Journal of Cardiovascular Magnetic Resonance

J Cardiovasc Magn Reson. 19: 83

High-throughput gadobutrol-enhanced CMR: a time and dose optimization study

http://orcid.org/0000-0003-0004-6378Tommaso D’Angelo

+39-090-221-3092

tommasodang@gmail.com

¹², Chrysanthos Grigoratos

cgrigoratos@ftgm.it

³⁴, Silvio Mazziotti

smazziotti@unime.it

¹, Konstantinos Bratis

konstantinos.bratis@kcl.ac.uk

⁴, Faraz Pathan

faraz.pathan@utas.edu.au

²⁵, Alfredo Blandino

ablandino@unime.it

¹, Elen Elen

elensahara@gmail.com

²⁶, Valentina O. Puntmann

valentina.puntmann@icloud.com

²⁴⁷, Eike Nagel

eike.nagel@cardiac-imaging.org

²⁴⁷

1. 0000 0004 1773 5724grid.412507.5Department of Biomedical Sciences and Morphological and Functional Imaging, G. Martino University Hospital Messina, Via Consolare Valeria, 1, 98100 Messina, Italy

2. 0000 0004 0578 8220grid.411088.4Institute for Experimental and Translational Cardiovascular Imaging, DZHK Centre for Cardiovascular Imaging, University Hospital Frankfurt, Theodor-Stern- Kai 7, Frankfurt am Main, Germany

3. G. Monasterio CNR-Tuscany Foundation, Pisa, Italy

4. 0000 0001 2322 6764grid.13097.3cDepartment of Cardiovascular Imaging, King’s College London, Lambeth Wing, St. Thomas’ Hospital, London, UK

5. 0000 0004 1936 826Xgrid.1009.8Department of Cardiology, Menzies Institute for Medical Research, University of Tasmania, Hobart, Australia

6. 0000000120191471grid.9581.5Department of Cardiology, National Cardiovascular Center Harapan Kita, Universitas Indonesia, Jakarta, Indonesia

7. 0000 0004 0578 8220grid.411088.4Department of Cardiology, University Hospital Frankfurt, DZHK Rhein-Main, Theodor-Stern- Kai 7, Frankfurt am Main, Germany

© The Author(s). 2017

DOI: 10.1186/s12968-017-0400-4

Published online: 6 November 2017

Abstract

Background

Reducing time and contrast agent doses are important goals to provide cost-efficient cardiovascular magnetic resonance (CMR) imaging. Limited information is available regarding the feasibility of evaluating left ventricular (LV) function after gadobutrol injection as well as defining the lowest dose for high quality scar imaging. We sought to evaluate both aspects separately and systematically to provide an optimized protocol for contrast-enhanced CMR (CE-CMR) using gadobutrol.

Methods

This is a prospective, randomized, single-blind cross-over study performed in two different populations. The first population consisted of 30 patients with general indications for a rest CE-CMR who underwent cine-imaging before and immediately after intravenous administration of 0.1 mmol/kg body-weight of gadobutrol. Quantitative assessment of LV volumes and function was performed by the same reader in a randomized and blinded fashion. The second population was composed of 30 patients with indication to late gadolinium enhancement (LGE) imaging, which was performed twice at different gadobutrol doses (0.1 mmol/kg vs. 0.2 mmol/kg) and at different time delays (5 and 10 min vs. 5, 10, 15 and 20 min), within a maximal interval of 21 days. LGE images were analysed qualitatively (contrast-to-noise ratio) and quantitatively (LGE%-of-mass).

Results

Excellent correlation between pre- and post-contrast cine-imaging was found, with no difference of LV stroke volume and ejection fraction (p = 0.538 and p = 0.095, respectively). End-diastolic-volume and end-systolic-volume were measured significantly larger after contrast injection (p = 0.008 and p = 0.001, respectively), with a mean difference of 3.7 ml and 2.9 ml, respectively. LGE imaging resulted in optimal contrast-to-noise ratios 10 min post-injection for a gadobutrol dose of 0.1 mmol/kg body-weight and 20 min for a dose of 0.2 mmol/kg body-weight. At these time points LGE quantification did not significantly differ (0.1 mmol/kg: 11% (16.4); 0.2 mmol/kg: 12% (14.5); p = 0.059), showing excellent correlation (ICC = 0.957; p < 0.001).

Conclusion

A standardized CE-CMR rest protocol giving a dose of 0.1 mmol/kg of gadobutrol before cine-imaging and performing LGE 10 min after injection represents a fast low-dose protocol without significant loss of information in comparison to a longer protocol with cine-imaging before contrast injection and a higher dose of gadobutrol. This approach allows to reduce examination time and costs as well as minimize contrast-agent exposure.

Electronic supplementary material

The online version of this article (10.1186/s12968-017-0400-4) contains supplementary material, which is available to authorized users.

Background

Contrast-enhanced cardiovascular magnetic resonance (CE-CMR) is a cornerstone of clinical cardiology [1, 2]. Data acquisition and post-processing are standardized and recommendations on the dose and timing of contrast agent have been provided [3]. These recommendations suggest a dose range of 0.1–0.2 mmol/kg of a gadolinium-based contrast agent (GBCA) for scar imaging using late gadolinium enhancement (LGE), and recommend a waiting time of at least 10 min after injection for acquiring optimal LGE images. Moreover, despite not specifically stated, the same recommendations show that left ventricular (LV) function should be assessed prior to contrast injection [3]. However, to optimize costs and resource utilization as well as to minimize risks for the patient, there is a drift towards the use of macrocyclic GBCAs at their lowest possible dose [4–8]. Bruder et al. recently reported that a mean dose of 0.12 mmol/kg was used in an analysis based on 37,788 patients undergoing CE-CMR with different types of GBCAs [9]. In addition, an increasing number of centres tend to acquire LV function images after contrast agent injection prior to LGE imaging, thus reducing the total scan time of their imaging protocol, as reflected in a large number of scientific manuscripts [10]. Finally, these trending approaches in routine CMR create two major issues with only limited information available in the literature:

Are LV volumes and the subsequently derived LV functional parameters similar before and after contrast injection?

Are low doses of macrocyclic contrast agent sufficient to visualize and quantify ischemic and non-ischemic myocardial scar and what is the best time-point for LGE imaging after contrast injection?

The goal of the current study is to address these points systematically and specifically for gadobutrol CE-CMR.

Methods

All studies were conducted in compliance with the requirements for good clinical practice after approval from the local ethics committee. Each participant provided written informed consent.

Part 1: Assessment of LV volumes and function before and after contrast agent injection

Patient population

Thirty consecutive patients [19 men;43 ± 13 years (27–75 years)] who underwent routine CE-CMR for a rest study were included. Indications were viability assessment after myocardial infarction (n = 10), scar detection in chronic coronary disease (n = 4), cardiomyopathy (n = 9) and suspected myocarditis (n = 7).

CMR protocol

All CMR examinations were performed on a 1.5 T scanner (Achieva, Philips Healthcare, Best, The Netherlands). A standardized balanced steady state free precession (bSSFP) cine-sequence was performed in combination with parallel imaging (Sensitivity Encoding, factor 2) and retrospective cardiac gating during expiratory breath-hold (TE/TR/flip-angle: 1.7 ms/3.4 ms/60°; spatial resolution: 1.8 × 1.8x8mm). A stack of images covering the whole heart was obtained along the short-axis plane, before and immediately after intravenous administration of 0.1 mmol/kg body-weight of gadobutrol (Gadovist®, Bayer, Leverkusen, Germany), injected at a rate of 3 ml/s, followed by a 20 ml saline flush, using the same slice position.

CMR analysis

Cine-bSSFP loops were randomized (crossover design), presented anonymously and displayed for review. Quantitative assessment of all data was performed by the same blinded reader, with 8 years of experience in cardiovascular imaging. Analysis was performed using QMass semi-automated software (v8.1, Medis BV, Leiden, The Netherlands). Endocardial and epicardial contours were drawn in end-systolic and end-diastolic phases for the assessment of functional parameters, which were normalized to the body-surface-area (BSA) [end-systolic volume (ESV), end-diastolic volume (EDV)]. Stroke volume (SV) and ejection fraction (EF) were calculated using standard formulae.

Statistical analysis

All statistical analyses were performed using dedicated software (SPSS Statistics, v23, International Business Machines, Inc. Armonk, New York, USA). Shapiro-Wilk test and histograms were preliminarily performed to assess distribution of quantitative data, which presented normal distribution and were expressed as mean ± SD. The significance of differences (p) was analysed with paired samples t-tests. A value of p < 0.05 was considered significant. The differences in measurements of LV volumes before and after contrast administration were evaluated by means of Bland-Altman plots and correlation was assessed by intraclass correlation coefficient (ICC) statistics. ICC results were interpreted as follows: ICC < 0.40 = poor correlation, ICC 0.41–0.59 = fair correlation, ICC 0.60–0.74 = good correlation, ICC > 0.75 = excellent correlation [11].

Part 2: Comparison of gadobutrol 0.1 mmol/kg and 0.2 mmol/kg for detection and quantification of myocardial LGE

Patient population

Thirty patients [23 men;60 ± 14 years (range: 27–80)] who underwent routine CMR for a contrast-enhanced rest study were included. Fifteen patients with known myocardial infarction [11 men;69 ± 9 years (range: 51–80)] and 15 patients with known diagnosis of hypertrophic cardiomyopathy (HCM) [12 men;51 ± 12 years (range: 27–68)] were prospectively enrolled to obtain patients with ischemic and patients with non-ischemic scar. Exclusion criteria were the administration of any contrast agent in the prior 72 h, a history of any severe allergic reaction or hypersensitivity to contrast media, eGFR <60 ml/min and general contraindications to CMR.

CMR protocol

All examinations were performed on a 1.5 T MR scanner scanner (Achieva, Philips Healthcare). Standardized LGE imaging was performed using 2D turbo-field-echo inversion recovery T1-weighted sequence (TE/TR/flip-angle: 2 ms/3.4 ms/25°; spatial resolution: 1.4 × 1.4x8mm) with an individually adapted prepulse delay to achieve optimal nulling of the normal myocardium. For each patient, the first LGE imaging study was performed by acquiring a stack of images covering the whole heart along the short-axis plane at 5, 10, 15, and 20 min after peripheral bolus injection of 0.2 mmol/kg body-weight (double-dose) of gadobutrol (Gadovist®, Bayer), injected at a rate of 3 ml/s and followed by a 30 ml saline chaser. Each subject repeated LGE imaging after a minimum of 6 days (range: 6–21, median 8), by acquiring the same stack of images along the short-axis plane after peripheral bolus injection of 0.1 mmol/kg body-weight (single-dose) of gadobutrol, with same injection rate (3 ml/s) and followed by a saline flush (20 ml at 3 ml/s). To minimize the burden on the patients and to reduce the research scan time of the second examination, images were acquired only twice (i.e. 5 and 10 min after contrast injection).

CMR analysis

LGE images were randomized (crossover design), presented anonymously and evaluated in consensus by a radiologist and a cardiologist, respectively with 5 and 15 years of experience in cardiovascular imaging. All analyses were done using QMass (v8.1, Medis BV). LGE quantification was performed by the full width at half maximum (FWHM) method, which uses half of the maximal signal intensity (SI) within the scar as the threshold, and reported as a percentage of total LV mass [12]. In addition, for each patient, ROIs were drawn by the readers in the normal myocardium (MYO), in LGE areas, in LV cavity (LVC) and in air (A) outside the patient’s body, in order to evaluate the signal-to-noise ratio (SNR) and contrast-to-noise ratio (CNR). SNR was calculated for remote myocardium (SNR MYO), LGE areas (SNR LGE) and LV cavity (SNR LVC), by dividing each respective mean SI for standard deviation of air (SD A). CNR values between LGE areas and normal myocardium (CNR LGE-MYO) and between LGE areas and LVC (CNR LGE-LVC) were obtained in order to assess optimal scar delineation within the myocardium and subendocardial area respectively. The following formulas were used:

CNRLGE−MYO = (SILGE–SIMYO)/SDA and CNRLGE−LVC = (SILGE–SILVC)/SDA[Image: 12968_2017_400_Article_Equa.gif]

Statistical analysis

All statistical analyses were performed using dedicated software (SPSS Statistics, v23; International Business Machines, Inc.). Shapiro-Wilk test and histograms were performed to test for normal distribution of the data. Normal distributed data was expressed as mean and standard deviation, non-normal distribution as medians and interquartile ranges (IQR). Comparison between groups was performed with Wilcoxon signed-rank test for paired data. Comparison across multiple groups was assessed using non-parametric analysis of variance (i.e. Kruskal-Wallis test). In particular, Wilcoxon signed-rank test was used to obtain p-values for 0.1 mmol/Kg protocol. Kruskal-Wallis test was used to obtain p-values for 0.2 mmol/Kg protocol, due to the presence of four different time-points; an additional Wilcoxon signed-rank test was performed to assess any significant differences between 15 and 20 min time delays. A value of p < 0.05 was considered statistically significant. The differences in measurements were evaluated by means of Bland-Altman plots and correlation was assessed by intraclass correlation coefficient (ICC) statistics. ICC results were interpreted as follows: ICC < 0.40 = poor correlation, ICC 0.41–0.59 = fair correlation, ICC 0.60–0.74 = good correlation, ICC > 0.75 = excellent correlation [11].

Results

Part 1: Assessment of LV volumes and function before and after contrast agent injection

EDV and ESV were measured significantly larger after contrast injection in comparison to native images (p = 0.008 and p = 0.001, respectively). This difference was not significant for the derived parameters SV and EF (p = 0.538 and p = 0.095, respectively). There was excellent correlation between pre- and post-contrast LV volumes and EF (all ICC ≥ 0.895; p < 0.001). Bland-Altman analysis showed a mean difference for post-contrast measurements of 3.7 ml and 2.9 ml, respectively for EDV and ESV (Fig. 1 and Table 1).

Fig. 1View larger versionFig. 1. Balanced steady state free precession short-axis images obtained at the mid ventricular level before (a) and after (b) injection of gadobutrol 0.1 mmol/kg body-weight

See full tableTable 1. Left ventricular (LV) structure and functional values obtained before (C-) and after (C+) injection of gadobutrol 0.1 mmol/kg body-weight using a cine-balanced steady state free precession (bSSFP) sequence and intra-observer agreement

Part 2: Comparison of gadobutrol 0.1 mmol/kg and 0.2 mmol/kg for detection and quantification of myocardial LGE

CNR LGE-MYO and CNR LGE-LVC were optimal at 10 min for single-dose protocol, and at 20 min for double-dose protocol (Figs. 2 and 3). At these time-points a trend towards higher values of absolute CNR with the single-dose protocol was found in the Bland-Altman plots but without significant differences of CNR LGE-MYO and CNR LGE-LVC (p = 0.668 and p = 0.525) (Table 2). At all earlier time-points (5, 10 and 15 min post-injection) CNR LGE-LVC of 0.2 mmol/kg protocol was significantly inferior (p < 0.001 at 5 and 10 min, and p = 0.002 at 15 min).

Fig. 2View larger versionFig. 2. Graphs showing contrast-to-noise-ratio (CNR) between late gadolinium enhancement (LGE) scar and left ventricular cavity (LVC) and between LGE scar and remote myocardium (MYO) measured at different time delays for 0.1 mmol/kg (yellow) and for 0.2 mmol/kg body-weight protocol (purple)

Fig. 3View larger versionFig. 3. 2D turbo-field-echo inversion recovery T1-weighted basal short-axis images showing a subendocardial scar in inferoseptal segment. Good contrast between subendocardial border and LV blood pool is obtained after intravenous injection of gadobutrol 0.1 mmol/kg with a time delay of 10 min (a) as well as after injection of a 0.2 mmol/kg dose with a time delay of 20 min (b)

See full tableTable 2. Comparison of CNR values for LGE imaging obtained at the best time delays for different doses

The extent of LGE, expressed in terms of percentage of involvement of myocardial mass, did not significantly differ between the two protocols at their optimal time points (single-dose: 11% (16.4); double-dose: 12% (14.5); p = 0.059), showing excellent correlation (ICC = 0.957; p < 0.001).

The diagnostic performance of LGE quantification in ischemic and non-ischemic conditions did not significantly differ between the two doses (Table 3). In particular, in the ischemic group, percentage of LGE was 19% (17) and 19.8% (20.2) respectively for the single- and double-dose protocol (p = 0.248), and agreement was excellent (ICC = 0.967; p < 0.001). In the non-ischemic group, values were respectively of 7% (6.7) and 10.3% (8.4) (p = 0.244; ICC = 0.876; p < 0.001). Extent of LGE similarly did not differ between single-dose at 10 min and double-dose at 15 min (see Additional file 1).

See full tableTable 3. Late gadolinium enhancement quantitative results at best time-delays for different gadobutrol doses and its relative comparison

Discussion

Our data show two important results that may allow routine use of low doses of GBCA in a high-throughput protocol. First, the assessment of LV function can be performed after contrast agent injection as SV and EF are not influenced by contrast agent administration. A small – not clinically relevant – bias can be observed for the quantification of EDV and ESV, which needs to be taken into consideration for scientific follow-up studies. We also demonstrate that scar imaging with LGE can be performed with a dose of 0.1 mmol/kg of gadobutrol, having similar SNR, CNR and extent of scar as using a dose of 0.2 mmol/kg. Importantly, contrast between blood pool and scar at an earlier time-point (i.e. a time delay of 10 min) is better with the single-dose rather than double-dose, which requires an interval of at least 20 min to wash out the blood pool signal. The combination of these two findings allows a significant shortening of a standardized CE-CMR protocol, which may eventually include native tissue characterization (e.g. T2- and T2*-weighted imaging, T1-mapping) followed by gadobutrol injection at a dose of 0.1 mmol/kg, assessment of LV structure/function and, 10 min after contrast-injection, LGE imaging (Fig. 4) [3].

Fig. 4View larger versionFig. 4. Illustration showing the advantages in terms of time-saving of our recommended high-throughput CE-CMR protocol (gadobutrol 0.1 mmol/kg body-weight) over a conventional CE-CMR protocol performed using a gadobutrol dose of 0.2 mmol/kg body-weight

A few points require discussion. bSSFP-cine sequence is the most widely used for assessing LV function and structure, since its signal depends on the T2/T1 ratio and is relatively independent of inflow effects. This technique provides optimal CNR, allowing for accurate contour detection of the epicardial and endocardial borders [13]. In our study, LV EF and SV were identical before and after contrast administration, while a small systematic difference was found for LV EDV and ESV (3.7 ml and 2.9 ml respectively). While similar observations have been reported for LV EF and SV [14] previous studies have not reported on EDV and ESV independently, demonstrating a small but significant bias for EDV and ESV between pre- and post-contrast cine-bSSFP. This difference is clinically rather irrelevant and within the usual inter-observer and inter-study variability [15]. However, it may be of importance for scientific follow-up studies which include some examinations with contrast agent and some without.

In CE-CMR contrast dose and delivery need to be accurately chosen for reliable quantitative analysis since SNR of scar tissue versus normal myocardium varies depending on the type of GBCA as well as the dose and time after injection [16, 17]. Gadobutrol has been proven to allow for adequate LGE imaging at doses of 0.2 mmol/kg [18, 19], 0.15 mmol/kg [20, 21], and 0.1 mmol/kg [22, 23]. In each of these studies, gadobutrol was compared to different GBCAs, but not as a dose-finding study using the same contrast agent.

A common problem of LGE imaging is the difficulty to differentiate subendocardial scar from LV blood-pool [24]. A possible solution is based on black blood scar imaging [25] or a longer wait-time between contrast injection and data acquisition [26]. Our data show that a lower dose of gadobutrol of 0.1 mmol/kg is sufficient for adequate LGE assessment. In addition, the contrast between blood pool and subendocardial scar using a lower dose of gadobutrol is superior to a higher dose 10 min post-injection. After injection of gadobutrol at a dose of 0.2 mmol/kg a similar CNR between blood and subendocardial scar can only be achieved after 20 min. Given the need for rapid examinations for patient’s benefit as well as for economic reasons, an earlier time-point for LGE is favourable. Importantly, this data holds for ischemic and non-ischemic scar, both for SNR and CNR, as well as for scar burden using an identical threshold. Similar results, in terms of CNR and scar burden, have been obtained by other studies, which observed how a single-dose of gadobutrol might be equivalent to double-dose of different linear GBCAs [22, 23]. However, while these studies assumed that the feasibility of a single-dose might have been related to higher T1-relaxivity of gadobutrol, we are the first to investigate how different doses of the same contrast-agent affect the quality and quantification of LGE imaging.

The results of our two substudies show that time efficient standard imaging can be achieved by performing cine-imaging after injection of 0.1 mmol/kg of gadobutrol and early LGE imaging after 10 min. This rapid protocol is feasible without clinically relevant changes of LV volumes, no change of SV and EF.

We did not test other GBCAs, however, the basic concept (i.e. post-contrast cine-imaging, earlier scar imaging with lower GBCAs dose) should be transferable considering aspects such as albumin binding, different relaxivities and other potential differences. Our data is also limited to rest examinations. While we expect similar results when the contrast agent is given during adenosine stress, we did not explicitly test for this. Stress-perfusion imaging can be well performed with gadobutrol doses of approximately 0.1 mmol/kg and as such stress-perfusion, cine-imaging and LGE imaging might well fit into a short standardized exam [3]. In cases needed, rest perfusion could then be added at the end of the exam. There are certain limitations of our study which need to be addressed. Firstly, our data was obtained with 1.5 T scanner and the results may not apply to 3 T platforms. Secondly, we have not assessed CNR values for time delays longer than 10 min for the 0.1 mmol/kg protocol and longer than 20 min for 0.2 mmol/kg protocol to keep the exam time short. Despite this may hypothetically hide any better CNR values, we believe that reducing the scan time is a core aim to minimize the burden of CMR scanning on the patients and health care systems.

Conclusion

Based on our data, we provide the scientific evidence to recommend a standardized high-throughput CMR rest protocol giving gadobutrol at a dose of 0.1 mmol/kg before cine-imaging, and performing LGE imaging 10 min after injection. Such a rapid low-contrast dose approach is favourable for patient’s comfort (shorter examination time), patient’s safety (lower dose of GBCA) and economic reasons (lower costs for scan time and contrast media).

Additional file

File type application/msword not supported by EPUB. Download File from Web

Abbreviations

A

Air

BSA

Body-surface-area

bSSFP

Balanced steady state free precession

CE-CMR

Contrast-enhanced cardiovascular magnetic resonance

CNR

Contrast-to-noise ratio

EDV

End-diastolic volume

EF

Ejection fraction

eGFR

estimated glomerular filtration rate

ESV

End-systolic volume

FWHM

Full width half maximum

GBCA

Gadolinium-based contrast agent

HCM

Hypertrophic cardiomyopathy

ICC

Intraclass correlation coefficient

IQR

Interquartile range

LGE

Late gadolinium enhancement

LV

Left ventricle/left ventricular

LVC

Left ventricular cavity

MYO

Myocardium/myocardial

ROI

Region of interest

SD

Standard deviation

SI

Signal intensity

SNR

Signal-to-noise ratio

SV

Stroke volume

Footnotes

Electronic supplementary material

The online version of this article (10.1186/s12968-017-0400-4) contains supplementary material, which is available to authorized users.

Acknowledgements

On this occasion, there is no one we wish to acknowledge.

Funding

No funding had role in the design of the study, collection, analysis and interpretation of data and in writing the manuscript.

Availability of data and materials

The datasets used and/or analysed during the current study are available from the corresponding author on reasonable request.

Authors’ contributions

TD conceived of the study, performed analysis and drafted the manuscript. EN, VP, CG and KB contributed to study design and data collection FP, EE, SM, and AB performed data processing and statistical analysis. All authors revised the manuscript and have read and approved the final version of the manuscript.

Notes

Ethics approval and consent to participate

All studies were conducted in compliance with the requirements for good clinical practice after approval from the local ethics committee (NRES Committee London Westminster Health Research Authority, Barlow House 4 Minshull Street, Manchester, M1 3DZ, UK). Ethics approval number was 09/H0802/078 - MRI sequence development in a clinical setting.

Consent for publication

Each participant involved in the present study provided written informed consent.

Competing interests

The authors declare that they have no competing interests.

Publisher’s Note

Springer Nature remains neutral with regard to jurisdictional claims in published maps and institutional affiliations.

Articles from Journal of Cardiovascular Magnetic Resonance are provided here courtesy of BioMed Central

PMC Copyright Notice

The articles available from the PMC site are protected by copyright, even though access is free. Copyright is held by the respective authors or publishers who provide these articles to PMC. Users of PMC are responsible for complying with the terms and conditions defined by the copyright holder.

Users should assume that standard copyright protection applies to articles in PMC, unless an article contains an explicit license statement that gives a user additional reuse or redistribution rights. PMC does not allow automated/bulk downloading of articles that have standard copyright protection.

See the copyright notice on the PMC site, https://www.ncbi.nlm.nih.gov/pmc/about/copyright/, for further details and specific exceptions.

References

Kim RJ, Wu E, Rafael A, Chen E-L, Parker MA, Simonetti O, et al., authors. The use of contrast-enhanced magnetic resonance imaging to identify reversible myocardial dysfunction. N Engl J Med. 2000;343:1445–1453. [Cross Ref] [PubMed]

Bruder O, Wagner A, Lombardi M, Schwitter J, van Rossum A, Pilz G, et al., authors. European cardiovascular magnetic resonance (EuroCMR) registry--multi national results from 57 centers in 15 countries. J Cardiovasc Magn Reson. 2013;15:9 [Cross Ref] [PubMed]

Kramer CM, Barkhausen J, Flamm SD, Kim RJ, Nagel E, authors. Society for Cardiovascular Magnetic Resonance Board of trustees task force on standardized protocols. Standardized cardiovascular magnetic resonance (CMR) protocols 2013 update. J Cardiovasc Magn Reson. 2013;15:91 [Cross Ref] [PubMed]

Sadowski EA, Bennett LK, Chan MR, Wentland AL, Garrett AL, Garrett RW, et al., authors. Nephrogenic systemic fibrosis: risk factors and incidence estimation. Radiology. 2007;243:148–157. [Cross Ref] [PubMed]

McDonald RJ, McDonald JS, Kallmes DF, Jentoft ME, Murray DL, Thielen KR, et al., authors. Intracranial gadolinium deposition after contrast-enhanced MR imaging. Radiology. 2015;275:772–782. [Cross Ref] [PubMed]

Reiter T, Ritter O, Prince MR, Nordbeck P, Wanner C, Nagel E, et al., authors. Minimizing risk of nephrogenic systemic fibrosis in cardiovascular magnetic resonance. J Cardiovasc Magn Reson. 2012;14:31 [Cross Ref] [PubMed]

European Medicines Agency. PRAC concludes assessment of gadolinium agents used in body scans and recommends regulatory actions, including suspension for some marketing authorisations. [cited 2017 Jun 27]. Available from: http://www.ema.europa.eu/ema/index.jsp?curl=pages/news_and_events/news/2017/03/news_detail_002708.jsp&mid=WC0b01ac058004d5c1.

FDA Drug Safety Communication: FDA evaluating the risk of brain deposits with repeated use of gadolinium-based contrast agents for magnetic resonance imaging (MRI) [Internet] Center for Drug Evaluation and Research; [cited 2017 Jun 27]. Available from: https://www.fda.gov/Drugs/DrugSafety/ucm455386.htm.

Bruder O, Schneider S, Pilz G, Rossum AC, Schwitter J, Nothnagel D, et al., authors. 2015 update on acute adverse reactions to gadolinium based contrast agents in cardiovascular MR. large multi-national and multi-ethnical population experience with 37788 patients from the EuroCMR registry. J Cardiovasc Magn Reson. 2015;17:1–7. [Cross Ref] [PubMed]

Hendel RC, Friedrich MG, Schulz-Menger J, Zemmrich C, Bengel F, Berman DS, et al., authors. CMR first-pass perfusion for suspected inducible myocardial ischemia. JACC Cardiovasc Imaging. 2016;9:1338–1348. [Cross Ref] [PubMed]

Cicchetti DV, Sparrow SA, authors. Developing criteria for establishing interrater reliability of specific items: applications to assessment of adaptive behavior. Am J Ment Defic. 1981;86:127–137. [PubMed]

Flett AS, Hasleton J, Cook C, Hausenloy D, Quarta G, Ariti C, et al., authors. Evaluation of techniques for the quantification of myocardial scar of differing etiology using cardiac magnetic resonance. JACC Cardiovasc Imaging. 2011;4:150–156. [Cross Ref] [PubMed]

Thiele H, Paetsch I, Schnackenburg B, Bornstedt A, Grebe O, Wellnhofer E, et al., authors. Improved accuracy of quantitative assessment of left ventricular volume and ejection fraction by geometric models with steady-state free precession. J Cardiovasc Magn Reson. 2002;4:327–339. [Cross Ref] [PubMed]

Lasalarie J-C, Serfaty J-M, Carre C, Messika-Zeitoun D, Jeannot C, Schouman-Claeys E, et al., authors. Accuracy of contrast-enhanced cine-MR sequences in the assessment of left ventricular function: comparison with precontrast cine-MR sequences. Results of a bicentric study. Eur Radiol. 2007;17:2838–2844. [Cross Ref] [PubMed]

Moon JCC, Lorenz CH, Francis JM, Smith GC, Pennell DJ, authors. Breath-hold FLASH and FISP cardiovascular MR imaging: left ventricular volume differences and reproducibility. Radiology. 2002;223:789–797. [Cross Ref] [PubMed]

Kellman P, Arai AE, authors. Cardiac imaging techniques for physicians: late enhancement. J Magn Reson Imaging. 2012;36:529–542. [Cross Ref] [PubMed]

Schulz-Menger J, Bluemke DA, Bremerich J, Flamm SD, Fogel MA, Friedrich MG, et al., authors. Standardized image interpretation and post processing in cardiovascular magnetic resonance: Society for Cardiovascular Magnetic Resonance (SCMR) board of trustees task force on standardized post processing. J Cardiovasc Magn Reson. 2013;15:35 [Cross Ref] [PubMed]

Peel SA, Morton G, Chiribiri A, Schuster A, Nagel E, Botnar RM, authors. Dual inversion-recovery mr imaging sequence for reduced blood signal on late gadolinium-enhanced images of myocardial scar. Radiology. 2012;264:242–249. [Cross Ref] [PubMed]

Śpiewak M, Małek ŁA, Chojnowska L, Miśko J, Petryka J, Kłopotowski M, et al., authors. Late gadolinium enhancement gray zone in patients with hypertrophic cardiomyopathy. Comparison of different gray zone definitions. Int J Cardiovasc Imaging. 2010;26:693–699. [Cross Ref] [PubMed]

Durmus T, Schilling R, Doeblin P, Huppertz A, Hamm B, Taupitz M, et al., authors. Gadobutrol for magnetic resonance imaging of chronic myocardial infarction: intraindividual comparison with gadopentetate dimeglumine. Investig Radiol. 2012;47:183–188. [PubMed]

Doeblin P, Schilling R, Wagner M, Luhur R, Huppertz A, Hamm B, et al., authors. Intraindividual comparison of T1 relaxation times after gadobutrol and Gd-DTPA administration for cardiac late enhancement imaging. Eur J Radiol. 2014;83:660–664. [Cross Ref] [PubMed]

De Cobelli F, Esposito A, Perseghin G, Sallemi C, Belloni E, Ravelli S, et al., authors. Intraindividual comparison of Gadobutrol and Gadopentetate Dimeglumine for detection of myocardial late enhancement in cardiac MRI. AJR Am J Roentgenol. 2012;198:809–816. [Cross Ref] [PubMed]

Wildgruber M, Stadlbauer T, Rasper M, Hapfelmeier A, Zelger O, Eckstein H-H, et al., authors. Single-dose gadobutrol in comparison with single-dose gadobenate dimeglumine for magnetic resonance imaging of chronic myocardial infarction at 3 T. Investig Radiol. 2014;49:728–734. [Cross Ref] [PubMed]

Kim RJ, Shah DJ, Judd RM, authors. How we perform delayed enhancement imaging. J Cardiovasc Magn Reson. 2003;5:505–514. [Cross Ref] [PubMed]

Farrelly C, Rehwald W, Salerno M, Davarpanah A, Keeling AN, Jacobson JT, et al., authors. Improved detection of subendocardial hyperenhancement in myocardial infarction using dark blood-pool delayed enhancement MRI. AJR Am J Roentgenol. 2011;196:339–348. [Cross Ref] [PubMed]

Grebe O, Paetsch I, Kestler H, Herkommer B, Schnackenburg B, Hombach V, et al., authors. Optimal acquisition parameters for contrast enhanced magnetic resonance imaging after chronic myocardial infarction. J Cardiovasc Magn Reson. 2003;5:575–587. [Cross Ref] [PubMed]

[Back]

Fig. 1.

Balanced steady state free precession short-axis images obtained at the mid ventricular level before (a) and after (b) injection of gadobutrol 0.1 mmol/kg body-weight

[Back]

[Back]

Table 1.

Left ventricular (LV) structure and functional values obtained before (C-) and after (C+) injection of gadobutrol 0.1 mmol/kg body-weight using a cine-balanced steady state free precession (bSSFP) sequence and intra-observer agreement

| C+ | C- |  | p-value | ICC* | Mean difference (LOA)
EDV (ml) | 142.1 ± 39.8 | 138.4 ± 39.7 | C+ vs. C- | 0.008 | 0.980 | 3.7 ml (17.9, −10.4)
ESV (ml) | 67.9 ± 29.5 | 65 ± 28.8 | 0.001 | 0.986 | 2.9 ml (10.8, −5.1)
SV (ml) | 74.2 ± 17.1 | 73.4 ± 15.5 | 0.538 | 0.895 | 0.9 ml (15.6, −13.9)
EF (%) | 53.8 ± 9.4 | 54.8 ± 8.8 | 0.095 | 0.935 | −1% (5.3, −7.3)

Values expressed as mean ± SD; significant values are in bold; *p < 0.001 for all ICC values

EDV, End-diastolic volume, EF Ejection fraction, ESV End-systolic volume, LOA Limits of agreement, SV Stroke volume

[Back]

[Back]

Fig. 2.

Graphs showing contrast-to-noise-ratio (CNR) between late gadolinium enhancement (LGE) scar and left ventricular cavity (LVC) and between LGE scar and remote myocardium (MYO) measured at different time delays for 0.1 mmol/kg (yellow) and for 0.2 mmol/kg body-weight protocol (purple)

[Back]

[Back]

Fig. 3.

2D turbo-field-echo inversion recovery T1-weighted basal short-axis images showing a subendocardial scar in inferoseptal segment. Good contrast between subendocardial border and LV blood pool is obtained after intravenous injection of gadobutrol 0.1 mmol/kg with a time delay of 10 min (a) as well as after injection of a 0.2 mmol/kg dose with a time delay of 20 min (b)

[Back]

[Back]

Table 2.

Comparison of CNR values for LGE imaging obtained at the best time delays for different doses

| 0.1 mmol/kg (at 10 min) vs. 0.2 mmol/kg gadobutrol (at 20 min) | 0.1 mmol/kg (at 10 min) vs. 0.2 mmol/kg gadobutrol (at 15 min)
| p-value | Mean difference (LOA) | p-value | Mean difference (LOA)
SNR LVC | 0.075 |  | <0.001 |
SNR MYO | 0.405 |  | 0.600 |
SNR LGE | 0.371 |  | 0.861 |
CNR LGE-LVC | 0.750 | 3 (8.1, −2.1) | 0.002 | 4.3 (9.7, −1.1)
CNR LGE-MYO | 0.237 | 4.7 (14.3, −4.9) | 0.877 | 4 (13.7, −5.7)

Significant values are in bold, CNR Contrast-to-noise ratio, LGE Late gadolinium enhancement, LOA Limits of agreement, LVC Left ventricular cavity, MYO Myocardium, SNR Signal-to-noise ratio

[Back]

[Back]

Table 3.

Late gadolinium enhancement quantitative results at best time-delays for different gadobutrol doses and its relative comparison

Gadobutrol Dose | 0.1 mmol/kg | 0.2 mmol/kg |  | 0.2 mmol/kg (at 20 min) vs. 0.1 mmol/kg (at 10 min)
Time delay | 10 min | 20 min | COMPARISON | p-value | ICC* | mean difference (LOA)
LGE mass (all patients) | 11% (16.4) | 12% (14.5) | 0.059 | 0.957 | 0.9% (7, −5.2)
LGE mass (CAD patients only) | 19% (17) | 19.8% (20.2) | 0.248 | 0.967 | 0.2% (6.3, −5.8)
LGE mass (HCM patients only) | 7% (6.7) | 10.3% (8.4) | 0.244 | 0.876 | 1.6% (7.6, −4.4)

* p < 0.001 for all ICC values, CAD Coronary artery disease, HCM Hypertrophic cardiomyopathy, LGE Late gadolinium enhancement, LOA Limits of agreement

[Back]

[Back]

Fig. 4.

Illustration showing the advantages in terms of time-saving of our recommended high-throughput CE-CMR protocol (gadobutrol 0.1 mmol/kg body-weight) over a conventional CE-CMR protocol performed using a gadobutrol dose of 0.2 mmol/kg body-weight

[Back]