3%) was used as a control for the 24 h of incubation. Cells were stimulated with forskolin (30 min, 30 μM). Cells were washed twice with ice-cold PBS and incubated with biotinylation buffer (500 μg Biotin per well; 10 mM triethanolamine; 150 mM NaCl; 1 mM MgCl₂; 0.1 mM CaCl₂; pH 8.0) for 60 min at 4°C. After two washing steps with biotinylation buffer, cells were incubated for 10 min with quenching buffer (50 mM NH₄Cl in PBS) at 4°C. Lysates were prepared using biotinylation lysis buffer 1 (SLB; 0.5% Triton X-100; 0.2% BSA; Complete mini EDTA-free). Lysates were sonicated and incubated for 20 min at 37°C. Cell debris was removed by centrifugation (30 min, 15,000x g, 4°C). Lysates were incubated with 80 μl streptavidin agarose beads at 4°C overnight. Beads were washed three times with biotinylation lysis buffer 1 and 2 (SLB; 0.5% Triton X-100; Complete mini EDTA-free). Proteins were eluted using sample buffer and analyzed by Western blotting.

Western blotting and determination of RhoA, Cdc42 and Rac1 activities

Western blotting for the detection of RhoA and Hsp90 and a Rhotekin pull down for the detection of active, GTP-bound RhoA were adapted from a procedure previously described by us [23, 45]. In brief, IMCD cells were cultured as described [34], DBcAMP and nystatin were removed on day twelve after seeding by exchange of medium for medium without the compounds. On the following day, Scaff10-8 was added to a final concentration of 30 μM or, as a control, the solvent DMSO (0.3%) for 1 h. Then cells were treated with forskolin (30 μM) for an additional 30 min, and subsequently incubated at 4°C in ice-cold Rhotekin buffer (50 mM Tris, pH 7.2; 1% (w/v) Triton X-100; 0.5% sodium deoxycholate; 500 mM NaCl; 10 mm MgCl₂; PhosSTOP EASY (PhosSTOP EASY pack, Roche Diagnostics, Mannheim, DE; #REF04906837001), Complete mini EDTA-free (Complete mini EDTA-free, Roche Diagnostics, Mannheim, DE; #REF0693159001), for 10 min and lysed. Lysates (300–400 μg protein) were incubated with 300 μl of Rhotekin beads as previously described [24] Proteins were eluted from beads with Laemmli buffer and analyzed by Western blotting. Active RhoA was related to RhoA in the input fraction and the ratio to the loading control, Hsp90.

The (p21) binding domain (PBD) of p21 activated kinase 1 protein (PAK-1) spans amino acids 67–150 of PAK-1 and binds specifically to the GTP-bound Rac-1 and Cdc42. The PBD was prepared as described [46] and used for selective precipitation of the activated GTPases from IMCD cells. The PBD was expressed as a GST-fusion protein in DH5α E-coli cells, the cells were lysed using a French press, and the fusion protein was purified with Glutathione Sepharose 4 Fast Flow GST-tagged protein purification resin kit according to the manufacturer’s instructions (GE Healthcare; #17-5132-01). The PAK-1-PBD pull down was carried out with 400–500 μg protein from IMCD cell lysates. Proteins were eluted from the beads by boiling with Laemmli sample buffer, and analyzed by Western blotting. The membranes were first probed for Cdc42, and the GTP-bound active fraction of the protein was related to total Cdc42, and to the loading control GAPDH. The membranes were re-probed for Rac-1 accordingly to determine the active GTP-bound Rac-1 fraction.

Statistics

Statistical analyses were carried out using GraphPad Prism 5.0 software and a one-way ANOVA combined with a Bonferroni post hoc comparison test in order to evaluate statistical significance.

Results

A novel small molecule inhibits the AKAP-Lbc-induced activation of RhoA and the interaction of the two proteins

We aimed to develop a small molecule that prevents RhoA activation by interfering with the interaction of AKAP-Lbc and RhoA. We initiated the search for inhibitors by screening of a library of 18,431 small molecules (ChemBioNet library [35]) using a guanine nucleotide exchange assay for RhoA activation after addition of the DHPH domain of AKAP-Lbc (AKAP-Lbc/DHPH; Fig 1A and 1B). The screen identified 655 inhibitors (S1 Table in S1 File); 100 of the primary hits and 252 additional structurally related compounds from the library (1, 10 and 100 μM) were tested for dosage-dependent activity using the same assay. We were able to determine IC₅₀ values for 26 compounds. 23 initial hits were autofluorescent and thus not further considered (S2 Table in S1 File). Compound 31413 (Scaff10; Fig 1C) inhibited the AKAP-Lbc/DHPH-induced RhoA activation with the lowest IC₅₀ values in the primary screen and secondary assays (IC₅₀ = 26 μM; Fig 1D).

Initial cell-based experiments were carried out to gain insight into the specificity of Scaff10. We expressed AKAP-Lbc and various other RhoGEFs in HEK293 cells: ARHGEF25 (p63RhoGEF), Kalirin (Duet), Trio, RhoGEF, RhoGEF2, ARHGEF12 (LARG), MCF2L (Ost1), and ARHGEF11 (PDZRhoGEF). Scaff10 selectively inhibited the AKAP-Lbc-mediated activation of RhoA (Fig A in S1 in S1 File). AKAP-Lbc is selectively activated by the G protein G₁₂ [28]. A constitutively active version of G₁₂ (G₁₂QL) increased the level of active RhoA in HEK293 cells transiently expressing AKAP-Lbc. While Scaff10 abolished this activation, it did not affect RhoA activation through constitutively active Gq (GqRC; Fig B in S1 in S1 File). The data indicated specific interference of Scaff10 with AKAP-Lbc signaling. Based on these observations, Scaff10 served as a starting point for the development of a small molecule inhibitor of the AKAP-Lbc-RhoA interaction. For this, a focused library around Scaff10 comprising 54 compounds was synthesized and the structure-activity relationship elucidated.

The Structure-Activity Relationship (SAR) of Scaff10 derivatives

SARs indicate the chemical moieties of a small molecule that determine its inhibitory effects. Our focused library of 54 compounds around Scaff10 (Table 1, S3 Table in S1 File, Fig 3) and our homogeneous time-resolved fluorescence (HTRF) assay (Fig 2A) was used to obtain insight into the structure activity relationship of the identified 4-methoxyphenylfuorochromenone Scaff10 (Figs 1C and 2B; S3 Table). Twelve out of the 55 compounds inhibited the AKAP-Lbc/DHPH–RhoA interaction in our HTRF assay with IC₅₀ values ranging from 20–65 μM (Fig 2B, S3 Table in S1 File; recombinant proteins are shown in Fig 2 in S2 in S1 File). Scaff10-8 inhibited the interaction with an IC₅₀ = 34.1 μM (Fig 2B). Alpha screen assays demonstrated the inhibitory effect of Scaff10-8 on the interaction of the DH domain of AKAP-Lbc and RhoA in the absence of the PH domain (IC₅₀ = 42 μM; Fig 2C).

See full table Table 1. List of substituents R¹ and R² of Scaff10 derivatives.

During synthesis, classes 6–8 of Scaff10 derivatives were defined (Fig 3A). All inhibitors of the AKAP-Lbc/DHPH-RhoA interaction were from classes 7 and 8 (Fig 3B and 3C). The carboxylic group at a C2-spacer at R¹ seemed to be required for the inhibitory effect (R¹ and R² are shown in Table 1). R¹ in class 6 compounds was a propionic ester, which rendered the molecules inactive (no inhibitory effect of compounds in class 6, e.g. Scaff10, Scaff10-46 and Scaff10-47). The polar character as electron pair donor of the carboxylate in classes 7 and 8 was not the reason of the inhibitory effect, as a replacement against a dimethylamide (Scaff10-26) or a methylester (Scaff10-48) resulted in a complete loss of the inhibitory effect. Thus, the negative charge of the carboxylate seems highly relevant for the inhibitory effect. For further analysis of the impact of the negative charge, the carboxylic acid was substituted with hydroxamic acid. Since the quantity of negatively charged molecules depends on the pKa value of the chemical function, the differences in the pKa values should result in an altered inhibitory effect (estimated pKa value for Scaff10-8 (carboxylic acid) ~ 5; cinnamic acid (pKa = 4.44), propionic acid (pKa = 4.88); estimated pKa value for Scaff10-51 (hydroxamic acid) ~ 9, compare to acetohydroxamic acid (pKa = 8.7)). The increase of the pKa value of Scaff10-51 results in an almost complete loss of activity. In addition, the length of the spacer between carboxylic acid and coumarin at R¹ seemed relevant: shortening the spacer from two to one carbon atoms increased the IC₅₀ value to 56 ± 5 μM (Scaff10-49), extension to 5 atoms via an amide bond at R¹ also increased the IC₅₀ value (64 ± 6 μM for Scaff10-61). Hence an optimal length of the spacers between carboxylic acid and coumarin at R¹ was between 2 and 4 atoms.

Remarkably, most of the uncondensed derivatives of class 7 were inactive, except Scaff10-40 (IC₅₀ = 21 ± 3 μM) and Scaff10-63 (IC₅₀ = 24 ± 8 μM). The R² substituent of the two compounds is highly flexible, resulting in many conformers and a consequently increased probability of a bioactive conformation fitting into the targeted binding pocket. The steric fixation of molecules of class 8 was beneficial in most cases. As R² substituents, potentially charged groups such as the tertiary amine group at the para-position of the substitution of the phenyl ring (Scaff10-35), a trifluoromethyl substituent (Scaff10-30) or a 4-pyridyl substituent (Scaff10-32) at the phenyl ring leads to reduced (trifluoromethyl substituent) or complete loss of activity (tertiary amine, 4-pyridyl). A methoxy substituent in para-position of the phenyl ring at R² enhanced the inhibitory effect (Scaff10-8 and Scaff10-58). In addition, an extension of the R² substituent by aromatic moieties, e.g. Scaff10-38, Scaff10-41, Scaff10-44 and Scaff10-64, was beneficial or did not change the inhibitory potency. Rather bulky substituents at this position, such as a naphthyl substituent, were tolerated only for condensed compounds (Scaff10-44).

In conclusion, inhibition of the AKAP-Lbc/DHPH-RhoA interaction by Scaff10 derivatives required a negatively charged group like a carboxylic acid at a C2 to C4 spacer at position 3 of the coumarin indicating interaction with positively charged amino acids such as lysine, arginine or histidine in the binding pocket. In addition, a long, lipophilic and flexible moiety at R² with a methoxy substituent at the para-position adds to the inhibitory effect; condensation to furan mostly improves the inhibitory effect.

Scaff10-8 binds to GDP- and GTP-bound RhoA

Microscale thermophoresis (MST) was used to identify the target of Scaff10 derivatives [47]. Since the readout of MST is fluorescence emission, recombinant GFP-tagged AKAP-Lbc/DHPH and RED-NHS-labeled RhoA (647-RhoA) were generated. GFP-AKAP-Lbc/DHPH concentration-dependently bound unlabeled RhoA with a KD value of 42 ± 5 μM (Fig 4A). 647-RhoA bound His-AKAP-Lbc/DHPH (protein also used for the HTRF assay) with a KD value of 14 ± 4 μM (Fig 4B). The shape of the binding curve was inverted because of the altered ratios of RhoA to AKAP-Lbc/DHPH: Fnorm values became high when AKAP-Lbc/DHPH was present in excess, whereas Fnorm values decrease when RhoA was present in excess.

Fig 4View larger versionFig 4. The Scaff10 derivative Scaff10-8 binds to RhoA but not to the DHPH domain of AKAP-Lbc.(A-D) Microscale thermophoresis (MST) takes advantage of the phenomenon of directed movement of particles in a temperature gradient. Binding events lead to changes in the hydration shell of biomolecules and a relative change of movement of the molecular complex along a temperature gradient. Using such changes, binding affinities can be determined [47]. MST assays were carried out with (A) the recombinant DHPH domain of AKAP-Lbc fused with GFP and RhoA as a ligand and (B) fluorescent 647-RhoA and the His-tagged AKAP-Lbc/DHPH domain as a ligand. (C) MST assays for the analysis of the binding of Scaff10-8 to 647-RhoA. Upper panels: The concentration of fluorescent 647-RhoA remained constant and Scaff10-8 (left) and Scaff10-7 as a negative control (right) were titrated in increasing concentrations. Lower panels: Values of fluorescence corresponding to upper panels. (D) MST assay showing no binding of Scaff10-8 or Scaff10-7 to GFP-DHPH. Upper panels: The concentration of fluorescent GFP-AKAP-Lbc/DHPH remained constant and Scaff10-8 (left) and Scaff10-7 (right) were titrated in increasing concentrations. Lower panels: Values of fluorescence corresponding to upper panels. The KD value for the binding of Scaff10-8 to 647-RhoA is 20 ± 11 μM. F norm = normalized fluorescence (fluorescence steady state/fluorescence initial state) indicated in ‰. n = 3–5. Mean ± SEM.

The target of Scaff10-8 (and Scaff10-38, Fig 3 in S3 in S1 File) is RhoA, as Scaff10-8 bound to 647-RhoA with a KD value of 20 ± 11 μM (Fig 4C). Scaff10-38 bound to 647-RhoA with a similar KD value (Fig 3 in S3 in S1 File). Scaff10-7 and also other compounds from the different Scaff10 classes (e.g. Scaff10-48 from class 8, Fig 3 in S3 in S1 File) that were inactive in our HTRF assay, did not bind 647-RhoA, and neither Scaff10-8, Scaff10-7, Scaff10-38 or Scaff10-48 bound GFP-AKAP-Lbc/DHPH (Fig 4D, Fig 3 in S3 in S1 File). The concentration of the fluorescent molecule remained constant in the samples during each run. Based on this, the decreasing values for Scaff10-7 (Fig 4D) and of other HTRF-negative compounds such as Scaff10-48 (Fig 3 in S3 in S1 File) were not considered as binding events, but as a direct interaction with GFP of the DHPH domain, which influences the Fnorm value concentration-dependently.

We used isothermal titration calorimetry (ITC) assays to confirm the interaction of Scaff10-8 with RhoA (Fig 5A and 5B). Indeed, Scaff10-8 bound GST-RhoA loaded with GDP with a KD = 20 ± 1 μM or GTPγS with a KD = 38 ± 4 μM. Since GTP-GDP exchange is associated with large conformational rearrangements of the switch regions, the similar KD values suggest that interaction with Scaff10-8 does not directly involve these elements and that it was independent of the conformational change. Scaff10-8 specifically interacted with RhoA, as it did not bind to the GST control (Fig 5C).

Fig 5View larger versionFig 5. Scaff10-8 binds to GDP- and GTP-bound RhoA.Isothermal titration calorimetry (ITC) measurements using recombinant GST-tagged RhoA in its (A) GDP- and (B) GTP-bound form and Scaff10-8 were performed (GDP and GTPγS, 2 mM each). KD values are indicated. (C) As a control, the measurements were carried out with GST alone.

Scaff10-8 does not affect viability and inhibits the AKAP-Lbc-mediated activation of RhoA in cells

Prior to the analysis of effects of Scaff10-8 on the localization of AQP2 in primary rat inner medullary collecting duct (IMCD) cells, potential cytotoxic effects and specificity of the compound were evaluated. For this, IMCD cells, mouse collecting duct MCD4 cells (another model for renal principal cells [44, 48]), Human embryonic kidney (HEK)293, breast carcinoma (MCF7) and cardiac myocytes (H9C2) that all express AKAP-Lbc and RhoA (Fig 6A) were incubated with Scaff10-8 in concentrations of 3–100 μM and an MTS cytotoxicity assay was carried out (Fig 6B). The compound did not influence the viability of these cells. A further experiment based on quantitation of ATP as an indicator of metabolically active cells confirmed that Scaf10-8 did not affect the viability of cells in concentrations of up to 100 μM (Fig 4 in S4 in S1 File). Using MCD4 cells and a mass spectrometry approach, we confirmed the uptake of Scaff10-8 into cells (data not shown).

Fig 6View larger versionFig 6. Scaff10-8 is not cytotoxic.(A) Western blot showing protein expression of AKAP-Lbc and RhoA in five different cell lines and in primary rat inner medullary collecting duct (IMCD) cells: All cells express full-length AKAP-Lbc (308 kDa) and shorter splice variants. RhoA (22 kDa) is also expressed in all cells. MW = molecular weight. (B) Cytotoxicity was assessed after 24–72 h of incubation with Scaff10-8 (3, 30, 100 μM). Staurosporine as inducer of apoptosis was used as a positive control. Absorption was determined at 450 nm and was related to medium absorption (blank). DMSO was used as a control. Normalised to untreated cells after 24 h, three independent experiments with four data points each are shown. n = 3. Statistically significant differences were determined applying one-way ANOVA with posthoc Bonferroni. Mean ± SEM is plotted.

In order to test whether Scaff10-8 would, as the mother compound Scaff10, have specificity towards inhibition of AKAP-Lbc-mediated RhoA activation, we expressed AKAP-Lbc in the absence or presence of a constitutively active form of the α-subunit of G12, Gα12QL, or the RhoGEFs LARG and PDZ-RhoGEF in HEK293 cells and analyzed the effect of Scaff10-8 on the activation of RhoA. Fig 7 shows that only the AKAP-Lbc-mediated activation of RhoA was inhibited, whereas LARG and PDZ-RhoAGEF-mediated RhoA activation was not influenced, indicating that Scaff10-8 has a similar selectivity as Scaff10.

Fig 7View larger versionFig 7. Scaff10-8 inhibits the AKAP-Lbc-mediated activation of RhoA in cells.In HEK293 cells, full length AKAP-Lbc was transiently expressed alone or in combination with the constitutively active version, Gα12QL, of the G protein α subunit Gα12. Gα12 selectively activates the GEF activity of AKAP-Lbc [28]. Where indicated, the RhoGEFs LARG and PDZ-RhoGEF were expressed. The cells were left untreated or incubated with Scaff10-8 in concentrations of 30 or 100 μM. The lower panels show detection of the indicated proteins by Western blotting. n = 3. Statistically significant differences were determined applying one-way ANOVA with posthoc Bonferroni. Mean ± SEM is plotted.

Scaff10-8 promotes the redistribution of AQP2 to the periphery of primary IMCD cells

To investigate whether Scaff10-8 affected the localization of AQP2, primary IMCD cells were treated with Scaff10-8 and AQP2 was visualized using immunofluorescence microscopy (Fig 8). In resting IMCD cells, AQP2 was located mainly in the perinuclear region. As previously demonstrated, stimulation of cAMP synthesis with the adenylyl cyclase activator forskolin induced its redistribution to the plasma membrane. Incubation with Scaff10-8 (30 μM, 1 h) caused the translocation of AQP2 to the plasma membrane in the absence of forskolin, while it did not enhance the forskolin-induced redistribution. In control cells, polymerized F-actin appeared mostly as fiber structures and elevation of cAMP through forskolin caused depolymerization as previously described [23]. F-actin disappeared and dot-like structures became apparent, presumably representing shorter fragments of F-actin or G-actin [23] (Fig 8). In cells challenged with 30 μM Scaff10-8 alone, F-actin also decreased and more dot-like structures were present. Scaff10-8 did not influence the effect of forskolin on F-actin. The data argue for a Scaff10-8-induced decrease of F-actin, which is in line with an inhibition of RhoA. In MCD4 cells, Scaff10-8 also induced cAMP-independently the translocation of AQP2 to the plasma membrane (Fig 5 in S5 in S1 File). Scaff10-7 and Scaff10-59, compounds without inhibitory effects in our HTRF and Alpha screen assays, did not affect the location of AQP2 in MCD4 cells (Fig 5 in S5 in S1 File). Due to the lack of an effect of the latter compounds on AQP2, we refrained from testing them on primary IMCD cells.

Fig 8View larger versionFig 8. Scaff10-8 promotes the redistribution of AQP2 to the plasma membrane of primary IMCD cells, which is independent of cAMP elevation and associated with depolymerization of F-actin.(A) Upper panel. IMCD cells were treated with DMSO (1%; control), the solvent of Scaff10-8, or forskolin (10 μM, 30 min) to stimulate cAMP synthesis. Lower panels: The cells were treated for 1 hour with Scaff10-8 (30 μM) alone (control) or with Scaff10-8 and forskolin. Forskolin (10 μM) was added for the final 30 min of Scaff10-8 incubation. AQP2 (green) was detected with specific primary and Cy3-coupled secondary antibodies, F-actin (red) with Alexa Fluor 647-Phalloidin and nuclei with DAPI (blue). Signals were visualized using a laser scanning microscope. Representative images are shown. n = 3. The magnified views were derived from the indicated boxes. (B) The signal intensities arising from intracellular and plasma membrane AQP2 were recorded, related to nuclear signal intensities, and the ratios of plasma membrane to intracellular fluorescence signal intensities were calculated (n = 30 cells per condition). Ratios > 1 indicate a predominant localization of AQP2 at the plasma membrane. Statistically significant differences were calculated using one-way ANOVA with posthoc Bonferroni. Mean ± SEM; *, p ≤ 0.05; *** p ≤ 0.001.

Since the immunofluorescence microscopy experiments indicated a Scaff10-8-induced redistribution of AQP2 to the plasma membrane, we investigated whether AQP2 inserted into the membrane. However, surface biotinylation experiments revealed that this was not the case. Forskolin alone induced the membrane insertion of AQP2 into the plasma membrane of IMCD cells but not Scaff10-8 (Fig 9). Thus, Scaff10-8 appears to promote the redistribution of AQP2 to a near-plasma membrane region of the IMCD cells but not its insertion.

Fig 9View larger versionFig 9. Scaff10-8 does not promote the insertion of AQP2 into the plasma membrane of IMCD cerlls.(A) IMCD cells were treated with either compound (30 μM) or DMSO for 1 or 24 h. Membrane proteins were biotinylated followed by precipitation with streptavidin agarose beads. Pulldown (PD) and supernatant fractions were separated by 12% SDS-PAGE. Pan-Cadherin was used as a loading control for the PD fraction, Hsp90 for the supernatants. A representative Western blot is shown. (B) Signals from A were quantified by densitometric analysis. The amount of AQP2 in the PD fractions were related to Pan-Cadherin. MW = molecular weight. M = molecular weight standard. cg = complex glycosylated; hm = high mannose glycosylated; ng = non-glycosylated. 10–8 = Scaff10-8. n = 3. Mean ± SEM is plotted.

Next, we investigated the effect of Scaff10-8 on RhoA activity. In order to measure RhoA activity in IMCD cells, Rhotekin pull down assays were performed (Fig 10). They revealed that Scaff10-8 alone decreased RhoA activity as forskolin did. Scaff10-8 did not significantly enhance the inhibitory effect of forskolin. The inhibitory effect of Scaff10-8 on RhoA explains the observed depolymerization of F-actin and the AVP/cAMP-independent redistribution of AQP2 to the periphery of the IMCD cells.

Fig 10View larger versionFig 10. Scaff10-8 inhibits activation of RhoA in primary IMCD cells.IMCD cells were incubated with Scaff10-8 (30 μM, 1 h). DMSO (1%), the solvent of Scaff10-8, served as a control. The cells were lysed, (A) active RhoA was precipitated with the RhoA binding domain of Rhotekin coupled to sepharose beads, (B) active Cdc42 and Rac1 were precipitated with with GST fused to the (p21) binding domain (PBD) of p21 activated kinase 1 protein (PAK-1) coupled to sepharose beads. Inputs and pulldown fractions were separated by SDS-PAGE. Hsp90 or GAPDH were used as loading controls. Representative Western blots from 3–5 independent experiments are shown. Signals were semiquantitatively analyzed by densitometry. The amount of active RhoA was related to normalized RhoA (total RhoA to Hsp90 (Input)). Accordingly, active Cdc42 and Rac1 were related to normalized Cdc42 and Rac1, respectively (total RhoA to GAPDH (Input)). PD, Pulldown. n = 3–5. Statistically significant differences were determined using one-way ANOVA with posthoc Bonferroni. Mean ± SEM is plotted. *, p ≤ 0.05; **, p ≤ 0.01; *** p ≤ 0.001.

The Rho GTPases, Cdc42, and Rac1 are crucial regulators of the cytoskeleton [49]. In order to determine whether Scaff10-8 non-selectively affects these members of the Rho family in addition to RhoA, we precipitated the active GTP-bound forms using GST fused to the (p21) binding domain (PBD) of p21 activated kinase 1 protein (PAK-1). Fig 10B shows that Scaff10-8 did not influence activities of Cdc42 or Rac1 underpinning the selectivity for interference with AKAP-Lbc/RhoA signaling.

Discussion

We report here a novel small molecule, Scaff10-8. We were able to demonstrate that this compound bound RhoA and inhibited its interaction with AKAP-Lbc. In IMCD cells, Scaff10-8 caused inhibition of RhoA and promoted the redistribution of AQP2 to the periphery of the cells in the absence of AVP. This effect of Scaff10-8 was associated with depolymerization of F-actin. The results concur with our previous observation that a basal RhoA activity in resting IMCD cells maintains F-actin as a physical barrier preventing AQP2-bearing vesicles from reaching the plasma membrane [23]. Our data indicate that under resting conditions a basal GEF activity of AKAP-Lbc maintains a pool of RhoA in an active state. The decrease of RhoA activity upon challenge with AVP is due to PKA phosphorylation of RhoA at S188 and its consequent inhibition [23–25, 45]. In addition, PKA phosphorylation and thus inhibition of the GEF activity of AKAP-Lbc as it occurs in HEK293 cells is likely to contribute to RhoA inhibition [32]. This argues for several layers of control ensuring a tight regulation of RhoA and thereby of the localization of AQP2.

We have previously shown that prostaglandin E₂ antagonizes the AVP-induced redistribution of AQP2 through stimulation of EP₃ receptors [45]. The inhibitory effect was independent of EP₃ receptor coupling to the inhibitory G protein Gi and inhibition of adenylyl cyclase and cAMP generation. The EP₃ receptor-mediated inhibition was due to RhoA activation and formation of F-actin-containing stress fibers. Stimulation of EP₃ receptor subtypes α and β activates the G protein G₁₂ in addition to Gi [50]. Since the GEF activity of AKAP-Lbc is selectively activated by G₁₂ [28], AKAP-Lbc may not only maintain a basal RhoA activity in resting IMCD cells, but may be part of the signaling cascade controlling the inhibitory effects of prostaglandin E₂ on diuresis.

Scaff10-8 did not promote the membrane insertion of AQP2 in IMCD cells. We had previously observed that direct inhibition of RhoA with C3 toxin promotes the depolymerization of F-actin and the redistribution of AQP2 to the plasma membrane [23]. Whether C3 toxin induces the insertion into the plasma membrane was not evaluated. However, there is ample evidence from other studies that inhibition of Rho causes membrane insertion of the water channel. For the treatment of water balance disorders, in particular, forms of DI where a redistribution of AQP2 into the plasma membrane independent of AVP and the V2R is desirable, treatment with statins as a measure for interference with Rho activity has been suggested. Statins block HMG-CoA reductase and thereby inhibit lipid modification and activity of RhoA, and also enhance AQP2 expression [51]. For example, simvastatin controls AQP2 trafficking in porcine LLC-PK1 cells stably expressing AQP2, and urinary concentration in Brattleboro rats through downregulation of Rho activity and inhibition of endocytosis. Statins inhibit clathrin-mediated endocytosis [51, 52]. In hypercholesterolemic patients, simvastatin reduced diuresis and increased urine osmolality [53, 54]. Scaf10-8 may not induce the membrane insertion of AQP2 because interference with a single RhoGEF may not be sufficient to inactivate the relevant RhoA pool to a degree that leads to membrane insertion. The peripheral F-actin cytoskeleton may be under the control of one or more other GEF/s and, in the presence of Scaff10-8, may still constitute a physical barrier for AQP2-bearing vesicles preventing them from reaching the plasma membrane. Cdc42 and Rac1 are most likely not involved in maintaining peripheral F-actin as a barrier, as Scaff10-8 did not affect their activity.

Recently, a virtual screening identified small molecule inhibitors of the AKAP-Lbc/DHPH-RhoA interaction [55]. In the docked structural models, negatively charged molecules targeted a cluster of positively charged residues of the AKAP-Lbc/DHPH domain. One of the molecules, A13, reduced proliferation, migration and invasion of prostate cancer cells. This is in line with previous findings showing that AKAP-Lbc/DHPH alone is constitutively active and promotes cell transformation and cancer cell proliferation [56]. However, another small molecule, C646, almost identical to A13, was identified as a pan-assay interference compound (PAINS) [57]. PAINS are compounds that tend to nonspecifically react with various targets and are often false positive hits in high-throughput screenings. We, therefore, refrained from testing A13 in IMCD cells. Additional small molecules targeting the binding sites of RhoA in AKAP-Lbc were recently identified through an in silico approach. However, it is unclear whether these in silico hits inhibit the interaction with RhoA [58]. We, therefore, also did not test the in silico-derived molecules in IMCD cells.

The AKAP-Lbc-mediated RhoA activation is associated with the development of cardiac hypertrophy [59] and cancer [60]. Therefore, the development of an inhibitor of the interaction has clinical implications. However, the target of Scaff10-8 is RhoA and not AKAP-Lbc. Since a drug binding RhoA would be expected to cause side effects, Scaff10-8 is apparently not suitable for further development towards a drug candidate, although, in principle, targeting Rho is possible. For instance, the Rho inhibitor VX-210 is currently being clinically tested for the treatment of traumatic cervical spinal cord injury (ClinicalTrials.gov Identifier: NCT02669849). Inhibitors of the Rho effector, Rho kinase (ROCK; Fasudil and Ripasudil), which is ubiquitously expressed, have been approved for the treatment of glaucoma and vasculature-related diseases [61].

In summary, with our novel small molecule, Scaff10-8, that targets the interaction of a Rho-specific GEF with RhoA to interfere with RhoA activity, we provide a novel research tool for studying functions of the AKAP-Lbc-RhoA interaction. Using Scaff10-8, we have identified the first RhoGEF involved in the control of AQP2 trafficking.

Supplementary Material

Open In Web Browser

Acknowledgments

We thank Sylvia Niquet, Bärbel Pohl, Beate Eisermann, Andrea Geelhaar and Doris Baltus for excellent technical assistance. We are grateful to Prof. S. Offermanns (Max-Planck-Institut für Herz- und Lungenforschung, Bad Nauheim, Germany) for pCMV2b plasmids encoding LARG und PDZ-RhoGEF, and Prof. J. Scott (University of Washington, Seattle, USA) for providing a pEGFP-N1 plasmid encoding AKAP-Lbc. We thank Profs. G. Valenti and G. Tamma (University of Bari, Italy) for providing MCD4 cells.

Articles from PLoS ONE are provided here courtesy of Public Library of Science

PMC Copyright Notice

The articles available from the PMC site are protected by copyright, even though access is free. Copyright is held by the respective authors or publishers who provide these articles to PMC. Users of PMC are responsible for complying with the terms and conditions defined by the copyright holder.

Users should assume that standard copyright protection applies to articles in PMC, unless an article contains an explicit license statement that gives a user additional reuse or redistribution rights. PMC does not allow automated/bulk downloading of articles that have standard copyright protection.

See the copyright notice on the PMC site, https://www.ncbi.nlm.nih.gov/pmc/about/copyright/, for further details and specific exceptions.

References

Sasaki S. Aquaporin 2: from its discovery to molecular structure and medical implications. Molecular aspects of medicine. 2012;33(5–6):535–46. doi: 10.1016/j.mam.2012.03.004 .23078817

Pearce D, Soundararajan R, Trimpert C, Kashlan OB, Deen PM, Kohan DE. Collecting duct principal cell transport processes and their regulation. Clin J Am Soc Nephrol. 2015;10(1):135–46. doi: 10.2215/CJN.05760513 ; PubMed Central PMCID: PMCPMC4284417.24875192

Olesen ET, Fenton RA. Aquaporin-2 membrane targeting: still a conundrum. Am J Physiol Renal Physiol. 2017;312(4):F744–F7. doi: 10.1152/ajprenal.00010.2017 .28179252

Klussmann E, Maric K, Rosenthal W. The mechanisms of aquaporin control in the renal collecting duct. Rev Physiol Biochem Pharmacol. 2000;141:33–95. .10916423

Nedvetsky PI, Tamma G, Beulshausen S, Valenti G, Rosenthal W, Klussmann E. Regulation of aquaporin-2 trafficking. Handb Exp Pharmacol. 2009;(190):133–57. Epub 2008/12/20. doi: 10.1007/978-3-540-79885-9_6 .19096775

Vukicevic T, Schulz M, Faust D, Klussmann E. The Trafficking of the Water Channel Aquaporin-2 in Renal Principal Cells-a Potential Target for Pharmacological Intervention in Cardiovascular Diseases. Front Pharmacol. 2016;7:23 doi: 10.3389/fphar.2016.00023 ; PubMed Central PMCID: PMCPMC4749865.26903868

Milano S, Carmosino M, Gerbino A, Svelto M, Procino G. Hereditary Nephrogenic Diabetes Insipidus: Pathophysiology and Possible Treatment. An Update. Int J Mol Sci. 2017;18(11). doi: 10.3390/ijms18112385 .29125546

Katsura T, Gustafson CE, Ausiello DA, Brown D. Protein kinase A phosphorylation is involved in regulated exocytosis of aquaporin-2 in transfected LLC-PK1 cells. Am J Physiol. 1997;272(6 Pt 2):F817–22. Epub 1997/06/01. .9227644

Fushimi K, Sasaki S, Marumo F. Phosphorylation of serine 256 is required for cAMP-dependent regulatory exocytosis of the aquaporin-2 water channel. J Biol Chem. 1997;272(23):14800–4. Epub 1997/06/06. .9169447

van Balkom BW, Savelkoul PJ, Markovich D, Hofman E, Nielsen S, van der Sluijs P, et al The role of putative phosphorylation sites in the targeting and shuttling of the aquaporin-2 water channel. J Biol Chem. 2002;277(44):41473–9. Epub 2002/08/27. doi: 10.1074/jbc.M207525200 [pii]. .12194985

Kuwahara M, Asai T, Terada Y, Sasaki S. The C-terminal tail of aquaporin-2 determines apical trafficking. Kidney Int. 2005;68(5):1999–2009. Epub 2005/10/14. KID654 [pii] doi: 10.1111/j.1523-1755.2005.00654.x .16221200

Klussmann E, Maric K, Wiesner B, Beyermann M, Rosenthal W. Protein kinase A anchoring proteins are required for vasopressin-mediated translocation of aquaporin-2 into cell membranes of renal principal cells. J Biol Chem. 1999;274(8):4934–8. Epub 1999/02/13. .9988736

McSorley T, Stefan E, Henn V, Wiesner B, Baillie GS, Houslay MD, et al Spatial organisation of AKAP18 and PDE4 isoforms in renal collecting duct principal cells. European journal of cell biology. 2006;85(7):673–8. Epub 2006/02/28. doi: 10.1016/j.ejcb.2006.01.005 .16500722

Klussmann E, Rosenthal W. Role and identification of protein kinase A anchoring proteins in vasopressin-mediated aquaporin-2 translocation. Kidney Int. 2001;60(2):446–9. Epub 2001/07/28. kid829 [pii] doi: 10.1046/j.1523-1755.2001.060002446.x .11473624

Hoffert JD, Pisitkun T, Wang G, Shen RF, Knepper MA. Quantitative phosphoproteomics of vasopressin-sensitive renal cells: regulation of aquaporin-2 phosphorylation at two sites. Proceedings of the National Academy of Sciences of the United States of America. 2006;103(18):7159–64. Epub 2006/04/28. doi: 10.1073/pnas.0600895103 ; PubMed Central PMCID: PMC1459033.16641100

Fenton RA, Moeller HB, Hoffert JD, Yu MJ, Nielsen S, Knepper MA. Acute regulation of aquaporin-2 phosphorylation at Ser-264 by vasopressin. Proc Natl Acad Sci U S A. 2008;105(8):3134–9. Epub 2008/02/22. 0712338105 [pii] doi: 10.1073/pnas.0712338105 ; PubMed Central PMCID: PMC2268597.18287043

Moeller HB, Praetorius J, Rutzler MR, Fenton RA. Phosphorylation of aquaporin-2 regulates its endocytosis and protein-protein interactions. Proceedings of the National Academy of Sciences of the United States of America. 2010;107(1):424–9. Epub 2009/12/08. doi: 10.1073/pnas.0910683107 ; PubMed Central PMCID: PMC2806726.19966308

Hoffert JD, Fenton RA, Moeller HB, Simons B, Tchapyjnikov D, McDill BW, et al Vasopressin-stimulated increase in phosphorylation at Ser269 potentiates plasma membrane retention of aquaporin-2. J Biol Chem. 2008;283(36):24617–27. Epub 2008/07/09. M803074200 [pii] doi: 10.1074/jbc.M803074200 ; PubMed Central PMCID: PMC2528999.18606813

Moeller HB, Knepper MA, Fenton RA. Serine 269 phosphorylated aquaporin-2 is targeted to the apical membrane of collecting duct principal cells. Kidney Int. 2009;75(3):295–303. Epub 2008/10/10. ki2008505 [pii] doi: 10.1038/ki.2008.505 .18843259

Rice WL, Zhang Y, Chen Y, Matsuzaki T, Brown D, Lu HA. Differential, Phosphorylation Dependent Trafficking of AQP2 in LLC-PK1 Cells. PLoS One. 2012;7(2):e32843 Epub 2012/03/10. doi: 10.1371/journal.pone.0032843 ; PubMed Central PMCID: PMC3293519.22403603

Tamma G, Robben JH, Trimpert C, Boone M, Deen PM. Regulation of AQP2 localization by S256 and S261 phosphorylation and ubiquitination. American journal of physiology Cell physiology. 2011;300(3):C636–46. Epub 2010/12/15. doi: 10.1152/ajpcell.00433.2009 .21148409

Nedvetsky PI, Tabor V, Tamma G, Beulshausen S, Skroblin P, Kirschner A, et al Reciprocal regulation of aquaporin-2 abundance and degradation by protein kinase A and p38-MAP kinase. J Am Soc Nephrol. 2010;21(10):1645–56. Epub 2010/08/21. ASN.2009111190 [pii] doi: 10.1681/ASN.2009111190 .20724536

Klussmann E, Tamma G, Lorenz D, Wiesner B, Maric K, Hofmann F, et al An inhibitory role of Rho in the vasopressin-mediated translocation of aquaporin-2 into cell membranes of renal principal cells. J Biol Chem. 2001;276(23):20451–7. Epub 2001/03/30. doi: 10.1074/jbc.M010270200 [pii]. .11278652

Tamma G, Klussmann E, Procino G, Svelto M, Rosenthal W, Valenti G. cAMP-induced AQP2 translocation is associated with RhoA inhibition through RhoA phosphorylation and interaction with RhoGDI. J Cell Sci. 2003;116(Pt 8):1519–25. Epub 2003/03/18. .12640036

Tamma G, Klussmann E, Maric K, Aktories K, Svelto M, Rosenthal W, et al Rho inhibits cAMP-induced translocation of aquaporin-2 into the apical membrane of renal cells. Am J Physiol Renal Physiol. 2001;281(6):F1092–101. Epub 2001/11/13. doi: 10.1152/ajprenal.0091.2001 .11704560

Henn V, Edemir B, Stefan E, Wiesner B, Lorenz D, Theilig F, et al Identification of a novel A-kinase anchoring protein 18 isoform and evidence for its role in the vasopressin-induced aquaporin-2 shuttle in renal principal cells. J Biol Chem. 2004;279(25):26654–65. Epub 2004/03/24. doi: 10.1074/jbc.M312835200 [pii]. .15037626

Stefan E, Wiesner B, Baillie GS, Mollajew R, Henn V, Lorenz D, et al Compartmentalization of cAMP-dependent signaling by phosphodiesterase-4D is involved in the regulation of vasopressin-mediated water reabsorption in renal principal cells. J Am Soc Nephrol. 2007;18(1):199–212. Epub 2006/12/01. ASN.2006020132 [pii] doi: 10.1681/ASN.2006020132 .17135396

Diviani D, Soderling J, Scott JD. AKAP-Lbc anchors protein kinase A and nucleates Galpha 12-selective Rho-mediated stress fiber formation. The Journal of biological chemistry. 2001;276(47):44247–57. Epub 2001/09/08. doi: 10.1074/jbc.M106629200 .11546812

Aittaleb M, Boguth CA, Tesmer JJ. Structure and function of heterotrimeric G protein-regulated Rho guanine nucleotide exchange factors. Mol Pharmacol. 2010;77(2):111–25. Epub 2009/11/03. doi: 10.1124/mol.109.061234 ; PubMed Central PMCID: PMC2812070.19880753

Zheng Y. Dbl family guanine nucleotide exchange factors. Trends Biochem Sci. 2001;26(12):724–32. Epub 2001/12/12. .11738596

Abdul Azeez KR, Knapp S, Fernandes JM, Klussmann E, Elkins JM. The crystal structure of the RhoA-AKAP-Lbc DH-PH domain complex. Biochem J. 2014;464(2):231–9. doi: 10.1042/BJ20140606 ; PubMed Central PMCID: PMC4232260.25186459

Diviani D, Abuin L, Cotecchia S, Pansier L. Anchoring of both PKA and 14-3-3 inhibits the Rho-GEF activity of the AKAP-Lbc signaling complex. EMBO J. 2004;23(14):2811–20. Epub 2004/07/02. doi: 10.1038/sj.emboj.7600287 ; PubMed Central PMCID: PMC514948.15229649

Klussmann E, Edemir B, Pepperle B, Tamma G, Henn V, Klauschenz E, et al Ht31: the first protein kinase A anchoring protein to integrate protein kinase A and Rho signaling. FEBS Lett. 2001;507(3):264–8. Epub 2001/11/07. S0014-5793(01)02995-7 [pii]. .11696353

Faust D, Geelhaar A, Eisermann B, Eichhorst J, Wiesner B, Rosenthal W, et al Culturing primary rat inner medullary collecting duct cells. Journal of visualized experiments: JoVE. 2013;(76). doi: 10.3791/50366 .23852264

Lisurek M, Rupp B, Wichard J, Neuenschwander M, von Kries JP, Frank R, et al Design of chemical libraries with potentially bioactive molecules applying a maximum common substructure concept. Mol Divers. 2010;14(2):401–8. doi: 10.1007/s11030-009-9187-z .19685275

Zhang JH, Chung TD, Oldenburg KR. A Simple Statistical Parameter for Use in Evaluation and Validation of High Throughput Screening Assays. Journal of biomolecular screening. 1999;4(2):67–73. doi: 10.1177/108705719900400206 .10838414

Malo N, Hanley JA, Cerquozzi S, Pelletier J, Nadon R. Statistical practice in high-throughput screening data analysis. Nature biotechnology. 2006;24(2):167–75. doi: 10.1038/nbt1186 .16465162

Garazd MM, Garazd Ia L, Ogorodniichuk AS, Khilia VP. [Synthesis of modified psoralen analogues]. Bioorganicheskaia khimiia. 2004;30(3):324–33. .15344663

Schafer G, Milic J, Eldahshan A, Gotz F, Zuhlke K, Schillinger C, et al Highly functionalized terpyridines as competitive inhibitors of AKAP-PKA interactions. Angew Chem Int Ed Engl. 2013;52(46):12187–91. doi: 10.1002/anie.201304686 .24115519

Gotz F, Roske Y, Schulz MS, Autenrieth K, Bertinetti D, Faelber K, et al AKAP18:PKA-RIIalpha structure reveals crucial anchor points for recognition of regulatory subunits of PKA. Biochem J. 2016;473(13):1881–94. doi: 10.1042/BCJ20160242 .27102985

Rittinger K, Walker PA, Eccleston JF, Smerdon SJ, Gamblin SJ. Structure at 1.65 A of RhoA and its GTPase-activating protein in complex with a transition-state analogue. Nature. 1997;389(6652):758–62. doi: 10.1038/39651 .9338791

Lutz S, Mohl M, Rauch J, Weber P, Wieland T. RhoGEF17, a Rho-specific guanine nucleotide exchange factor activated by phosphorylation via cyclic GMP-dependent kinase Ialpha. Cell Signal. 2013;25(3):630–8. doi: 10.1016/j.cellsig.2012.11.016 .23195829

Swiercz JM, Kuner R, Behrens J, Offermanns S. Plexin-B1 directly interacts with PDZ-RhoGEF/LARG to regulate RhoA and growth cone morphology. Neuron. 2002;35(1):51–63. .12123608

Bogum J, Faust D, Zuhlke K, Eichhorst J, Moutty MC, Furkert J, et al Small-molecule screening identifies modulators of aquaporin-2 trafficking. J Am Soc Nephrol. 2013;24(5):744–58. doi: 10.1681/ASN.2012030295 ; PubMed Central PMCID: PMC3636789.23559583

Tamma G, Wiesner B, Furkert J, Hahm D, Oksche A, Schaefer M, et al The prostaglandin E2 analogue sulprostone antagonizes vasopressin-induced antidiuresis through activation of Rho. J Cell Sci. 2003;116(Pt 16):3285–94. Epub 2003/06/28. doi: 10.1242/jcs.00640 [pii]. .12829746

Benard V, Bohl BP, Bokoch GM. Characterization of rac and cdc42 activation in chemoattractant-stimulated human neutrophils using a novel assay for active GTPases. J Biol Chem. 1999;274(19):13198–204. .10224076

Jerabek-Willemsen M, Wienken CJ, Braun D, Baaske P, Duhr S. Molecular interaction studies using microscale thermophoresis. Assay Drug Dev Technol. 2011;9(4):342–53. doi: 10.1089/adt.2011.0380 ; PubMed Central PMCID: PMCPMC3148787.21812660

Iolascon A, Aglio V, Tamma G, D'Apolito M, Addabbo F, Procino G, et al Characterization of two novel missense mutations in the AQP2 gene causing nephrogenic diabetes insipidus. Nephron Physiol. 2007;105(3):p33–41. Epub 2006/12/29. 000098136 [pii] doi: 10.1159/000098136 .17192724

Jaffe AB, Hall A. Rho GTPases: biochemistry and biology. Annu Rev Cell Dev Biol. 2005;21:247–69. doi: 10.1146/annurev.cellbio.21.020604.150721 .16212495

Sugimoto Y, Narumiya S. Prostaglandin E receptors. J Biol Chem. 2007;282(16):11613–7. Epub 2007/03/03. R600038200 [pii] doi: 10.1074/jbc.R600038200 .17329241

Wade JB. Statins affect AQP2 traffic. Am J Physiol Renal Physiol. 2011;301(2):F308 doi: 10.1152/ajprenal.00248.2011 ; PubMed Central PMCID: PMCPMC3154589.21561996

Li W, Zhang Y, Bouley R, Chen Y, Matsuzaki T, Nunes P, et al Simvastatin enhances aquaporin-2 surface expression and urinary concentration in vasopressin-deficient Brattleboro rats through modulation of Rho GTPase. Am J Physiol Renal Physiol. 2011;301(2):F309–18. doi: 10.1152/ajprenal.00001.2011 ; PubMed Central PMCID: PMCPMC3154588.21511701

Procino G, Portincasa P, Mastrofrancesco L, Castorani L, Bonfrate L, Addabbo F, et al Simvastatin increases AQP2 urinary excretion in hypercholesterolemic patients: A pleiotropic effect of interest for patients with impaired AQP2 trafficking. Clin Pharmacol Ther. 2016;99(5):528–37. doi: 10.1002/cpt.305 .26575415

Procino G, Barbieri C, Carmosino M, Tamma G, Milano S, De Benedictis L, et al Fluvastatin modulates renal water reabsorption in vivo through increased AQP2 availability at the apical plasma membrane of collecting duct cells. Pflugers Arch. 2011;462(5):753–66. doi: 10.1007/s00424-011-1007-5 .21858457

Diviani D, Raimondi F, Del Vescovo CD, Dreyer E, Reggi E, Osman H, et al Small-Molecule Protein-Protein Interaction Inhibitor of Oncogenic Rho Signaling. Cell Chem Biol. 2016;23(9):1135–46. doi: 10.1016/j.chembiol.2016.07.015 .27593112

Zheng Y, Olson MF, Hall A, Cerione RA, Toksoz D. Direct involvement of the small GTP-binding protein Rho in lbc oncogene function. J Biol Chem. 1995;270(16):9031–4. .7721814

Shrimp JH, Sorum AW, Garlick JM, Guasch L, Nicklaus MC, Meier JL. Characterizing the Covalent Targets of a Small Molecule Inhibitor of the Lysine Acetyltransferase P300. ACS Med Chem Lett. 2016;7(2):151–5. doi: 10.1021/acsmedchemlett.5b00385 ; PubMed Central PMCID: PMCPMC4753543.26985290

Khan A, Munir M, Aiman S, Wadood A, Khan AU. The in silico identification of small molecules for protein-protein interaction inhibition in AKAP-Lbc-RhoA signaling complex. Comput Biol Chem. 2017;67:84–91. doi: 10.1016/j.compbiolchem.2016.12.014 .28063348

Diviani D, Reggi E, Arambasic M, Caso S, Maric D. Emerging roles of A-kinase anchoring proteins in cardiovascular pathophysiology. Biochim Biophys Acta. 2016;1863(7 Pt B):1926–36. doi: 10.1016/j.bbamcr.2015.11.024 .26643253

Reggi E, Diviani D. The role of A-kinase anchoring proteins in cancer development. Cell Signal. 2017;40:143–55. doi: 10.1016/j.cellsig.2017.09.011 .28927666

Defert O, Boland S. Rho kinase inhibitors: a patent review (2014–2016). Expert Opin Ther Pat. 2017;27(4):507–15. doi: 10.1080/13543776.2017.1272579 .28048944

[Back]

Fig 1. Identification of a small molecule inhibitor of the AKAP-Lbc-mediated activation of RhoA.

(A) Principle of the nucleotide exchange assay for the screening. The DHPH domain of the RhoA-specific guanine nucleotide exchange factor (GEF) AKAP-Lbc and RhoA were generated as recombinant proteins. The DHPH domain-catalyzed exchange of GDP for the fluorescent mant-GTP was monitored at the emission wavelength of RhoA-bound mant-GTP at 440 nm. (B) The fluorescence signal intensity changes were determined for all samples including positive and negative controls and percent inhibitions calculated based on the controls. The screening data quality was evaluated as distribution of percent inhibition of all tested compounds and by calculating the Z’-factors for each plate, which were found to be 0.51 on average. (C) Using the GEF assay from (A), 18,431 small molecules were screened for inhibitors of the nucleotide exchange; 100 hits were identified of which 26 candidates were validated. The most promising hit was the compound Scaff10 (structure indicated). (D) Nucleotide exchange assay with Scaff10 and two further hits (for details see S1 Table). IC₅₀ values for the inhibition are indicated.

[Back]

[Back]

Fig 2. The small molecule Scaff10-8 inhibits the interaction of the DH domain of AKAP-Lbc and RhoA.

(A). Principle of homogenous time-resolved fluorescence (HTRF) assay. Recombinant His-AKAP-Lbc/DHPH and GST-RhoA were generated. The tags are recognized by specific antibodies coupled to fluorescent dyes. When the two proteins interact, donor and acceptor dyes of the antibodies are in close proximity, energy transfer occurs upon excitation at 320 nm and a FRET signal is detected (665 nm). If a compound disrupts the interaction of the DHPH domain and RhoA, the proximity of the fluorescent moieties remains insufficient for a FRET signal to occur. (B) In the HTRF from (A), Scaff10-8 inhibited the interaction of AKAP-Lbc/DHPH and RhoA with an IC₅₀ = 34.1 μM whereas Scaff10-59 did not (example of a negative Scaff10 derivative). As expected, excess untagged Rho decreases the binding between GST-RhoA and His-AKAP-Lbc/DHPH in a dose-dependent manner (lower left panel). Scaff10-8 does not interact with a His-GST fusion protein, excluding any interference of the tags or antibodies used in this assay with Scaff10-8. n = 3–15 independent experiments in duplicate; IC₅₀ values are indicated. (C) The influence of Scaff10-8 on the interaction of RhoA with the recombinant DH domain of AKAP-Lbc in the absence of the PH domain was determined by Alpha screen. Scaff10-7/59 was included as negative controls as they did not interfere with interaction of the DHPH domain and RhoA in the HTRF shown in Fig 2. n = 3–15 independent experiments in duplicate. The IC₅₀ value is indicated.

[Back]

[Back]

Fig 3. Scaff10 derivatives.

(A) Overview of the synthesis of Scaff10 derivatives. By addition of iodine in methanol (a), acetophenone derivatives (1) reacted with the corresponding α-iodoketones (2a), removal of excessive iodine by addition of Na₂SO₃-solution (b). Resorcinol (3) and diethyl-2-acetylglutarat (4) were transformed into the 7-hydroxycoumarin derivative ethyl 3-(7-hydroxy-4-methyl-2-oxo-chromen-3-yl)propanoate (5a) in ethanolic HCl (c). In the presence of excess potash, 5 reacted with α-haloketone derivatives (2) in a Williamson ether synthesis at 55°C in acetone (d) to 6. Saponification to 7 was carried out in 1 M NaOH at 55–95°C and from 0.3–16 h (e). Final cyclization of ketones to furocoumarin derivatives (8) was carried out upon further heating in NaOH solution (60–110°C) for various times (0.75–10 h) (f). R is indicated in Table 1 and (C). (B) Compounds of the generalized structures 6–8 from (A) were allocated into classes 6–8, respectively. (C) Structures of Scaff10 derivatives, which inhibit the AKAP-Lbc/DHPH-RhoA interaction in the homogenous time-resolved fluorescence (HTRF) assay depicted in Fig 3A and B. IC₅₀ values (μM ± SEM) were obtained from n = 3–15 independent HTRF experiments carried out in duplicate (S3 Table). Structural differences compared to Scaff10-8 are shown in grey. R² indicates the coefficient of determination.

[Back]

[Back]

Table 1. List of substituents R¹ and R² of Scaff10 derivatives.

Scaff10 derivative | class | R¹ | R² | IC₅₀ ± SEM μM | log P
Scaff10 | 8 | -CH₃ | 4-methoxyphenyl- | - | 4.60
Scaff10-6 | 7 | -C₂H₄COOH | 4-methoxyphenylethanone- | - | 3.65
Scaff10-7 | 6 | -C₂H₄COOC₂H₅ | 4-methoxyphenylethanone | - | 4.22
Scaff10-8 | 8 | -C₂H₄COOH | 4-methoxyphenyl- | 34.1 ± 1.7 | 4.36
Scaff10-26 | 8 | -C₂H₄CON(CH₃)₂ | 4-methoxyphenyl- | - | 4.02
Scaff10-30 | 8 | -C₂H₄COOH | 4-(trifluoromethyl)phenyl- | 47.8 ± 7.8 | 5.19
Scaff10-32 | 8 | -C₂H₄COOH | 4-pyridyl- | - | 3.10
Scaff10-35 | 7 | -C₂H₄COOH | 4-(dimethylamino)phenylethanone- | - | 3.83
Scaff10-38 | 8 | -C₂H₄COOH | 4-phenoxyphenyl- | 36.7 ± 3.3 | 5.81
Scaff10-40 | 7 | -C₂H₄COOH | 4-biphenyl- | 20.8 ± 2.6 | 5.19
Scaff10-41 | 8 | -C₂H₄COOH | 4-biphenyl- | 29.1 ± 2.6 | 5.77
Scaff10-43 | 7 | -C₂H₄COOH | 6-methoxynaphthyl-ethanone- | - | 4.56
Scaff10-44 | 8 | -C₂H₄COOH | 6-methoxy-2-naphthyl- | 20.7 ± 2.5 | 5.27
Scaff10-46 | 8 | -CH₃ | 4-biphenyl- | - | 6.13
Scaff10-47 | 8 | -CH₃ | 6-methoxy-2-naphthyl- | - | 5.51
Scaff10-48 | 8 | -C₂H₄COOCH₃ | 4-methoxyphenyl- | - | 4.59
Scaff10-49 | 8 | -CH₂COOH | 4-methoxyphenyl- | 56.4 ± 4.5 | 3.90
Scaff10-51 | 8 | -C₂H₄CONHOH | 4-methoxyphenyl- | - | 3.78
Scaff10-58 | 8 | -C₂H₄COOH | Phenyl- | 66.7 ± 7.5 | 4.38
Scaff10-59 | 6 | -C₂H₄COOC₂H₅ | 4-methoxyphenyl- | - | 4.55
Scaff10-61 | 8 | -C₂H₄CONHCH₂COOH | 4-methoxyphenyl- | 64.0 ± 6.0 | 3.46
Scaff10-63 | 7 | -C₂H₄COOH | 3'-methoxy-1,1'-biphenyl-4-ethanone- | 24.4 ± 8.4 | 5.17
Scaff10-64 | 8 | -C₂H₄COOH | 4-(3‘-methoxyphenyl)phenyl- | 28.9 ± 9.3 | 5.75

DOI: 10.1371/journal.pone.0191423.t001

Scaff10 derivatives were synthesized and the active compounds, i.e. inhibitors of the interaction of the DHPH domain of AKAP-Lbc and RhoA, were allocated into classes 6–8 (Fig 3A and 3B). IC₅₀ values were obtained in HTRF assays (see Fig 2 and S3 Table). log P values were calculated.

[Back]

[Back]

Fig 4. The Scaff10 derivative Scaff10-8 binds to RhoA but not to the DHPH domain of AKAP-Lbc.

(A-D) Microscale thermophoresis (MST) takes advantage of the phenomenon of directed movement of particles in a temperature gradient. Binding events lead to changes in the hydration shell of biomolecules and a relative change of movement of the molecular complex along a temperature gradient. Using such changes, binding affinities can be determined [47]. MST assays were carried out with (A) the recombinant DHPH domain of AKAP-Lbc fused with GFP and RhoA as a ligand and (B) fluorescent 647-RhoA and the His-tagged AKAP-Lbc/DHPH domain as a ligand. (C) MST assays for the analysis of the binding of Scaff10-8 to 647-RhoA. Upper panels: The concentration of fluorescent 647-RhoA remained constant and Scaff10-8 (left) and Scaff10-7 as a negative control (right) were titrated in increasing concentrations. Lower panels: Values of fluorescence corresponding to upper panels. (D) MST assay showing no binding of Scaff10-8 or Scaff10-7 to GFP-DHPH. Upper panels: The concentration of fluorescent GFP-AKAP-Lbc/DHPH remained constant and Scaff10-8 (left) and Scaff10-7 (right) were titrated in increasing concentrations. Lower panels: Values of fluorescence corresponding to upper panels. The KD value for the binding of Scaff10-8 to 647-RhoA is 20 ± 11 μM. F norm = normalized fluorescence (fluorescence steady state/fluorescence initial state) indicated in ‰. n = 3–5. Mean ± SEM.

[Back]

[Back]

Fig 5. Scaff10-8 binds to GDP- and GTP-bound RhoA.

Isothermal titration calorimetry (ITC) measurements using recombinant GST-tagged RhoA in its (A) GDP- and (B) GTP-bound form and Scaff10-8 were performed (GDP and GTPγS, 2 mM each). KD values are indicated. (C) As a control, the measurements were carried out with GST alone.

[Back]

[Back]

Fig 6. Scaff10-8 is not cytotoxic.

(A) Western blot showing protein expression of AKAP-Lbc and RhoA in five different cell lines and in primary rat inner medullary collecting duct (IMCD) cells: All cells express full-length AKAP-Lbc (308 kDa) and shorter splice variants. RhoA (22 kDa) is also expressed in all cells. MW = molecular weight. (B) Cytotoxicity was assessed after 24–72 h of incubation with Scaff10-8 (3, 30, 100 μM). Staurosporine as inducer of apoptosis was used as a positive control. Absorption was determined at 450 nm and was related to medium absorption (blank). DMSO was used as a control. Normalised to untreated cells after 24 h, three independent experiments with four data points each are shown. n = 3. Statistically significant differences were determined applying one-way ANOVA with posthoc Bonferroni. Mean ± SEM is plotted.

[Back]

[Back]

Fig 7. Scaff10-8 inhibits the AKAP-Lbc-mediated activation of RhoA in cells.

In HEK293 cells, full length AKAP-Lbc was transiently expressed alone or in combination with the constitutively active version, Gα12QL, of the G protein α subunit Gα12. Gα12 selectively activates the GEF activity of AKAP-Lbc [28]. Where indicated, the RhoGEFs LARG and PDZ-RhoGEF were expressed. The cells were left untreated or incubated with Scaff10-8 in concentrations of 30 or 100 μM. The lower panels show detection of the indicated proteins by Western blotting. n = 3. Statistically significant differences were determined applying one-way ANOVA with posthoc Bonferroni. Mean ± SEM is plotted.

[Back]

[Back]

Fig 8. Scaff10-8 promotes the redistribution of AQP2 to the plasma membrane of primary IMCD cells, which is independent of cAMP elevation and associated with depolymerization of F-actin.

(A) Upper panel. IMCD cells were treated with DMSO (1%; control), the solvent of Scaff10-8, or forskolin (10 μM, 30 min) to stimulate cAMP synthesis. Lower panels: The cells were treated for 1 hour with Scaff10-8 (30 μM) alone (control) or with Scaff10-8 and forskolin. Forskolin (10 μM) was added for the final 30 min of Scaff10-8 incubation. AQP2 (green) was detected with specific primary and Cy3-coupled secondary antibodies, F-actin (red) with Alexa Fluor 647-Phalloidin and nuclei with DAPI (blue). Signals were visualized using a laser scanning microscope. Representative images are shown. n = 3. The magnified views were derived from the indicated boxes. (B) The signal intensities arising from intracellular and plasma membrane AQP2 were recorded, related to nuclear signal intensities, and the ratios of plasma membrane to intracellular fluorescence signal intensities were calculated (n = 30 cells per condition). Ratios > 1 indicate a predominant localization of AQP2 at the plasma membrane. Statistically significant differences were calculated using one-way ANOVA with posthoc Bonferroni. Mean ± SEM; *, p ≤ 0.05; *** p ≤ 0.001.

[Back]

[Back]

Fig 9. Scaff10-8 does not promote the insertion of AQP2 into the plasma membrane of IMCD cerlls.

(A) IMCD cells were treated with either compound (30 μM) or DMSO for 1 or 24 h. Membrane proteins were biotinylated followed by precipitation with streptavidin agarose beads. Pulldown (PD) and supernatant fractions were separated by 12% SDS-PAGE. Pan-Cadherin was used as a loading control for the PD fraction, Hsp90 for the supernatants. A representative Western blot is shown. (B) Signals from A were quantified by densitometric analysis. The amount of AQP2 in the PD fractions were related to Pan-Cadherin. MW = molecular weight. M = molecular weight standard. cg = complex glycosylated; hm = high mannose glycosylated; ng = non-glycosylated. 10–8 = Scaff10-8. n = 3. Mean ± SEM is plotted.

[Back]

[Back]

Fig 10. Scaff10-8 inhibits activation of RhoA in primary IMCD cells.

IMCD cells were incubated with Scaff10-8 (30 μM, 1 h). DMSO (1%), the solvent of Scaff10-8, served as a control. The cells were lysed, (A) active RhoA was precipitated with the RhoA binding domain of Rhotekin coupled to sepharose beads, (B) active Cdc42 and Rac1 were precipitated with with GST fused to the (p21) binding domain (PBD) of p21 activated kinase 1 protein (PAK-1) coupled to sepharose beads. Inputs and pulldown fractions were separated by SDS-PAGE. Hsp90 or GAPDH were used as loading controls. Representative Western blots from 3–5 independent experiments are shown. Signals were semiquantitatively analyzed by densitometry. The amount of active RhoA was related to normalized RhoA (total RhoA to Hsp90 (Input)). Accordingly, active Cdc42 and Rac1 were related to normalized Cdc42 and Rac1, respectively (total RhoA to GAPDH (Input)). PD, Pulldown. n = 3–5. Statistically significant differences were determined using one-way ANOVA with posthoc Bonferroni. Mean ± SEM is plotted. *, p ≤ 0.05; **, p ≤ 0.01; *** p ≤ 0.001.

[Back]