International Journal of Chronic Obstructive Pulmonary Disease

Int J Chron Obstruct Pulmon Dis. 13: 69-77

The impact of indacaterol/glycopyrronium fixed-dose combination versus tiotropium monotherapy on lung function and treatment preference: a randomized crossover study – the FAVOR study

Peter Kardos¹, Ina Hagedorn-Peinz²

1. Pulmonary Department, Respiratory and Sleep Medicine at Red Cross Maingau Hospital, Group Practice Allergy, Frankfurt, Germany

2. Novartis Pharma GmbH, Nuremberg, Germany

Correspondence: Peter Kardos, Pulmonary Department, Respiratory and Sleep Medicine at Red Cross Maingau Hospital, Group Practice Allergy, Scheffelstrasse 33, 60318 Frankfurt am Main, Germany, Tel +49 691 505 3976, Email kardos@lungenpraxis-maingau.de

© 2018 Kardos and Hagedorn-Peinz. This work is published and licensed by Dove Medical Press Limited

DOI: 10.2147/COPD.S146189

Published online: 22 December 2017

Abstract

Background

The objective of the FAVOR study was to evaluate the effect of indacaterol/glycopyrronium (IND/GLY) versus tiotropium on peak forced expiratory volume in 1 s (FEV₁) and also to investigate patient satisfaction and treatment preference.

Methods

Patients with moderate-to-severe airflow limitation (FEV₁/forced vital capacity ratio of <0.70), those with a COPD assessment test score of ≥10, and those who were maintained on tiotropium HandiHaler® therapy prior to enrollment were recruited for the study, and randomized (1:1) to receive either 4 weeks open-label IND/GLY (110/50 μg) once daily followed by 4 weeks of tiotropium (18 μg) once daily or vice versa. The primary endpoint was FEV₁ 1 h post-inhalation after 4 weeks of treatment. Other endpoints included patient’s and physician’s preference for treatment, patient’s satisfaction evaluated using a study-specific questionnaire and the abbreviated Treatment Satisfaction Questionnaire for Medication, and safety and tolerability.

Results

Eighty-seven out of 88 randomized patients completed the study and showed significantly higher FEV₁ 1 h post-inhalation after 4 weeks of treatment with IND/GLY versus tiotropium (treatment difference =0.081 L; p=0.0017). IND/GLY was preferred over tiotropium among the patients (69.4% versus 30.6%, p=0.0004) and the physicians (81.6% versus 18.4%, p<0.0001). A higher proportion of the patients stated they were very satisfied or satisfied with IND/GLY versus tiotropium with regard to dyspnea reduction (79.3% versus 58.0%, respectively) and reduction of dyspnea on exertion (72.4% versus 43.2%, respectively). Patients treated with IND/GLY showed significant improvement in Treatment Satisfaction Questionnaire for Medication domain scores versus tiotropium. IND/GLY demonstrated a good safety and tolerability profile.

Conclusion

This study indicated that, beyond FEV₁, important patient-reported outcomes improved with the open-label dual bronchodilator IND/GLY when compared with tiotropium. This study suggests that individual patients felt the lung function benefits with IND/GLY compared with tiotropium, which, in turn, may also have contributed to the preference for IND/GLY.

Introduction

COPD, a debilitating and progressive lung disease, is one of the major causes of morbidity and mortality worldwide and is expected to become the third leading cause of death by 2030.1,2 In Germany, the overall COPD prevalence is about 13% in the population >40 years of age, with an increase of about 40% observed in men >70 years old.3

Long-acting bronchodilators are the mainstay for maintenance therapy of COPD and include 2 categories of drugs: muscarinic antagonists (anticholinergics) and β₂ agonists.4 For patients who continue to have severe symptoms on long-acting β₂ agonist (LABA) or long-acting muscarinic antagonist (LAMA) monotherapy, the Global Initiative for Chronic Obstructive Lung Disease (GOLD) strategy recommends combining a LABA along with a LAMA, 2 bronchodilators with synergistic mechanisms, for achieving better symptomatic relief.4–6 Indacaterol/glycopyrronium (IND [LABA]/GLY [LAMA]) 110/50 μg once daily (o.d.) is an approved inhaled fixed-dose combination that demonstrates a significant and clinically important improvement in lung function7,8 and a reduction in the use of rescue medications8,9 versus LAMA monotherapy, along with a favorable long-term (52 weeks) safety profile.10 However, according to GOLD 2013, the strategy valid at the time of starting recruitment for the study and data available for different LABA/LAMA combinations on patient-related outcomes (PROs), that is, dyspnea and quality of life, were less consistent.11 It also remains unclear as to what is the minimal clinical important increase in FEV₁ that would have an impact on short-term PROs.

Taking patient’s treatment preferences into consideration may help improve treatment adherence and consequently the treatment outcomes,12 and it is also recommended by GOLD.5 We hypothesize that treatment improvement could influence patient’s preference for medication. Hence, we compared IND/GLY and tiotropium, the 2 single-dose, o.d. bronchodilator treatments based on their potential for lung function improvement and the subsequent impact on patients’ overall treatment preferences. Each treatment was delivered by a comparable single-dose dry powder inhaler, thus minimizing the impact of the device on patient preference.

FAVOR is the first study to compare IND/GLY (110/50 μg o.d.; administered via Breezhaler® inhaler) versus tiotropium HandiHaler® (18 μg o.d.) in German COPD patients who were being treated with tiotropium monotherapy before entering the study and reported significant complaints regarding their symptoms. The primary objective of the study was to assess improvement in lung function with IND/GLY treatment versus tiotropium (18 μg o.d.). Furthermore, because it is unclear as to what is the minimal clinical important increase in FEV₁ that would translate into important PROs, the study investigated both FEV₁ and patient satisfaction and preference with the fixed-dose combination of IND/GLY compared with tiotropium.

Methods

Study design

This randomized, open-label, multicenter, crossover study was conducted at 18 centers in Germany (Clinical Trial registration: NCT02125734; ClinicalTrials.gov). The first patient was enrolled on April 24, 2014, and the last patient’s last visit occurred on January 12, 2015. The study consisted of a 7-day screening period and two 4-week treatment periods (Figure 1). The patients either continued to receive prior tiotropium monotherapy or underwent treatment escalation from tiotropium monotherapy to IND/GLY combination. This is in line with the GOLD strategy document, which recommends an escalation of therapy for the patients who need an intensified therapeutic approach.5,11 The patients were randomized (1:1 ratio) into 2 sequences: sequence 1 (IND/GLY – tiotropium), open-label IND/GLY 110/50 μg o.d. on days 1–28 (treatment period 1) followed by tiotropium 18 μg o.d. on days 29–56 (treatment period 2), or sequence 2 (tiotropium – IND/GLY), the same regimens in reverse order. There was no washout period between the 2 treatment periods. Patients were instructed to inhale the study medications between 7 and 11 AM: Breezhaler® inhaler was used for IND/GLY, and HandiHaler® device was used for tiotropium. All patients received training before taking study drugs to familiarize them with both devices in order to minimize the potential impact of device change even though both devices were similar according to the optimum inhalation technique.

Patients

Patients of either gender, aged ≥40 years, diagnosed with stable COPD, and who had a COPD assessment test (CAT) score of ≥10 while taking tiotropium, and thus belonged to high-symptom groups, Group B or D (as per GOLD 201311), were recruited in the study. Patients were included if they had a post-bronchodilator forced expiratory volume in 1 s (FEV₁)/forced vital capacity ratio of <0.70, a post-bronchodilator FEV₁ of ≥30% and <80% of predicted normal values, and a smoking history of at least 10 pack-years at screening. Patients were required to be on stable tiotropium (as maintenance COPD monotherapy) for at least 8 weeks before screening. Inhaled corticosteroids were allowed to be continued without dose adaptations. Salbutamol (100 μg/puff) was the only rescue medication that was allowed during the study; however, its use was restricted to within 6 h of the start of each visit unless absolutely necessary.

Exclusion criteria

COPD exacerbation that required treatment with antibiotics and/or systemic steroids (oral or intravenous) and/or hospitalization in the 6 weeks prior to or during screening. Other inclusion and exclusion criteria, and the list of prohibited medications are provided in online supplementary materials (Tables S1 and S2, respectively).

The study protocol was approved by the local health authority and ethics committees of each participating center (list provided in Table S3). The study was conducted in accordance with the Declaration of Helsinki and Good Clinical Practice guidelines. All participants provided written informed consent.

Assessments

Efficacy

The primary endpoint was FEV₁ 1 h post-inhalation after 4 weeks of treatment with IND/GLY versus tiotropium. Patients underwent spirometry testing (as per American Thoracic Society/European Respiratory Society standards) on days 28 and 56 after administration of the study drugs. Other endpoints included the following: patients’ and physicians’ preferences for either treatment; patients’ subjective reason for preference (Table S4); physicians’ rational for decision for future treatment, patients’ satisfaction using the Treatment Satisfaction Questionnaire for Medication (TSQM-9; scores range: 0–100, with higher scores indicating higher satisfaction);13 and patient reported satisfaction on symptom relief using a study-specific questionnaire (a new non-validated tool tested for the first time for feasibility) (Table S5). The use of rescue medication was assessed throughout the study.

A post hoc analysis of the data was carried out to evaluate whether the improvement in FEV₁ levels had any influence on the treatment choices made by the patients. The FEV₁ 1 h post-inhalation was determined separately in the subgroups of patients who preferred IND/GLY or tiotropium as a treatment choice.

Safety assessments

Treatment-emergent adverse events (TEAEs) were recorded as per system organ class from Medical Dictionary for Regulatory Activities (version 17.1). Occurrence of COPD exacerbations was noted during the study. Additionally, clinical laboratory tests, electrocardiograms, vital sign measurements, physical examination, and urine analysis were performed.

Statistical analysis

Based on a previous study, an effect size in relation to FEV₁ of about 0.441 was observed.8 Considering a 20% dropout rate, ~88 patients were to be recruited to achieve 90% power on a 2-sided, 5% significance level to reject the null hypothesis of equal efficacy in a crossover, within patient comparison. Power analysis was not required for other parameters.

An analysis of variance model was used for between-group comparison (IND/GLY versus tiotropium) of the improvements in FEV₁ 1 h post bronchodilation, with center, period, patient within center and treatment as factors (5% level of significance [2-sided], 2-tailed 95% CI). Adjusted (least square) means are provided as point estimates for the pair-wise treatment contrast. Other endpoints were reported as frequency and percentage, and were assessed using Fisher’s exact test (2-tailed, 5% level of significance).

Results

Patient disposition and baseline characteristics

Of the 119 patients screened, 88 were randomized, with 43 patients randomized to sequence 1 (IND/GLY – tiotropium) and 45 patients randomized to sequence 2 (tiotropium – IND/GLY) (Figure 2). Overall, the study drug exposure was similar across the 2 treatment groups (~28–29 days), and the treatment compliance was almost 100% with both treatments.

The demographic and baseline characteristics are shown in Table 1. A majority of the patients were men (64.8%) and Caucasian (98.9%; Table 1). The mean age across both groups was 65 years. Approximately 64% and 36% of all patients were classified as GOLD B and GOLD D (as per GOLD 2013 criteria), respectively. The mean post-bronchodilator FEV₁% was ~58% across both treatment groups (Table 1). Hypertension (52.3%, n=46) was the most prevalent comorbidity across both the groups, followed by hyperlipidemia (11.4%, n=10), hypercholesterolemia (10.2%, n=9), coronary artery disease (10.2%, n=9), diabetes mellitus (9.1%, n=8), and hypothyroidism (9.1%, n=8).

Efficacy

Lung function

On the basis of the combined data for treatment periods 1 and 2, after 4 weeks of treatment, there was a significant increase observed in FEV₁ 1 h post-inhalation with IND/GLY compared with tiotropium (treatment difference [Δ] =0.081 L; p=0.0017) (Figure 3).

Treatment preference

Almost all patients in both the treatment sequences completed the questionnaires (Table 2). Overall, the proportion of patients who preferred IND/GLY (69%) was greater than those who preferred tiotropium (31%). The preference rate for IND/GLY was notably greater when used first in the treatment sequence (Table 2). Physicians’ preference for treatment was in line with the patients’ treatment choice (Table 2).

Subjective reasons of preference

Across all frequently cited very important/important reasons for preferring one treatment or the other, a higher percentage of patients and physicians preferred IND/GLY compared with tiotropium (Figure 4). Reduction in dyspnea was the most frequently cited reason by patients (91.5%) and the physicians (97.2%) for preferring IND/GLY.

Symptom relief and use of rescue medication

Overall, a higher number of patients experienced symptom relief while receiving IND/GLY treatment than tiotropium, indicating greater treatment satisfaction with IND/GLY (Figure 5 and Table S6). A higher proportion of patients stated they were very satisfied or satisfied with IND/GLY (79.3%) compared with tiotropium (58.0%) with regard to dyspnea reduction after 4 weeks. The difference was even higher when considering shortness of breath on exertion (IND/GLY 72.4% versus tiotropium 43.2%) (Figure 5).

Rescue medication use was higher in patients when on tiotropium treatment than IND/GLY (mean [SD]: 25.88 [36.77] days versus 17.87 [31.17] days; p=0.0023). The number of days with rescue medications was numerically higher during treatment with tiotropium (635 days) than with IND/GLY (449 days), indicating better symptom control with IND/GLY.

Treatment satisfaction, effectiveness, and convenience

Overall, the mean TSQM-9 scores for the domains “effectiveness” and “global satisfaction” were higher with IND/GLY compared with tiotropium (least square mean difference [IND/GLY versus tiotropium]: 13.02 [p=0.0001] and 11.17 [p=0.0035], respectively) (Figure 6).

Post hoc analysis

In contrast to the primary outcome (post-bronchodilation FEV₁ in both groups), in patients who preferred tiotropium, the FEV₁ 1 h post treatment levels did not differ significantly between the 2 treatments, with levels in IND/GLY group slightly lower than tiotropium (Δ=−0.019 L; p=0.8127) irrespective of the treatment sequence (Figure 7). However, in patients who preferred IND/GLY, the FEV₁ 1 h posttreatment levels significantly improved with IND/GLY versus tiotropium (Δ=0.109 L; p<0.0001) (Figure 7). The analysis showed among others that patients preferring IND/GLY had slightly more severe COPD than those preferring tiotropium (severity according to GOLD 2010: Stage II 55.9% versus 65% and Stage III 40.7% versus 30.8%; group classification according to GOLD 2015: Group B 59.3% versus 69.2% and Group D 40.7% versus 30.8%) (Table S7).

Safety

The incidence of TEAEs was higher with IND/GLY (31.8%) versus tiotropium (23.9%); almost all TEAEs were of mild severity (Table 3). The most common drug-related TEAE was cough, which was observed after administration of IND/GLY (13.6% of patients in IND/GLY group and 4.5% in tiotropium group). “Cough” persisted for a transient time and resolved after 1 day in the majority of the patients (60%). One patient reported serious TEAE that occurred, while on IND/GLY treatment, this patient discontinued prematurely. There were no deaths reported in the study.

Discussion

In the FAVOR study, the open-label IND/GLY o.d. was compared with tiotropium o.d. monotherapy in similar single-dose dry powder inhalers in COPD patients with moderate-to-severe airflow limitation and a CAT score ≥10. The patients were on tiotropium treatment prior to enrollment, and according to randomization, they either continued to receive tiotropium or were directly shifted to IND/GLY without any washout period, reflecting what would occur in clinical practice. This kind of treatment escalation is in line with the GOLD strategy document.5 In this study, the primary objective was achieved by demonstrating superiority of IND/GLY over tiotropium after 4 weeks of treatment in terms of lung function, assessed by FEV₁ 1 h post-inhalation. It was observed that both patients’ and physicians’ preferences for IND/GLY were higher compared with those of tiotropium.

Consistent with other clinical trials, irrespective of treatment sequence, in the FAVOR study, IND/GLY showed statistically significant improvement in FEV₁ 1 h post-inhalation levels compared with tiotropium. Improvement in lung function is inversely correlated with the use of rescue medications.14,15 This was also evident in our study: the patients on IND/GLY showed less need for rescue medications than patients on tiotropium. Consistently, more patients showed signs of symptom relief when treated with IND/GLY than with tiotropium, indicating greater treatment effect and satisfaction with IND/GLY.

Importantly, alongside with the improvement in lung function, this study demonstrated that more patients preferred dual therapy with IND/GLY over monotherapy with tiotropium. The treatment choice was influenced by the sequential order of drug administration; patients were more likely to prefer IND/GLY when given first in the sequence. This may be because the perception of more effective medication was perhaps much pronounced when patients were switched from the standard therapy (prior tiotropium treatment) to IND/GLY and then returned back to tiotropium in the last sequence. However, it was an open-label study; thus, patients’ expectations could have influenced drug preference. Efficacy was the main determinant underlying patients’ preference for either of the study medications. The very important/important reasons cited by patient for using both the medications were mainly related to reduced airflow limitation (as shown in the post hoc analysis), improved dyspnea, less cough/wheezing, less sputum production, and less chest tightness. Based on each of these efficacy determinants, IND/GLY was preferred by more patients than tiotropium. More physicians preferred treatment with IND/GLY than with tiotropium primarily due to reduced dyspnea, less chest tightness, and fast onset of action. However, these data should be interpreted with much caution, since the physicians were aware of the potential dual versus mono treatment benefits and may have expected better efficacy. Reduction in dyspnea was the most frequently cited reason for preferring IND/GLY by patients and the physicians. Based on the post hoc analysis, the patients preferring IND/GLY were observed to have better improvement in FEV₁ levels with IND/GLY compared with tiotropium (about 100 mL increase in FEV₁). This indicated that even an improvement in lung function of about 100 mL is subjectively detectable and is important for the patient. This is in line with the current notion of COPD-related minimal clinically important difference, whereby a decrease of 100 mL in pre- or trough-FEV₁ is considered to be of clinical significance. Furthermore, this analysis showed that patients preferring IND/GLY had slightly more severe COPD than those preferring tiotropium (severity according to GOLD 2010: Stage II 55.9% versus 65% and Stage III 40.7% versus 30.8%; group classification according to GOLD 2015: Group B 59.3% versus 69.2% and Group D 40.7% versus 30.8%). However, it is important to note that this does not reflect any bias in the study design as the patients were properly randomized, but rather confirms the hypothesis that 1) patients who experience more symptoms benefit more from dual bronchodilation than from monotherapy and 2) patients who experience a better treatment effect prefer the more effective therapy.

In patients who preferred tiotropium, no statistical difference in FEV₁ levels between the 2 treatments was observed. This result suggests that some patients may not experience an increase in lung function with dual bronchodilation therapy when compared with a monotherapy, hence preferring the monotherapy treatment.

Treatment satisfaction may help to gauge a patient’s perception on current treatment.16,17 In this study, the TSQM-9 score was higher with IND/GLY than with tiotropium, particularly for the domains of “Effectiveness” and “Global satisfaction”, which could result in better adherence. In contrast, for “Convenience,” the scores were comparable between treatments. Both the drugs were given o.d. and were inhaled using similar single-dose powder inhaler devices. Therefore, a device effect was unlikely, and the level of convenience while using devices for inhaling IND/GLY or tiotropium perhaps would be similar.

The safety profiles of both the drugs were consistent with the reported safety in global trials,7–10 with no new safety issues reported with IND/GLY or tiotropium in the FAVOR study. A disproportionate ratio of occurrences of cough between the 2 treatments (IND/GLY – 13.6% patients and tiotropium – 4.5% patients) was observed. Apparently, this observation seems to be contrary to the fact that more patients preferred IND/GLY over tiotropium based on the subjective reason “less cough and wheezing” and “less sputum production”. Notably, the TEAE cough persisted for a transient time, and majority of the patients recovered from this event after 1 day. As the treatment progressed, patients experienced fewer symptoms of cough and wheezing as evident based on their reasons for preferring IND/GLY.

As this was an open-label study, the patients’ and doctors’ perceived views about the study medications, be it positive or negative, perhaps had some influence on the study outcomes. IND/GLY was only introduced in the German market at the start of this study, while tiotropium is a well-established drug available commercially for over a decade. This could have raised the expectations for the new drug, which could have influenced patients’ and physicians’ subjective judgment. Nevertheless, the data obtained gives a consistent picture wherein the improvement in lung function experienced by patients (reduction in airflow limitation) with IND/GLY may have led to a consistent improvement in symptoms of COPD like dyspnea. This might have mainly contributed to patients’ feeling of well-being, resulting in a preference for IND/GLY. Indeed, single patients without improvement in FEV₁ did not prefer IND/GLY.

In conclusion, the results of the FAVOR study demonstrate the benefit of IND/GLY 110/50 μg o.d. combination therapy versus tiotropium 18 μg o.d. monotherapy for treating stable COPD patients with persistent complaints based on both patient-reported outcomes and lung function. Further studies are required to investigate whether the favored treatment option translates into improved adherence and long-term treatment outcomes.

Figure 1View larger versionFigure 1. Study design.

Notes: During screening, patients received their current COPD treatment and were instructed to abstain from tiotropium inhalation on visit 3 (randomization). Inhaled corticosteroids were allowed to be taken throughout the study when started 30 days prior to screening visit.

Abbreviations: IND/GLY, indacaterol/glycopyrronium; o.d., once daily; V, visit.

Figure 2View larger versionFigure 2. Patient disposition (full analysis set).

Notes: aForty-three patients were randomized into the sequence 1 (IND/GLY – tiotropium) and 45 patients were randomized into sequence 2 (tiotropium – IND/GLY). Three patients randomized to the IND/GLY – tiotropium group were treated vice-versa (ie, tiotropium – IND/GLY). bOne patient discontinued due to adverse event in tiotropium – IND/GLY group after start of treatment period 2.

Abbreviation: IND/GLY, indacaterol/glycopyrronium.

Figure 3View larger versionFigure 3. FEV₁ (L) 1 h post-inhalation after 4 weeks of each treatment (full analysis set).

Note: Data are least square means ±95% CI.

Abbreviations: FEV₁, forced expiratory volume in 1 s; IND/GLY, indacaterol/glycopyrronium.

Figure 4View larger versionFigure 4. Very important/important subjective reasons cited by patients and physicians for a preference for IND/GLY or tiotropium (full analysis set).

Notes: Data are displayed as percentage of patients/physicians that rated the provided reasons from a 5-item scale (very important, important, neutral, unimportant, and very unimportant) as very important or important. Two patients and 1 physician did not answer the questionnaire.

Abbreviation: IND/GLY, indacaterol/glycopyrronium.

Figure 5View larger versionFigure 5. Patients very satisfied/satisfied with their treatment (full analysis set).

Notes: Data are displayed as percentage of patients that were very satisfied or satisfied with the medication in terms of the provided items. All patients answered the questionnaire with exception of 1 patient who discontinued the study.

Abbreviation: IND/GLY, indacaterol/glycopyrronium.

Figure 6View larger versionFigure 6. TSQM-9 questionnaire results by domain (full analysis set).

Notes: Data are least square mean (±95% CI) of TSQM-9 total scores by domain (effectiveness, convenience, and global satisfaction) determined after 4 weeks of treatment. *p=0.0001, **p=0.0035. All patients answered the questionnaire with exception of 1 patient who discontinued the study.

Abbreviations: IND/GLY, indacaterol/glycopyrronium; TSQM-9, Treatment Satisfaction Questionnaire for Medication.

Figure 7View larger versionFigure 7. Improvement in FEV₁ (L) 1 h post-inhalation based on medication preference (full analysis set).

Note: Data are in least square mean ±95% CI.

Abbreviations: FEV₁, forced expiratory volume in 1 s; IND/GLY, indacaterol/glycopyrronium.

See full tableTable 1. Demographic and baseline characteristics (full analysis set)

See full tableTable 2. Treatment preference after receiving both the treatments (full analysis set)

See full tableTable 3. Incidences of TEAEs reported by ≥2.5% of patients in either group (safety analysis set)

Acknowledgments

The authors thank patients and investigators who participated in the study. They also thank Ananya Chikramane, PhD, and David Bergin, PhD (professional medical writers; Novartis) for assistance in the preparation of this paper. Writing support was funded by Novartis Pharma GmbH, Germany. This study was funded and supported by Novartis Pharma GmbH, Germany.

Footnotes

Disclosure

Dr Peter Kardos reports personal fees and study honoraria for his practice from Novartis during the conduct of the study; personal fees and other from AstraZeneca and Boehringer Ingelheim; and personal fees from Chiesi, GSK, Menarini, and Teva, outside the submitted work. Dr Ina Hagedorn-Peinz is an employee of Novartis Pharma GmbH and was in a medical role during the study conduct and in a commercial role during the manuscript development. The authors report no other conflicts of interest in this work.

Articles from International Journal of Chronic Obstructive Pulmonary Disease are provided here courtesy of Dove Press

PMC Copyright Notice

The articles available from the PMC site are protected by copyright, even though access is free. Copyright is held by the respective authors or publishers who provide these articles to PMC. Users of PMC are responsible for complying with the terms and conditions defined by the copyright holder.

Users should assume that standard copyright protection applies to articles in PMC, unless an article contains an explicit license statement that gives a user additional reuse or redistribution rights. PMC does not allow automated/bulk downloading of articles that have standard copyright protection.

See the copyright notice on the PMC site, https://www.ncbi.nlm.nih.gov/pmc/about/copyright/, for further details and specific exceptions.

References

Tashkin DP, author. Long-acting anticholinergic use in chronic obstructive pulmonary disease: efficacy and safety. Curr Opin Pulm Med. 2010;16(2):97–105. [PubMed]

World Health Organization, author. The top 10 causes of death. [webpage on the Internet]. . Available from: http://www.who.int/mediacentre/factsheets/fs310/en/. Accessed August 17, 2017

Kardos P, Vogelmeier C, Buhl R, Criee CP, Worth H, authors. The Prospective Non-Interventional DACCORD Study in the National COPD Registry in Germany: design and methods. BMC Pulm Med. 2015;15(1):2 [PubMed]

Tashkin DP, Ferguson GT, authors. Combination bronchodilator therapy in the management of chronic obstructive pulmonary disease. Respir Res. 2013;14(1):49 [PubMed]

GOLD, author. Global strategy for the diagnosis, management, and prevention of chronic obstructive pulmonary disease. 2016. . Available from: www.goldcopd.org. Accessed August 17, 2017

Cazzola M, Page C, authors. Long-acting bronchodilators in COPD: where are we now and where are we going? Breathe. 2014;10(2):110–120

Bateman ED, Ferguson GT, Barnes N, et al., authors. Dual bronchodilation with QVA149 versus single bronchodilator therapy: the SHINE study. Eur Respir J. 2013;42(6):1484–1494. [PubMed]

Wedzicha JA, Decramer M, Ficker JH, et al., authors. Analysis of chronic obstructive pulmonary disease exacerbations with the dual bronchodilator QVA149 compared with glycopyrronium and tiotropium (SPARK): a randomised, double-blind, parallel-group study. Lancet Respir Med. 2013;1(3):199–209. [PubMed]

Mahler DA, Kerwin E, Ayers T, et al., authors. FLIGHT1 and FLIGHT2: efficacy and safety of QVA149 (indacaterol/glycopyrrolate) versus its mono-components and placebo in patients with chronic obstructive pulmonary disease. Am J Respir Crit Care Med. 2015;192(9):1068–1079. [PubMed]

Dahl R, Chapman KR, Rudolf M, et al., authors. Safety and efficacy of dual bronchodilation with QVA149 in COPD patients: the ENLIGHTEN study. Respir Med. 2013;107(10):1558–1567. [PubMed]

GOLDGlobal strategy for the diagnosis, management, and prevention of chronic obstructive pulmonary disease2013Available from: www.goldcopd.orgAccessed August 17, 2017w

Restrepo RD, Alvarez MT, Wittnebel LD, et al., authors. Medication adherence issues in patients treated for COPD. Int J Chron Obstruct Pulmon Dis. 2008;3(3):371–384. [PubMed]

Bharmal M, Payne K, Atkinson MJ, Desrosiers MP, Morisky DE, Gemmen E, authors. Validation of an abbreviated Treatment Satisfaction Questionnaire for Medication (TSQM-9) among patients on antihypertensive medications. H Health Qual Life Outcomes. 2009;7(1):36

Jones PW, Donohue JF, Nedelman J, Pascoe S, Pinault G, Lassen C, authors. Correlating changes in lung function with patient outcomes in chronic obstructive pulmonary disease: a pooled analysis. Respir Res. 2011;12(1):161 [PubMed]

Donohue JF, Jones P, Bartels C, et al., authors. Relationship between change in trough FEV1 and COPD patient outcomes: pooled analysis of 23 clinical trials in patients with COPD. Eur Respir Soc. 2015;46:A1013

Revicki DA, author. Patient assessment of treatment satisfaction: methods and practical issues. Gut. 2004;53(4):40–44

Ruiz MA, Pardo A, Rejas J, Soto J, Villasante F, Aranguren JL, authors. Development and validation of the “Treatment Satisfaction with Medicines Questionnaire” (SATMED-Q). Value Health. 2008;11(5):913–926. [PubMed]

[Back]

Figure 1.

Study design.

Notes: During screening, patients received their current COPD treatment and were instructed to abstain from tiotropium inhalation on visit 3 (randomization). Inhaled corticosteroids were allowed to be taken throughout the study when started 30 days prior to screening visit.

Abbreviations: IND/GLY, indacaterol/glycopyrronium; o.d., once daily; V, visit.

[Back]

[Back]

Figure 2.

Patient disposition (full analysis set).

Notes: aForty-three patients were randomized into the sequence 1 (IND/GLY – tiotropium) and 45 patients were randomized into sequence 2 (tiotropium – IND/GLY). Three patients randomized to the IND/GLY – tiotropium group were treated vice-versa (ie, tiotropium – IND/GLY). bOne patient discontinued due to adverse event in tiotropium – IND/GLY group after start of treatment period 2.

Abbreviation: IND/GLY, indacaterol/glycopyrronium.

[Back]

[Back]

Figure 3.

FEV₁ (L) 1 h post-inhalation after 4 weeks of each treatment (full analysis set).

Note: Data are least square means ±95% CI.

Abbreviations: FEV₁, forced expiratory volume in 1 s; IND/GLY, indacaterol/glycopyrronium.

[Back]

[Back]

Figure 4.

Very important/important subjective reasons cited by patients and physicians for a preference for IND/GLY or tiotropium (full analysis set).

Notes: Data are displayed as percentage of patients/physicians that rated the provided reasons from a 5-item scale (very important, important, neutral, unimportant, and very unimportant) as very important or important. Two patients and 1 physician did not answer the questionnaire.

Abbreviation: IND/GLY, indacaterol/glycopyrronium.

[Back]

[Back]

Figure 5.

Patients very satisfied/satisfied with their treatment (full analysis set).

Notes: Data are displayed as percentage of patients that were very satisfied or satisfied with the medication in terms of the provided items. All patients answered the questionnaire with exception of 1 patient who discontinued the study.

Abbreviation: IND/GLY, indacaterol/glycopyrronium.

[Back]

[Back]

Figure 6.

TSQM-9 questionnaire results by domain (full analysis set).

Notes: Data are least square mean (±95% CI) of TSQM-9 total scores by domain (effectiveness, convenience, and global satisfaction) determined after 4 weeks of treatment. *p=0.0001, **p=0.0035. All patients answered the questionnaire with exception of 1 patient who discontinued the study.

Abbreviations: IND/GLY, indacaterol/glycopyrronium; TSQM-9, Treatment Satisfaction Questionnaire for Medication.

[Back]

[Back]

Figure 7.

Improvement in FEV₁ (L) 1 h post-inhalation based on medication preference (full analysis set).

Note: Data are in least square mean ±95% CI.

Abbreviations: FEV₁, forced expiratory volume in 1 s; IND/GLY, indacaterol/glycopyrronium.

[Back]

[Back]

Table 1.

Demographic and baseline characteristics (full analysis set)

Variables | Total (N=88)
Age, years | 65.0 (9.6)
Gender, n (%) |
 Men | 57 (64.8)
Race, n (%) |
 Caucasian | 87 (98.9)
BMI, kg/m² | 26.4 (4.8)
Smoking status, n (%) |
 Current smoker | 45 (51.1)
 Ex-smoker | 43 (48.9)
FEV₁ (% predicted) post-bronchodilator | 57.7 (13.6)
CAT score | 17.6 (5.4)
Duration of smoking, pack-years | 38.0 (17.8)
Number of COPD exacerbations in the previous year, n (%) |
 1 | 15 (17.0)
 0 | 73 (83.0)
Duration since first treatment with tiotropium, years | 2.5 (2.8)
Duration of tiotropium therapy prior to study entry, n (%) |
 <0.5 year | 20 (22.7)
 0.5–1 year | 15 (17.0)
 ≥1 year | 53 (60.2)
Number of comorbidities, n (%) |
 1 | 21 (23.9)
 2 | 11 (12.5)
 3 | 10 (11.4)
 >3 | 27 (30.7)
Severity of COPD (as per GOLD 2010), n (%) |
 Stage I | 3 (3.4)
 Stage II | 53 (60.2)
 Stage III | 32 (36.4)
Severity of COPD (as per GOLD 2015),a n (%) |
 Group B | 56 (63.6)
 Group D | 32 (36.4)

Notes: Data are mean (SD) unless otherwise stated.

a. None of the patients belonged to Groups A and C.

Abbreviations: BMI, body mass index; CAT, COPD assessment test; FEV₁, forced expiratory volume in 1 s; GOLD, Global Initiative for Chronic Obstructive Lung Disease.

[Back]

[Back]

Table 2.

Treatment preference after receiving both the treatments (full analysis set)

| IND/GLY – Tiotropium (N=40) | Tiotropium – IND/GLY (N=48) | Total (N=88)
Patient preference |  |  |
 IND/GLY | 31 (81.6%) | 28 (59.6%) | 59 (69.4%)*
 Tiotropium | 7 (18.4%) | 19 (40.4%) | 26 (30.6%)
 Not answered | 2 | 1 | 3
Physicians’ preference |  |  |
 IND/GLY | 36 (90.0%) | 35 (74.5%) | 71 (81.6%)**
 Tiotropium | 4 (10.0%) | 12 (25.5%) | 16 (18.4%)
 Not answered | 0 | 1 | 1

Notes: Data are absolute numbers (percentage) of patients.

*. p=0.0004 and

**. p<0.0001 (IND/GLY versus tiotropium).

Abbreviation: IND/GLY, indacaterol/glycopyrronium.

[Back]

[Back]

Table 3.

Incidences of TEAEs reported by ≥2.5% of patients in either group (safety analysis set)

System organ class
IND/GLY (N=88)

Tiotropium (N=88)

Number of events, n
Number of patients, n (%)
Number of events, n
Number of patients, n (%)

Any TEAE
62
28 (31.8)
33
21 (23.9)

 Respiratory, thoracic and mediastinal disorders
26
16 (18.2)
11
8 (9.1)

 Gastrointestinal disorders
7
5 (5.7)
1
1 (1.1)

 Cardiac disorders
6
3 (3.4)
1
1 (1.1)

 Investigations
5
3 (3.4)
0
0

 Nervous system disorders
9
6 (6.8)
3
2 (2.3)

 Infections and infestations
4
4 (4.5)
7
6 (6.8)

 Musculoskeletal and connective tissue disorders
1
1 (1.1)
3
3 (3.4)

Abbreviations: IND/GLY, indacaterol/glycopyrronium; TEAE, treatment emergent adverse event.

[Back]