Radiation Oncology (London, England)

Radiat Oncol. 12: 138

Hypo-fractionated SBRT for localized prostate cancer: a German bi-center single treatment group feasibility trial

Ping Jiang

ping.jiang@pius-hospital.de

¹², Katja Krockenberger

krockenberger@zks.uni-luebeck.de

³, Reinhard Vonthein

reinhard.vonthein@imbs.uni-luebeck.de

³⁴, Jane Tereszczuk

jane.tereszczuk@web.de

³, Arne Schreiber

schreiber@zks.uni-luebeck.de

³, Sebastian Liebau

liebau@zks.uni-luebeck.de

³, Stefan Huttenlocher

huttenlocher@saphir-rc.com

⁵, Detlef Imhoff

detlef.imhoff@kgu.de

⁶, Panagiotis Balermpas

panagiotis.balermpas@kgu.de

⁵⁶, Christian Keller

chrsitian.keller@kgu.de

⁵⁶, Kathrin Dellas

kathrin.dellas@uksh.de

¹, Rene Baumann

rene.baumann@uksh.de

¹, Claus Rödel

clausmichael.roedel@kgu.de

⁶, Guido Hildebrandt

guido.hildebrandt@uni-rostock.de

⁷, Klaus-Peter Jünemann

klaus-peter.juenemann@uksh.de

⁸, Alex S. Merseburger

axel.merseburger@uksh.de

⁹, Alan Katz

akatzmd@msn.com

¹⁰¹¹, Andreas Ziegler

ziegler@imbs.uni-luebeck.de

³⁴¹², Oliver Blanck

oliver.blanck@uksh.de

¹⁵, Jürgen Dunst

juergen.dunst@uksh.de

¹¹²¹³¹⁴

1. 0000 0004 0646 2097grid.412468.dKlinik für Strahlentherapie, Universitätsklinikum Schleswig-Holstein, Kiel, Germany

2. 0000 0001 0275 7806grid.477704.7Klinik für Strahlentherapie, Universitätsklinik für Medizinische Strahlenphysik, Pius Hospital, Oldenburg, Germany

3. Universität zu Lübeck, ZKS, Lübeck, Germany

4. grid.37828.36Institut für Medizinische Biometrie und Statistik, Universitätsklinikum Schleswig-Holstein, Lübeck, Germany

5. grid.477821.fSaphir Radiochirurgie Zentrum Norddeutschland und Frankfurt am Main, Güstrow, Germany

6. 0000 0004 0578 8220grid.411088.4Klinik für Strahlentherapie, Universitätsklinikum Frankfurt, Frankfurt, Germany

7. 0000 0000 9737 0454grid.413108.fKlinik für Strahlentherapie, Universitätsmedizin Rostock, Rostock, Germany

8. 0000 0004 0646 2097grid.412468.dKlinik für Urologie, Universitätsklinikum Schleswig-Holstein, Kiel, Germany

9. grid.37828.36Klinik für Urologie, Universitätsklinikum Schleswig-Holstein, Lübeck, Germany

10. Flushing Radiation Oncology Services, New York, USA

11. Long Island Radiation Therapy, New York, USA

12. 0000 0001 0723 4123grid.16463.36School of Mathematics, Statistics and Computer Science, University of KwaZulu-Natal, Pietermaritzburg, South Africa

13. Department for Radiation Oncology, University Clinic Copenhagen, Copenhagen, Denmark

14. 0000 0004 0646 2097grid.412468.dDepartment of Radiation Oncology, Karl Lennert Cancer Center, University Medical Center Schleswig-Holstein, Campus Kiel, Arnold-Heller-Straße 3, Haus 50, D-24105 Kiel, Germany

© The Author(s). 2017

DOI: 10.1186/s13014-017-0872-2

Published online: 18 August 2017

Abstract

Background

For prostate cancer treatment, treatment options with minimal side effects are desired. External beam radiation therapy (EBRT) is non-invasive, standard of care and delivered in either conventional fractionation over 8 weeks or with moderate hypo-fractionation over about 5 weeks. Recent advances in radiotherapy technology have made extreme hypo-fractionated stereotactic body radiation therapy (SBRT) of prostate cancer feasible, which has not yet been introduced as a standard treatment method in Germany. Initial results from other countries are promising, but long-term results are not yet available. The aim of this study is to investigate feasibility and effectiveness of SBRT for prostate cancer in Germany.

Methods/design

This German bi-center single group trial (HYPOSTAT) is designed to evaluate feasibility and effectiveness, as measured by toxicity and PSA-response, respectively, of an extreme hypo-fractionated SBRT regimen with five fractions of 7 Gy in treatment of localized low and intermediate risk prostate cancer. The target volume includes the prostate with or without the base of seminal vesicles depending on risk stratification and uncertainty margins that are kept at 3–5 mm. SBRT treatment is delivered with the robotic CyberKnife system, which was recently introduced in Germany. Acute and late toxicity after one year will be evaluated according to Common Terminology Criteria for Adverse Events (CTCAE v. 4.0), Radiation Therapy Oncology Group (RTOG) and International Prostate Symptom Score (IPSS) Scores. The quality of life will be assessed before and after treatment with the EORTC QLQ C30 questionnaire. Hypothesizing that the proportion of patients with grade 2 side effects or higher is less or equal than 2.8%, thus markedly lower than the standard EBRT percentage (17.5%), the recruitment target is 85 patients.

Discussion

The HYPOSTAT trial aims at demonstrating short term feasibility of extreme hypo-fractioned SBRT for the treatment of prostate cancer and might be used as the pilot study for a multi-center multi-platform or for randomized-controlled trials comparing conventional radiotherapy with SBRT for localized prostate cancer in the future. The study concept of patient enrollment, follow up and evaluation by multiple public university clinics and actual patient treatment in dedicated private radiosurgery practices with high-tech radiation equipment is unique for clinical trials.

Study status

The study is ongoing and currently recruiting patients.

Trial registration

Registration number: NCT02635256 (clinicaltrials.gov). Registered 8 December 2015.

Background

General treatment strategy for localized prostate cancer

Prostate cancer is the most frequently diagnosed malignant tumor and the third most frequent reason for men’s death in Europe [1]. Current therapy procedures for localized prostate cancer include active surveillance, prostatectomy and radiation therapy, but the optimal therapy regime remains unclear.

Compared to other cancers, prostate cancer is characterized by three specific features: the progression rate is slow, the patient population is old with a median age at diagnosis of approximately 75 years and a specific tumor marker — the prostate specific antigen (PSA) is available to monitor progression even at an early stage [2–5]. Owing to these facts, ‘active surveillance’ is more and more considered as an alternative treatment option for localized low- to intermediate risk prostate cancer [6–8]. During active surveillance, digital rectal exams and annual biopsies are performed and PSA levels are checked regularly and therapeutic intervention is only recommended in case of disease progression (e.g., as measured by increased PSA levels). Some studies have confirmed that early intervention with radical prostatectomy may have no advantage for most patients when compared to active surveillance [9–11].

Local therapies, such as radical prostatectomy or radiation therapy, either in form of external beam radiotherapy (EBRT) or brachytherapy or a combination of both, are indicated if active surveillance is impossible or unwanted or in case of documented disease progression. Radiation therapy is, with respect to tumor control, at least equivalent to radical surgery for all patients with localized disease. The range of side effects is different with the major problems being incontinence after prostatectomy and rectal complications after radiotherapy. However, the overall frequency of side effects seems to be similar [12–18]. The choice of local therapy method, therefore, mainly depends on the patient’s preference and possible contraindications.

Overall, the above mentioned treatment options (active surveillance and local therapy) are compared in several clinical trials: the most recent publication coming from the ProtecT trial [19]. The study group published its 10 year results in 2016 and found that overall survival was not different in the active surveillance and local therapy group; however there seems to be a benefit for local therapy in terms of disease progression and development of metastases [19]. In Germany, a large randomized study (PREFERE) was initiated in 2013 with the objective to compare the different treatment procedures including active surveillance, prostatectomy, brachy-therapy and EBRT for low risk prostate cancer. PREFERE was the largest oncological clinical trial in Germany and financially supported by the German Cancer Aid and includes patients younger than 75 years at diagnosis with a PSA value ≤ 10 ng/ml and a Gleason score ≤ 7a (3 + 4). Approximately 7300 patients were planned to be treated, but the study was recently closed.

External beam radiotherapy

EBRT for low/intermediate risk prostate cancer is generally carried out with conformal- (3D-CRT) or intensity- and volumetric-modulated radiotherapy (IMRT and VMAT) techniques delivered in conventional fractionation [20–23]. The target organ (prostate, possibly also the seminal vesicles or a part of them) is irradiated with single doses of 1.8–2.0 Gy daily for 5 days a week up to a total dose of 72–78 Gy [20–23]. There is a clear dose-response relationship between tumor control rates and total irradiation doses [24, 25]. However, better local control has not resulted in increased survival. Moreover, almost all studies have also shown an increase of late toxicity at higher doses [24, 25]. For example, a large randomized-controlled trial found that 39% of all patients developed genitourinary (GU) toxicity, and 32% had grade 2 gastrointestinal (GI) toxicities after 4.2 years of follow up [24]. After 1 year, approximately 17.5% of patients had grade 2 late complications in the GU system and 10% developed toxicity in the GI system.

Rationale for treating localized prostate cancer using hypo-fractionation

In general, conventional fractionation for EBRT with daily doses of 1.8–2.0 Gy is based on the assumption that the cells of the surrounding healthy organs have a lower proliferation rate than the tumor cells and are therefore less reactive to small radiation doses. The cell survival of an organ or tumor after irradiation is generally described by the α/β-value [26] — high proliferating organs or tumors have α/β-values in the order of 10 Gy and very slow proliferating organs or tumors have α/β-values in the order of 2 Gy.

Recent data from various prospective studies suggest a low fractionation sensitivity of prostate cancer [26, 27]. Currently, the α/β-value of prostate cancer is estimated to be approximately 1.5 Gy; thus, lower than the currently estimated α/β-value for late rectal complications, which is approximately 3.0 Gy [28, 29]. This difference in fractionation sensitivity suggests that an advantage might be expected from hypo-fractionated treatment regimens, either with regard to increased local control, reduced late side effects or both. Interestingly, published randomized trials that used moderately hypo-fractionated regimens (e.g., 22 vs. 40 fractions) showed only similar results with regard to biochemical control and even slightly worse side effects compared to standard fractionation [30, 31]. A comprehensive review on the topic of moderate hypofraction for prostate radiotherapy was recently published by a German group [32].

Treatment results with extreme hypo-fractionation

Following the concept of the assumed radiobiology of prostate cancer to the end, several studies in the USA investigated extreme hypo-fractionated regimens, called stereotactic body radiation therapy (SBRT) or sometimes also called radiosurgery. These studies used 5 fractions, and total doses of 35–37 Gy have been reported recently [33–45]. Up to now, more than 1500 patients with 5 years of follow up were treated in 18 different feasibility studies. Most of the studies used robotic SBRT with the CyberKnife system (Accuray Inc., USA) and active fiducial-based tracking because of well-known prostate motion during treatment [46, 47]. Due to relevant prostate movements during treatment, techniques with image-guidance and motion compensation seem mandatory and a widespread use of extreme hypo-fractionation is currently not recommended [48–51].

In brief, these studies showed excellent biochemical control rates after 1–5 years in the range of 93–100% for low and intermediate risk prostate cancers (PSA value < 20 ng/ml and Gleason score ≤ 7). These studies also demonstrated a low frequency of late side effects with a trend towards more severe side effects if a total dose of 35 Gy in 5 fractions were exceeded. Mild side effects (grade 2) with 35 Gy and 36.25 Gy in 5 fractions were 4% and 10% in the GU system, respectively, and 2% and 4% in the GI system, respectively. Serious GU side effects (grade 3) occurred in only 2% of patients treated with 36.25 Gy. These data are in favor of SBRT when compared to the results of standard fractionated EBRT [24, 25, 35, 37]. Recently, the first results of the Scandinavian HYPO-RT-PC trial comparing 42.7 Gy in 7 fractions versus 78 Gy in 39 fractions confirmed this hypothesis [52] and the randomized controlled HEAT (USA) and PACE (UK) trials are actively recruiting patients.

As the treatment of prostate cancer with extreme hypo-fractionated SBRT has not yet been introduced as common practice in Germany and long-term follow-up data are not yet available internationally, the German Society for Radiation Oncology (DEGRO) and the National Radiation Protection Authority (BfS, Bundesamt fuer Strahlenschutz) have issued a strict recommendation to only treat prostate cancer with extreme hypo-fractionation in prospective clinical trials. This body of work represents the first and currently only clinical trial for hypo-fractionated SBRT for localized prostate cancer (HYPOSTAT) in Germany.

Methods/design

General study setting

At the time of study protocol initiation of HYPOSTAT in 2012, two main circumstances were found for Germany with respect to prostate cancer treatment: 1) the PREFERE trial was widely supported and conducted by many institutions, and 2) the CyberKnife, from which most prostate treatment data for hypo-fractionated SBRT originated, was only available in a limited number of centers, most being privately owned. It was therefore intended to initiate a clinical trial that included the private CyberKnife centers as well as excluded patients eligible for the PREFERE trial. The current setting in amendment IV from May 2016 of the HYPOSTAT study (protocol number ZKS-121-003) stipulates that patients are enrolled and followed after treatment by public university medical centers and treated by the CyberKnife system in two private practices. At the time being, this is a unique setting in clinical trial design.

Study design

The HYPOSTAT study is designed as a prospective observational trial. The hypothesis is that image-guided SBRT with 35 Gy in 5 fractions (7 Gy per fraction) is feasible in the treatment of prostate cancer. The primary endpoint is toxicity to the GI and GU system at 1 year after treatment assessed according to the Common Terminology Criteria for Adverse Events (CTCAE v. 4.0) and Radiation Therapy Oncology Group (RTOG) Scores. Secondary endpoints are PSA-failure-free survival, relapse-free survival, urological function assessed by the International Prostate Symptom Score (IPSS), and Quality of life (QoL) assessed before and after treatment with the European Organization for Research and Treatment of Cancer (EORTC) Quality of Life Questionnaire (QLQ) C30 and the Patient Oriented Prostate Cancer Utility Scale (PORPUS) questionnaire.

Patient inclusion criteria

Histologically confirmed, locally confined prostate cancer

Completed staging according to the National Guidelines

Gleason score ≤ 7

PSA < 15 ng/ml

Prostate volume < 80 cm³

IPSS-Score ≤ 12

Age > 75 years or Age 70–75 years and either PSA > 10 ng/ml and/or Gleason score = 7b and/or Gleason score = 7a with > 33% positive biopsy cores and/or cT > 2a and/or prostate volume > 60 cm³

Informed consent

Patient exclusion criteria

Treatment in the PREFERE trial possible

Previous pelvic radiotherapy

Contraindication against the implantation of fiducial gold markers

Immunosuppressive therapy

Treatment relevant co-morbidities

Patient’s inability to understand or comply with the procedures

Treatment planning and delivery

Treatment will be carried out with a robotic CyberKnife system (Accuracy Inc., USA) using real-time tracking. Three to four fiducial markers will be necessary to identify the location of the prostate during treatment. The distance between two fiducial markers should be ≥ 2 cm. Implantation of fiducial markers should be completed at least 5 days before treatment-planning computed tomography (CT) to reduce the post-implantation migration of the fiducial marker. During planning CT, and on any treatment day, the use of an enema is advised to reduce the maximum rectal diameter. A bladder catheter is not necessarily needed, but a consistent and constant bladder filling of 20–30 ml during planning CT and treatment is recommended.

Gross tumor volume (GTV) is defined as the prostate on the planning magnetic resonance imaging (MRI) for patients with a low-risk profile and as the prostate with the bases of seminal vesicles (1 cm proximal) for all other patients. The clinical tumor volume (CTV) is defined as GTV plus 1–2 mm for patients with low-risk prostate cancer and plus 2 mm for all other patients. The planning target volume is defined as CTV plus an anisotropic margin of 1 mm posterior into the direction of the rectum and 3 mm in all other directions. Organs at risk (OAR) are rectum, bladder, urethra (if identifiable), neurovascular bundles (if identifiable), penile bulb, small bowel, femoral heads and the skin (5 mm thick). The rectum is defined from the inferior level of the anus to the recto-sigmoid junction to give a length of approximately 12 cm.

All patients will be treated with 35 Gy in 5 fractions (7 Gy per fraction) prescribed to the 80–85% isodose (maximum dose = 100%) covering the PTV to 95% (PTV35Gy ≥ 95%). OAR dose limitations (Table 1) are specified according to published guidelines [33–45, 53–56] and the urethral dose reduction technique will be used to minimize risks of side effects [57]. Patients will be treated every second day with a minimum of 36 h between two fractions. The treatment time shall be 1.5 to 2 weeks.

See full tableTable 1. Dose limits for organs at risk relevant for prostate radiosurgery

Follow-up assessments

The primary endpoint will be the feasibility of extreme hypo-fractionated SBRT in the treatment of prostate cancer assessed 1 year after treatment, as all of the acute and certain intermediate toxicity will be observed in this period. Follow-up visits will occur at 4–6 weeks, 3 months (± 1 week), 6–9 months and 12–15 months after the last day of irradiation. During follow up, side effects will be documented (if any) and the PSA value (at least twice), IPSS and QoL using the PORPUS questionnaire will be documented. The course of the PSA value will be used to declare biochemical failure according the Phoenix definitions. In case of failure to identify disease progression by assessing the PSA value, progression events are defined as radiologically documented disease progression using Response Evaluation Criteria In Solid Tumors (RECIST) Criteria (Revised Guidelines, Version 1.1, 2009). QoL is assessed using the EORTC QLQ C30 questionnaire at the last follow-up visit.

The reasoning for this short follow-up time was due to the nature of the study design being a feasibility trial with a single technique which would serve as the basis for a subsequent multi-institutional multi-platform trial with long term follow-up. I.e., we did not want to overly delay such long term multi-institutional multi-platform study and decided to finish the initial feasibility trial as soon as possible. For long-term evaluation, patients will of course be followed for at least 5 years according to the standard practice for radiotherapy in Germany which additionally will include treatment relevant efficacy, side effects, IPSS and QoL assessments; however, this will not be part of the study protocol.

Sample size calculation

Based on available data and radiobiological calculations, the frequency of severe toxicity (grade 2 or higher) is expected to be approximately 2.8% for GU and 1.1% for GI toxicity. Eighty-five and fifty-four patients are required to reject proportions of 17.5% and 10% with 78% and 88% power at two-sided significance levels < 5% with the exact binomial test using a Bonferroni-Holm procedure. The aim is therefore to recruit 85 patients in this trail.

Trial duration and criteria for early study termination

Patient accrual is estimated to be finished within 2 years, with a follow-up period of 1 year after last patient in. The clinical trial should be concluded 3 years after first inclusion. Early termination of the trial will occur if the toxicity of this extreme hypo-fractionated SBRT is determined to be unacceptable (≥ grade 3 in more than four of the first ten patients for acute or more than 20% of all patients for chronic side effects). The study can be terminated early, if a) the hypothesis of the study can be answered by new data, b) the understanding of the radiobiology for prostate cancer is markedly altered by new data, or c) the recruiting target is not met during the recruitment phase.

Ethical and legal considerations

The HYPOSTAT study protocol was reviewed by the ‘Independent Expert Committee of the DEGRO’ and an approval from the National Radiation Protection Authority (BfS) for conducting the study was deemed necessary. The study was approved by the BfS (reference number Z5–22463/2–2013-031) and by the independent ethics committee of the University of Luebeck (reference number 13–052) and, subsequently, by the ethics committees responsible for the participating clinics and institutions (University of Kiel, University of Frankfurt and University of Rostock). The HYPOSTAT study is accredited by the Radiation Oncology Working Group (ARO) of the German Cancer Society. The registration number at clinicaltrials.gov is NCT02635256. The study is monitored and audited by the center for clinical trials (ZKS Luebeck, Germany, protocol number ZKS-121-003). Sponsor of the study is the University Medical Center Schleswig Holstein, and the study is partly financed by the Dr.-Rurainski-Stiftung (Ettlingen, Germany) and the Saphir Medical Engineering Group GmbH (Guestrow, Germany).

Discussion

The HYPOSTAT trial aims at demonstrating short term feasibility of extreme hypo-fractioned SBRT for the treatment of prostate cancer and might be used as the pilot study for a multi-center multi-platform or for randomized-controlled trials in Germany comparing conventional radiotherapy with SBRT for localized prostate cancer in the future. The study concept of patient enrollment, follow-up and evaluation by multiple public university medical centers and actual patient treatment in dedicated private radiosurgery practices with high-tech radiation equipment is unique for clinical trials.

Abbreviations

BfS

Bundesamt fuer Strahlenschutz (National Radiation Protection Authority)

CT

Computer Tomography

CTCAE

Common Terminology Criteria for Adverse Events

CTV

Clinical Target Volume

DEGRO

Deutsche Gesellschaft fuer Radioonkologie (German Society for Radiation Oncology)

EBRT

External Beam Radiation Therapy

EORTC

European Organization for Research and Treatment of Cancer

GI

Gastrointestinal

GTV

Gross Target Volume

GU

Genitourinary

HYPOSTAT

Hypofraktionierte Strahlenchirurgie bei lokal begrenztem Prostatakarzinom (Hypo-fractioned radiosurgery for localized prostate cancer)

IMRT

Intensity Modulated Radiation Therapy

IPSS

International Prostate Symptom Score

MRI

Magnetic Resonance Imaging

NCI

National Cancer Institute

OAR

Organ at Risk

PORPUS

Patient Oriented Prostate Cancer Utility Scale

PSA

Prostate Specific Antigen

PTV

Planning Target Volume

QLQ

Quality of Life Questionnaire

QoL

Quality of Life

RECIST

Response Evaluation Criteria In Solid Tumors

RTOG

Radiation Therapy Oncology Group

SBRT

Stereotactic Body Radiation Therapy

VMAT

Volumetric Modulated Radiation Therapy

Acknowledgements

Not applicable.

Funding

The study did not receive funding by a major funding body.

Availability of data and materials

Not applicable.

Related articles

This is the first publication for the HYPOSTAT study.

Authors’ contributions

JD, OB, KK, JT and AK designed the study protocol. RV is the trial statistician and calculated the sample size. KJ and AM are the dedicated urologists for the study and reviewed the protocol. OB, KK, JT, AS, KD, RB and JD prepared and filed the BfS and ethics applications and prepared all study documents. SH, DI, PB, CR and GH are the treating clinicians in the study and reviewed the protocol and all study documents. SL is the dedicated CRA for the study. PJ, KK, OB, AZ, RV and JD translated the study protocol and drafted the manuscript. All authors read and approved the final manuscript.

Notes

Ethics approval and consent to participate

The study was approved by the BfS (reference number Z5–22463/2–2013-031) and by the independent ethics committee of the University of Luebeck (reference number 13–052).

Consent for publication

Not applicable.

Competing interests

The study is partly financed by the Dr.-Rurainski-Stiftung (Ettlingen, Germany) and the Saphir Medical Engineering Group GmbH (Guestrow, Germany).

Publisher’s Note

Springer Nature remains neutral with regard to jurisdictional claims in published maps and institutional affiliations.

Articles from Radiation Oncology (London, England) are provided here courtesy of BioMed Central

PMC Copyright Notice

The articles available from the PMC site are protected by copyright, even though access is free. Copyright is held by the respective authors or publishers who provide these articles to PMC. Users of PMC are responsible for complying with the terms and conditions defined by the copyright holder.

Users should assume that standard copyright protection applies to articles in PMC, unless an article contains an explicit license statement that gives a user additional reuse or redistribution rights. PMC does not allow automated/bulk downloading of articles that have standard copyright protection.

See the copyright notice on the PMC site, https://www.ncbi.nlm.nih.gov/pmc/about/copyright/, for further details and specific exceptions.

References

Ferlay J, Steliarova-Foucher E, Lortet-Tieulent J, et al., authors. Cancer incidence and mortality patterns in Europe: estimates for 40 countries in 2012. Eur J Cancer. 2013;49(6):1374–1403. [Cross Ref] [PubMed]

Gleason DF, Mellinger GT, authors. Prediction of prognosis for prostatic adenocarcinoma by combined histological grading and clinical staging. J Urol. 1974;111:58–64. [Cross Ref] [PubMed]

Gleason DF, author. Histologic grading and clinical staging of prostatic carcinoma. Tannenbaum M, ed. 1977. Urologic Pathology: The Prostate; p. 171–197

Partin AW, Kattan MW, Subong EN, et al., authors. Combination of prostate-specific antigen, clinical stage, and Gleason score to predict pathological stage of localized prostate cancer. A multi-institutional update. JAMA. 1997;277:1445–1451. [Cross Ref] [PubMed]

Partin AW, Mangold LA, Lamm DM, et al., authors. Contemporary update of prostate cancer staging nomograms (Partin tables) for the new millennium. Urology. 2001;58:843–848. [Cross Ref] [PubMed]

Ischia JJ, Pang CY, Tay YK, et al., authors. Active surveillance for prostate cancer: an Australian experience. BJU Int. 2012;109:40–43. [Cross Ref] [PubMed]

Chodak GW, Thisted RA, Gerber GS, et al., authors. Results of conservative management of clinically localized prostate cancer. N Engl J Med. 1994;330:242–248. [Cross Ref] [PubMed]

Waaler G, Stenwig AE, authors. Prognosis of localised prostatic cancer managed by “watch and wait” policy. Br J Urol. 1993;72:214–219. [Cross Ref] [PubMed]

Wilt TJ, Brawer MK, Jones KM, et al., authors. Prostate cancer intervention versus observation trial (PIVOT) study group. Radical prostatectomy versus observation for localized prostate cancer. N Engl J Med. 2012;367:203–213. [Cross Ref] [PubMed]

Bill-Axelson A, Holmberg L, Ruutu M, et al., authors. Scandinavian prostate cancer group study no. 4. Radical prostatectomy versus watchful waiting in early prostate cancer. N Engl J Med. 2005;352:1977–1984. [Cross Ref] [PubMed]

Holmberg L, Bill-Axelson A, Helgesen F, et al., authors. Scandinavian prostatic cancer group study number 4. A randomized trial comparing radical prostatectomy with watchful waiting in early prostate cancer. N Engl J Med. 2002;347(11):781–789. [Cross Ref] [PubMed]

Alibhai SM, Leach M, Tomlinson G, et al., authors. 30-day mortality and major complications after radical prostatectomy: influence of age and comorbidity. J Natl Cancer Inst. 2005;97:1525–1532. [Cross Ref] [PubMed]

Bishoff JT, Motley G, Optenberg SA, et al., authors. Incidence of fecal and urinary incontinence following radical perineal and retropubic prostatectomy in a national population. J Urol. 1998;160:454–458. [Cross Ref] [PubMed]

Catalona WJ, Basler JW, authors. Return of erections and urinary continence following nerve sparing radical retropubic prostatectomy. J Urol. 1993;150:905–907. [Cross Ref] [PubMed]

Dearnaley DP, Khoo VS, Norman AR, et al., authors. Comparison of radiation side-effects of conformal and conventional radiotherapy in prostate cancer: a randomised trial. Lancet. 1999;353:267–272. [Cross Ref] [PubMed]

Nieder AM, Porter MP, Soloway MS, authors. Radiation therapy for prostate cancer increases subsequent risk of bladder and rectal cancer: a population based cohort study. J Urol. 2008;180:2005–2009. [Cross Ref] [PubMed]

Sanda MG, Dunn RL, Michalski J, et al., authors. Quality of life and satisfaction with outcome among prostate cancer survivors. N Engl J Med. 2008;358:1250–1261. [Cross Ref] [PubMed]

Resnick MJ, Koyama T, Fan KH, et al., authors. Long-term functional outcomes after treatment for localized prostate cancer. N Engl J Med. 2013;368:436–445. [Cross Ref] [PubMed]

Hamdy FC, Donovan JL, Lane JA, et al; ProtecT Study Group. 10-year outcomes after monitoring, surgery, or radiotherapy for localized prostate cancer. N Engl J Med 2016;375(15):1415-1424.

Alicikus ZA, Yamada Y, Zhang Z, et al., authors. Ten-year outcomes of high-dose, intensity-modulated radiotherapy for localized prostate cancer. Cancer. 2011;17(7):1429–1437. [Cross Ref]

Zelefsky MJ, Kollmeier M, Cox B, et al., authors. Improved clinical outcomes with high-dose image guided radiotherapy compared with non-IGRT for the treatment of clinically localized prostate cancer. Int J Radiat Oncol Biol Phys. 2012;84(1):125–129. [Cross Ref] [PubMed]

Michalski J, Winter K, Roach M, et al., authors. Clinical outcome of patients treated with 3D conformal radiation therapy (3D-CRT) for prostate cancer on RTOG 9406. Int J Radiat Oncol Biol Phys. 2012;83(3):363–370. [Cross Ref]

Jacobs BL, Zhang Y, Skolarus TA, et al., authors. Comparative effectiveness of external-beam radiation approaches for prostate cancer. Eur Urol. 2014;65(1):162–168. [Cross Ref] [PubMed]

Peeters ST, Heemsbergen WD, Koper PC, et al., authors. Dose-response in radiotherapy for localized prostate cancer: results of the Dutch multicenter randomized phase III trial comparing 68 Gy of radiotherapy with 78 Gy. J Clin Oncol. 2006;24:1990–1996. [Cross Ref] [PubMed]

Pollack A, Zagars GK, Starkschall G, et al., authors. Prostate cancer radiation dose response: results of the M. D. Anderson phase III randomized trial. Int J Radiat Oncol Biol Phys. 2002;53:1097–1105. [Cross Ref] [PubMed]

Fowler JF, author. The radiobiology of prostate cancer including new aspects of fractionated radiotherapy. Acta Oncol. 2005;44(3):265–276. [Cross Ref] [PubMed]

Arcangeli G, Fowler J, Gomellini S, et al., authors. Acute and late toxicity in a randomized trial of conventional versus hypofractionated three-dimensional conformal radiotherapy for prostate cancer. Int J Radiat Oncol Biol Phys. 2011;79:1013–1021. [Cross Ref] [PubMed]

Miralbell R, Roberts SA, Zubizarreta E, et al., authors. Dose-fractionation sensitivity of prostate cancer deduced from radiotherapy outcomes of 5,969 patients in seven international institutional datasets: α/β = 1.4 (0.9-2.2) Gy. Int J Radiat Oncol Biol Phys. 2012;82(1):17–24. [Cross Ref]

Dasu A, Toma-Dasu I, authors. Prostate alpha/beta revisited - an analysis of clinical results from 14168 patients. Acta Oncol. 2012;51(8):963–974. [Cross Ref] [PubMed]

Dearnaley D, Syndikus I, Sumo G, et al., authors. Conventional versus hypofractionated high-dose intensity-modulated radiotherapy for prostate cancer: preliminary safety results from the CHHiP randomised controlled trial. Lancet Oncol. 2012;13:43–54. [Cross Ref] [PubMed]

Lee WR, Dignam JJ, Amin MB, et al., authors. Randomized phase III noninferiority study comparing two radiotherapy fractionation schedules in patients with low-risk prostate cancer. J Clin Oncol. 2016;34(20):2325–2332. [Cross Ref] [PubMed]

Höcht S, Aebersold DM, Albrecht C, et al., authors. Hypofractionated radiotherapy for localized prostate cancer. Strahlenther Onkol. 2017;193(1):1–12. [Cross Ref] [PubMed]

King C, author. Stereotactic body radiotherapy for prostate cancer: current results of a phase II trial. Front Radiat Ther Oncol. 2011;43:428–437. [Cross Ref] [PubMed]

King CR, Brooks JD, Gill H, et al., authors. Stereotactic body radiotherapy for localized prostate cancer: interim results of a prospective phase II clinical trial. Int J Radiat Oncol Biol Phys. 2009;73:1043–1048. [Cross Ref] [PubMed]

King CR, Brooks JD, Gill H, et al., authors. Long-term outcomes from a prospective trial of stereotactic body radiotherapy for low-risk prostate cancer. Int J Radiat Oncol Biol Phys. 2012;82:877–882. [Cross Ref] [PubMed]

Lee YH, Son SH, Yoon SC, et al., authors. Stereotactic body radiotherapy for prostate cancer: a preliminary report. Asia Pac J Clin Oncol. 2012;10(2):46–53. [Cross Ref]

Townsend NC, Huth BJ, Ding W, et al., authors. Acute toxicity after cyberknife-delivered hypofractionated radiotherapy for treatment of prostate cancer. Am J Clin Oncol. 2011;34:6–10. [Cross Ref] [PubMed]

McBride SM, Wong DS, Dombrowski JJ, et al., authors. Hypofractionated stereotactic body radiotherapy in low-risk prostate adenocarcinoma: preliminary results of a multi- institutional phase 1 feasibility trial. Cancer. 2012;118:3681–3690. [Cross Ref] [PubMed]

Oermann EK, Suy S, Hanscom HN, et al., authors. Low incidence of new biochemical and clinical hypogonadism following hypofractionated stereotactic body radiation therapy (SBRT) monotherapy for low- to intermediate-risk prostate cancer. J Hematol Oncol. 2011;4:12 [Cross Ref] [PubMed]

Hannoun-Levi JM, Benezery K, Bondiau PY, et al., authors. Robotic radiotherapy for prostate cancer with CyberKnife. Cancer Radiother. 2007;11:476–482. [Cross Ref] [PubMed]

Madsen BL, Hsi RA, Pham HT, et al., authors. Stereotactic hypofractionated accurate radiotherapy of the prostate (SHARP), 33.5 Gy in five fractions for localized disease: first clinical trial results. Int J Radiat Oncol Biol Phys. 2007;67:1099–1105. [Cross Ref] [PubMed]

Fuller DB, Naitoh J, Lee C, et al., authors. Virtual HDR CyberKnife treatment for localized prostatic carcinoma: dosimetry comparison with HDR brachytherapy and preliminary clinical observations. Int J Radiat Oncol Biol Phys. 2008;70:1588–1597. [Cross Ref] [PubMed]

Freeman DE, King CR, authors. Stereotactic body radiotherapy for low-risk prostate cancer: five-year outcomes. Radiat Oncol. 2011;6:3 [Cross Ref] [PubMed]

Katz AJ, author. CyberKnife radiosurgery for prostate cancer. Technol Cancer Res Treat. 2010;9(5):463–472. [Cross Ref] [PubMed]

Katz AJ, Santoro M, Ashley R, et al., authors. Stereotactic body radiation therapy for low- and low-intermediate-risk prostate cancer: is there a dose effect? Front Oncol. 2011;1:49 [Cross Ref] [PubMed]

Xie Y, Djajaputra D, King CR, et al. Intrafractional motion of the prostate during hypofractionated radiotherapy. Int J Radiat Oncol Biol Phys. 2008:236–46.

Lei S, Piel N, Oermann EK, et al., authors. Six-dimensional correction of intra-fractional prostate motion with CyberKnife stereotactic body radiation therapy. Front Oncol. 2011;1:48 [Cross Ref] [PubMed]

Marino C, Villaggi E, Maggi G, et al., authors. A feasibility dosimetric study on prostate cancer: are we ready for a multicenter clinical trial on SBRT? Strahlenther Onkol. 2015;191(7):573–481. [Cross Ref] [PubMed]

Rucinska M, Kieszkowska-Grudny A, Nawrocki S, authors. SHARP hypofractionated stereotactic radiotherapy is well tolerated in prostate cancer: toxicity and quality of life assessment. Strahlenther Onkol. 2016;192(7):449–457. [Cross Ref] [PubMed]

Rudat V, Nour A, Hammoud M, et al., authors. Image-guided intensity-modulated radiotherapy of prostate cancer: analysis of interfractional errors and acute toxicity. Strahlenther Onkol. 2016;192(2):109–117. [Cross Ref] [PubMed]

Hoffmans-Holtzer NA, Hoffmans D, Dahele M, et al., authors. Roll and pitch set-up errors during volumetric modulated arc delivery: can adapting gantry and collimator angles compensate? Strahlenther Onkol. 2015;191(3):272–280. [Cross Ref] [PubMed]

Widmark A, Gunnlaugsson A, Beckman L, et al., authors. Extreme Hypofractionation versus conventionally fractionated radiotherapy for intermediate risk prostate cancer: early toxicity results from the Scandinavian randomized phase III trial “HYPO-RT-PC”. Int J Radiat Oncol Biol Phys. 2016;96(5):938–939. [Cross Ref]

Timmerman RD, author. An overview of hypofractionation and introduction to this issue of seminars in radiation oncology. Semin Radiat Oncol. 2008;18(4):215–222. [Cross Ref] [PubMed]

Grimm J, LaCouture T, Croce R, et al., authors. Dose tolerance limits and dose volume histogram evaluation for stereotactic body radiotherapy. J Appl Clin Med Phys. 2011;12(2):3368 [Cross Ref] [PubMed]

Michalski JM, Gay H, Jackson A, et al., authors. Radiation dose-volume effects in radiation-induced rectal injury. Int J Radiat Oncol Biol Phys. 2010;76:123–129. [Cross Ref] [PubMed]

Viswanathan AN, Yorke ED, Marks LB, et al., authors. Radiation dose-volume effects of the urinary bladder. Int J Radiat Oncol Biol Phys. 2010;76:116–122. [Cross Ref] [PubMed]

Repka MC, Guleria S, Cyr RA, et al., authors. Acute urinary morbidity following stereotactic body radiation therapy for prostate cancer with prophylactic alpha-adrenergic antagonist and urethral dose reduction. Front Oncol. 2016;6:122 [Cross Ref] [PubMed]

[Back]

Table 1.

Dose limits for organs at risk relevant for prostate radiosurgery

Organ at risk
Dose limit

Rectum
Dmax < 38 Gy
V36Gy < 1 cm³ & < 5%
V29Gy < 15 cm³ & < 20%
V18Gy < 25 cm³ & < 50%

Bladder
Dmax < 38 Gy
V36Gy < 10 cm³ & < 10%
V18Gy < 40%

Urethra
Dmax < 44 Gy

Penile Bulb
V30Gy < 3 cm³ & < 50%

Femoral Heads
V30Gy < 10 cm³
V14,5Gy < 5%

Testicle
To be blocked for passing beams

Small Bowel
V30Gy < 1 cm³
V18Gy < 5 cm³

Neurovascular Bundle
V38Gy < 50%

Skin (5 mm)
Dmax < 30 Gy

D max = Maximum Dose, V xGy = Volume receiving X Gy or more

[Back]