Journal of Cheminformatics

© Sarah et al; licensee BioMed Central Ltd. 2010

This article is published under license to BioMed Central Ltd.

10.1186/1758-2946-2-S1-P54

Poster presentation

SBE13, a newly identified inhibitor of inactive polo-like kinase 1

Sarah Keppner1 , Ewgenij Proschak², Gisbert Schneider² and B Spänkuch¹

(1)

Medical School, Department of Gynecology and Obstetrics, Goethe-University, Theodor-Stern-Kai 7, 60590 Frankfurt, Germany

(2)

Goethe-University, Frankfurt, Germany

Published online: 04 May 2010

Protein kinases are important targets for drug development. The almost identical protein folding of kinases and the common co-substrate ATP leads to the problem of inhibitor selectivity. Type II inhibitors, targeting the inactive conformation of kinases, occupy a hydrophobic pocket with less conserved surrounding amino acids [1].

Human polo-like kinase 1 (Plk1) represents a promising target for approaches to identify new therapeutic agents. Plk1 belongs to a family of highly conserved serine/threonine kinases, and is a key player in mitosis, where it modulates the spindle checkpoint at metaphase/anaphase transition. Plk1 is over-expressed in all today analyzed human tumors of different origin and serves as a negative prognostic marker in cancer patients. The newly identified inhibitor, SBE13, a vanillin derivative, targets Plk1 in its inactive conformation [2]. This leads to selectivity within the Plk family and towards Aurora A. This selectivity can be explained by docking studies of SBE13 into the binding pocket of homology models of Plk1, Plk2 and Plk3 in their inactive conformation.

SBE13 showed anti-proliferative effects in cancer cell lines of different origins with EC₅₀ values between 5 μM and 39 μM and induced apoptosis. Increasing concentrations of SBE13 result in increasing amounts of cells in G₂/M phase 13 hours after double thymidin block of HeLa cells. The kinase activity of Plk1 was inhibited with an IC₅₀ of 200 pM.

Taken together, we could show that carefully designed structure-based virtual screening is well-suited to identify selective type II kinase inhibitors targeting Plk1 as potential anti-cancer therapeutics.

References

1.

Liu Y, Gray NS: Nat Chem Biol. 2006, 2: 358-364. 10.1038/nchembio799.CrossRef

2.

Keppner S, Proschak E, Schneider G, Spänkuch B: Chem Med Chem. 2009.