PLoS ONE

PLoS One. 13(6): e0199809

Excellent accuracy of ABC/2 volume formula compared to computer-assisted volumetric analysis of subdural hematomas

http://orcid.org/0000-0001-6585-5403Sae-Yeon Won, Conceptualization¹*, Andrea Zagorcic, Data curation, Investigation, Methodology, Writing – review & editing¹², http://orcid.org/0000-0001-5568-8429Daniel Dubinski, Conceptualization, Data curation, Methodology, Validation, Visualization, Writing – review & editing¹, Johanna Quick-Weller, Investigation, Methodology, Resources, Software¹, Eva Herrmann, Investigation, Methodology, Resources, Software³, Volker Seifert, Conceptualization, Supervision, Validation, Visualization, Writing – original draft, Writing – review & editing¹, Juergen Konczalla, Conceptualization, Data curation, Formal analysis, Funding acquisition, Investigation, Methodology, Project administration, Software, Supervision, Validation, Writing – review & editing¹

Jonathan H. Sherman, Editor

1. Department of Neurosurgery, University Hospital, Goethe-University, Frankfurt am Main, Germany

2. Deparment of Neuroradiology, University Hospital, Goethe-University, Frankfurt am Main, Germany

3. Institute of Biostatistics and Mathematical Modelling, Department of Medicine, Frankfurt am Main, Germany

George Washington University, UNITED STATES

Competing Interests: The authors have declared that no competing interests exist.

* E-mail: sae-yeon.won@kgu.de

© 2018 Won et al

DOI: 10.1371/journal.pone.0199809

Published online: 26 June 2018

Abstract

Background

Subdural hematoma (SDH) is a common disease associated with high morbidity, which is becoming more prominent due to the increasing incidence. Decision for a surgical evacuation is made depending on the clinical appearance and the volume of SDH, wherefore it is important to have a simple ‘bedside’ method to measure and compare the volume of SDH.

Objective

The aim of the study was to verify the accuracy of the simplified ABC/2 volumetric formula to determine a valuable tool for the clinical practice.

Methods

Preoperative CT-scans of 83 patients with SDHs were used for the computer-assisted volumetric measurement via BrainLab® as well as the ABC/2 volumetric measurement. A = largest length (anterior to posterior) of the SDH; B = maximum width (lateral to midline) 90° to A; C = maximum height (coronal plane or multiplication of slices) of the hematoma. These measurements were performed by two independent clinicians in a blinded fashion. Both volumes were compared by linear regression analysis of Pearson and Bland-Altman regression analysis.

Results

Among 100 SDHs, 53% were under an 47% were over 100cm³ showing a well distribution of the hematoma sizes. There was an excellent correlation between computer-assisted volumetric measurement and ABC/2 (R² = 0.947, p<0.0001) and no undesirable deviation and trend were detected (p = 0.101; p = 0.777). A 95% tolerance region of the ratios of both methods was [0.805–1.201].

Conclusion

The ABC/2 method is a simple and fast bedside formula for the measurement of SDH volume in a timely manner without limited access through simple adaption, which may replace the computer-assisted volumetric measurement in the clinical and research area. Reason for the good accuracy seems to be the spherical form of SDH, which has a similarity to a half ellipsoid.

Introduction

Subdural hematoma (SDH) is a common disease and is becoming more prominent due to increasing incidence as well as cost factor national wide [1,2]. The decision for a surgical evacuation is made by the clinical appearance, mass effect with brain herniation and the volume of SDH, wherefore it is important to have a simple bedside method to measure the volume of SDH in clinical routine. Furthermore, an easy and valid method of hematoma volume is essential to make studies comparable. Previously, several studies investigated and reported the accuracy of the simplified ellipsoid volumetric formula, ABC/2, to measure intracerebral hemorrhage (ICH) as well as epidural hematoma (EDH), whereas to the best of our knowledge, there have been only one study observing the formula regarding SDH in small number of patients [3–7]. Since the geometric form of SDH differs from an ICH or EDH, which are ellipsoidal, we hypothesized an inaccuracy of ABC/2 for the volumetric measurement of SDH. Therefore, the aim of the study was to compare the ABC/2 formula to a computer-assisted volumetric analysis and in case of an inaccuracy to create a new formula for SDH volume measurement.

Subjects and methods

This study was approved by the clinical ethic committee of the university Frankfurt (EK Nr.509/15). The ethic committee waived the need for patient content. In this study, we analysed 82 patients with chronic SDH from 2016 to 2017. Both sided SDH was accounted as two SDHs resulting in a review of 100 subdural hematomas. The preoperative CT-scans at admission were performed in a 5mm slice thickness and were used for both volumetric measurements: the computer-assisted measurement and ABC/2. Each method was used by an independent clinician in a blinded fashion. Patients with combined interhemispheric SDH or missing radiological data were excluded.

For the ABC/2 method axial CT planes were used. The largest length (anterior to posterior) to each corner of the SDH was defined as A (cm), the maximum width (lateral to midline) 90° to A in the same slice as B (cm) and the maximum height of the hematoma as C (cm). For the calculation of the height, the number of slices with visible hematoma was multiplied by the thickness (e.g. 5mm) of the CT-scan or a coronal plane was used. The hematoma volume (cm³) was obtained by multiplying A, B and C and dividing it by 2 (Fig 1A).

Fig 1View larger versionFig 1. A. Preoperative axial CT-scan with both sided subdural hematomas (SDH). Computer-assisted volumetric measurement was performed by hand tracing each hematoma form in each slice as shown in red and orange colour. ABC/2 measurement technique was performed as following: A is the length connected each corner of the SDH, B is 90° to A and C is the height calculated by the slice thickness with visible hematoma. B. 3D frontal reconstruction of computer-assisted volumetric measurement of both sided SDH. C. 3D lateral reconstruction of computer-assisted volumetric measurement of single sided SDH.

For the computer-assisted measurement, the BrainLab® elements software (Brainlab Germany Headquarters, Munich, Germany) was used. This software can be used for radiosurgical therapy planning, intraoperative navigation and preoperative segmentation including multiplanar volume definition. The hematoma margins were hand traced and the volume was automatically calculated (Fig 1B and 1C).

Linear regression analysis of Pearson and Bland-Altman regression analysis on log-scale were used to determine the correlation between those methods [8].

Results

Among 100 SDHs, 53 SDHs (53%) were under and 47 SDHs (47%) were over 100cm³ showing well distributed hematoma size. The mean volume was 106.3±47.3cm³ in the ABC/2 technique whereas 104.6±47.7cm³ in the computer-assisted volumetric measurement showing no significant difference. In the linear regression analysis, there was a highly significant correlation between ABC/2 and computer-assisted values (R² = 0.934, slope = 0.975) (Fig 2A). The same result was also observed in the Bland-Altman regression analysis between the log of ABC/2 and the log of the computer-assisted values (R² = 0.947, p<0.0001) (Fig 2B). Bland and Altmann regression revealed no undesirable deviation between the geometric mean of ABC/2 and the computer-assisted measurements and the ratios of these values (p = 0.101) and no undesirable trend (p = 0.777). A 95% tolerance region of the ratios of both methods was [0.805–1.201].

Fig 2View larger versionFig 2. A. Pearson Linear regression analysis between ABC/2 and computer-assisted volumetric measurement. B. Bland-Altman regression analysis between log of ABC/2 and log of computer-assisted volumetric measurement.

Discussion

Against our initial hypothesis there was an excellent correlation between ABC/2 formula and computer-assisted volumetric measurement of SDH supporting the use of ABC/2 in the clinical practice and research. In addition, the formula had no limited access to the size of SDH volume.

At this point, the relevance of this simplified ABC/2 formula in patients with SDH should be mentioned. Previously Kothari et al. analyzed the timely manner of each volumetric measurement indicating that the simplified formula required less than one minute, whereas the computer-assisted volumetric analysis required about 15 factors more time [4]. There is a well-known phrase in the treatment of stroke, “time is brain”. However, the time is also essential in case of any traumatic brain injuries like SDH since an accurate initiation of acute management can reduce morbidity and improve further prognosis [2,9]. Additionally, the formula can be used as a helpful tool for the further evaluation of SDH residuum at follow-up and further studies to compare each volumes without any specific software. In certain circumstances, it is not simple to compare the development of SDH volume due to the change of geometric SDH form, varying thickness of scans or slice variations. Indeed measuring only the maximum thickness of the hematoma might illustrate us false information which could result in an unnecessary surgical treatment. Therefore, by using the simplified formula, the comparison could be made promptly and ease the further decision.

For the volumetric measurement of ICH, several studies have been estimating using different type of formula, however, only the formula for an ellipsoid have been shown to correlate well with plan metric techniques [4,10–12]. In addition, this formula was approved for several other entities like EDH, vestibular schwannomas and gliomas, whereas for cerebral arteriovenous malformation a significant discrepancy was identified, possibly due to the heterogeneous group of lesions [7,13–15]. To date, there is only one study published, GUSTO-1 trial, showing the accuracy of ABC/2 in the volumetric measurement of SDH similar to our study [4]. However in this study, the mean volume of the SDH (68cm³) and the sample size (n = 40) were small. Since there could be a discrepancy concerning the volume, we included well distributed size of the SDH (range 57–363 cm³), which showed no limited use of this formula. Furthermore by increasing the sample size, we tried to obtain more statistical power in order to replace the computer-assisted volumetric measurement,

Against our initial expectation we questioned, why the volume of SDH would fit into this formula for an ellipsoid: The simple explanation for this might be the spherical form of SDH, which has a similarity to a half ellipsoid. Detailed information is described below in Fig 3.

Fig 3 View larger version Fig 3. Mathematical derivation of the ABC/2 formula from a half ellipsoid volumetric formula.

There are some limitations to mention in this study. We excluded SDH with interhemispheric components, since those geometric forms are completely different than lateral SDH. There might be other formula to add those components; however in this study we just focused on the lateral component. Secondly, we used CT-scans with 5mm thickness slices. The calculation of the hematoma size could be adjusted depending on the slice thickness, but there might be some discrepancy using CT-scans with thicker slices.

Conclusion

In this study, we identified that the ABC/2 method is a simple and excellent bedside formula, which can be used for the volume measurement of SDH without limited access in order to initiate acute management and decision in a timely manner. Reason for the good accuracy seems to be the spherical form of SDH, which has a similarity to a half ellipsoid.

Acknowledgments

We thank Marina Heibel for her excellent technical support.

Articles from PLoS ONE are provided here courtesy of Public Library of Science

PMC Copyright Notice

The articles available from the PMC site are protected by copyright, even though access is free. Copyright is held by the respective authors or publishers who provide these articles to PMC. Users of PMC are responsible for complying with the terms and conditions defined by the copyright holder.

Users should assume that standard copyright protection applies to articles in PMC, unless an article contains an explicit license statement that gives a user additional reuse or redistribution rights. PMC does not allow automated/bulk downloading of articles that have standard copyright protection.

See the copyright notice on the PMC site, https://www.ncbi.nlm.nih.gov/pmc/about/copyright/, for further details and specific exceptions.

References

Koc RK, Akdemir H, Oktem IS, Meral M, Menkü A. Acute subdural hematoma: outcome and outcome prediction. Neurosurg Rev. 1997;20(4):239–244. 9457718

Mulligan P, Raore B, Liu S, Olson JJ. Neurological and functional outcomes of subdural hematoma evacuation in patients over 70 years of age. J Neurosci Rural Pract. 2013;4(3):250–256. doi: 10.4103/0976-3147.118760 24250154

Gebel JM, Sila C a, Sloan MA, Granger CB, Weisenberger JP, Green CL, et al Comparison of the ABC/2 estimation technique to computer-assisted volumetric analysis of intraparenchymal and subdural hematomas complicating the GUSTO-1 trial. Stroke. 1998;29(9):1799–1801. 9731597

Kothari RU, Brott T, Broderick JP, Barsan WG, Sauerbeck LR, Zuccarello M, et al The ABCs of measuring intracerebral hemorrhage volumes. Stroke. 1996;27(8):1304–1305. 8711791

Kwak R, Kadoya S, Suzuki T. Factors affecting the prognosis in thalamic hemorrhage. Stroke. 1983;14(4):493–500. 6606870

Broderick JP, Brott TG, Tomsick T, Barsan W, Spilker J. Ultra-early evaluation of intracerebral hemorrhage. J Neurosurg. 1990;72(2):195–199. doi: 10.3171/jns.1990.72.2.0195 2295917

Hu T-T, Yan L, Yan P-F, Wang X, Yue GF. Assessment of the ABC/2 Method of Epidural Hematoma Volume Measurement as Compared to Computer-Assisted Planimetric Analysis. Biol Res Nurs. 2016;18(1):5–11. doi: 10.1177/1099800415577634 25802386

Bland JM, Altman DG. Measuring agreement in method comparison studies. Stat Methods Med Res. 1999;8(2):135–160. doi: 10.1177/096228029900800204 10501650

Zafrullah Arifin M, Gunawan W. Analysis of presurgery time as a prognostic factor in traumatic acute subdural hematoma. J Neurosurg Sci. 2013;57(3):277–280. 23877273

Lisk DR, Pasteur W, Rhoades H, Putnam RD, Grotta JC. Early presentation of hemispheric intracerebral hemorrhage: prediction of outcome and guidelines for treatment allocation. Neurology. 1994;44(1):133–139. 8290048

Franke CL, Versteege CW, van Gijn J. The best fit method. A simple way for measuring the volume of an intracerebral haematoma. Neuroradiology. 1988;30(1):73–75. 3357571

Kim H, Yang X, Choi YH, Yoon BC, Kim K, Kim DJ. Abilities of a Densitometric Analysis of Computed Tomography Images and Hemorrhagic Parameters to Predict Outcome Favorability in Patients With Intracerebral Hemorrhage. Neurosurgery. 2017 7 25.

Bathla G, Policeni B, Hansen MR, Berbaum K. Calculating the Tumor Volumes in Vestibular Schwannomas: Arte the ABC/2 and Volumetric Methods Comparable? Otol Neurotol. 2017;38:889–894. doi: 10.1097/MAO.0000000000001423 28394785

Screenivasan SA, Madhugiri VS, Sasidharan GM, Kumar RV. Measuring glioma volumes: A comparison of linear measurement based formulae with the manual image segmentation technique. J Cancer Res Ther. 2016;12:161–8. doi: 10.4103/0973-1482.153999 27072231

Roark C, Vadlamudi V, Chaudhary N, Gemmete JJ, Seinfeld J, Thompson BG, et al ABC/2 Method Does not Accurately Predict Cerebral Arteriovenous Malformation Volume. Neurosurgery. 2018;82:220–225. doi: 10.1093/neuros/nyx139 28605551

[Back]

Fig 1.

A. Preoperative axial CT-scan with both sided subdural hematomas (SDH). Computer-assisted volumetric measurement was performed by hand tracing each hematoma form in each slice as shown in red and orange colour. ABC/2 measurement technique was performed as following: A is the length connected each corner of the SDH, B is 90° to A and C is the height calculated by the slice thickness with visible hematoma. B. 3D frontal reconstruction of computer-assisted volumetric measurement of both sided SDH. C. 3D lateral reconstruction of computer-assisted volumetric measurement of single sided SDH.

[Back]

[Back]

Fig 2.

A. Pearson Linear regression analysis between ABC/2 and computer-assisted volumetric measurement. B. Bland-Altman regression analysis between log of ABC/2 and log of computer-assisted volumetric measurement.

[Back]

[Back]

Fig 3. Mathematical derivation of the ABC/2 formula from a half ellipsoid volumetric formula.

[Back]