Journal of Occupational Medicine and Toxicology (London, England)

J Occup Med Toxicol. 13: 34

Comparison between the musician-specific seating position of high string bow players and their habitual seating position – a video raster stereographic study of the dorsal upper body posture

Daniela Ohlendorf

ohlendorf@med.uni-frankfurt.de

¹, Jennifer Marx

jenny.marx@hotmail.de

¹, Kathrin Clasen

kathrin.mueller86@gmail.com

², Eileen M. Wanke

wanke@med.uni-frankfurt.de

¹, Stefan Kopp

kopp@med.uni-frankfurt.de

², David A. Groneberg

groneberg@med.uni-frankfurt.de

¹, Stefanie Uibel

uibel@med.uni-frankfurt.de

¹

1. 0000 0004 1936 9721grid.7839.5Institute of Occupational Medicine, Social Medicine and Environmental Medicine, Goethe-University Frankfurt/Main, Theodor-Stern-Kai 7, Building 9A, 60590 Frankfurt/Main, Germany

2. 0000 0004 1936 9721grid.7839.5School of Dentistry, Department of Orthodontics, Goethe University Frankfurt/Main, Theodor-Stern-Kai 7, Building 9A, 60590 Frankfurt am Main, Germany

© The Author(s). 2018

DOI: 10.1186/s12995-018-0217-6

Published online: 6 November 2018

Abstract

Background

Effects of playing high stringed bow instruments on the upper body posture have not been analysed so far. The instrument-specific seating position when playing in an orchestra is compared to the habitual seating position.

Methods

Three dimensional back scans were performed in 13 professional violinists and viola players of a radio orchestra (8 f / 5 m). Trunk position in their habitual seating position and in the instrument- specific seating position imitating playing was compared. Statistical differences were calculated using Wilcoxon Matched Pairs Test with Bonferroni Holm correction.

Results

Significant differences were found between the seated position with instrument and without (p < 0.001, 0.03, 0.02 or 0.01) in the spine (trunk length, sagittal trunk decline, lumbar bending angle, maximal rotation, standard deviation rotation, lumbar lordosis), the shoulder (scapula distance, scapula rotation, scapula angle right) and pelvis distance.

Conclusions

Playing an instrument changes the static seating position by increased rotation of the spine and specific shoulder adaptations holding the instrument (left arm) and the bow (right arm), with minor effects on the pelvis. This forced position may result in chronic health effects. The method used in this study is an approach to better understand the involved muscular structures and possible resulting health damages.

Background

Professional musicians frequently suffer from ailments due to forced postures demanded by a specific instrument. This has been shown as early as 1985 [1] and 1986 [2] in questionnaire-based surveys and is confirmed in a recent review [3]. Most importantly, the physical demands of playing a specific instrument facilitate musculoskeletal disorders, e.g. by asymmetrical and/or repetitive motions and forced postures [4]. Approximately 50% of professional musicians report these injuries [5, 6], with the highest incidence in high string bow players (viola and violin players) [7]. Künzel [8] reports that 70% of the movement apparatus problems are induced by the typical forced unfavourable playing posture combined with the restricted compensation possibilities.

These problems are especially pronounced in the cervical and lumbar spinal column and the upper extremities [5, 9] as shown in interview- and questionnaire-based studies. In string bow instrumentalists, during their training period, similar physical problems and intensive health impairments have been found in questionnaire studies, partly necessitating medical treatment [5, 10–15]. If not balanced by muscular activities the resulting posture deviations from the perpendicular line of the body may lead to malpostures and impaired playing ability [5]. These findings emphasize the importance of early preventive measures.

Early in the nineteenth century educational, physiotherapeutic, sports and musician interventions have been developed and implemented [5, 16, 17]. So far, their effectiveness in preventing or treating musician specific ailments has not been proven [5, 10]; modern techniques may be able to show effects of specific interventions for treatment and prevention.

For high string bow musicians, several publications deal with the effects of performing on the movement apparatus [18–23]. Video recordings or motion capture systems were used most often; they document instrument related movements [18–20, 24]. Kruta de Araújo et al. [21] used video detection of angular changes in body sections to record arm and head motions of playing violinists. Subsequent computer based evaluation was able to document posture differences. Due the camera position the video analysis is hampered by their two-dimensional recording planes (horizontal and vertical) [25]. Wasmer & Eickhoff [22] compared violinists in standing and seated playing position. In the playing motion while seated the upper trunk was more and the shoulder section less involved in the playing movements. Even the position of a violinist at the musical stand was important and resulted in different curvatures of the spinal column. Philipson et al. [26] used EMG to show higher activity in the M. deltoideus, M. biceps brachii and in the upper section of the M. trapezius in high bow instrumentalists reporting pain than those without pain. Levy et al. [27] compared violinists playing with or without shoulder support and found a reduced EMG activity in M. trapezius, M. sternocleidomastoideus and in the frontal part of M. deltoideus but without changes in M. biceps brachii. This is supported in an EMG-study of Berque & Gray [28] with an increased activity in the M. trapezius in pain free musicians, and by Wilkinson & Grimmer [29] quantifying tendon size by ultrasound.

No three-dimensional posture analysis of high string bow players has yet been published which included the differential analysis of all spinal sections as well as the shoulder and pelvis region. However, video raster stereography would allow this analysis. These data will allow the quantification of the strains on the musculoskeletal system and lead the therapy selection. In the present study the upper trunk position of high bow players is measured in their natural position, i.e. seated without an instrument, and compared to their typical playing seated position with their instrument. Using this approach, we will show and quantify the differences in posture within the shoulder, spine, and pelvis parameters.

Material and methods

Subjects

All 13 (8 w / 5 m) professional musicians playing bow instruments (violin / viola) of the “HR 3” radio orchestra in Frankfurt/Main (Germany) participated in this study. The mean age was 43.6 ± 9.9 years (range 32 to 59 years) and they have been playing their instrument for 36.9 ± 9.1 years, 6.12 days per week up to 4.19 h per day. All musicians were right–handed.

Exclusion criteria were acute trauma lesions, e.g. fractures, herniated discs and torn ligaments, surgery within the last six months, analgesics or muscle relaxant medication, genetic muscular or neurological diseases. All participants gave written informed consent to participate in this study, which was approved by the ethics committee of the Medical Faculty of the Goethe-University (Nr. 305/12), in accordance with the 1964 Helsinki Declaration and its later amendments. Furthermore, the individual of Figs. 1 and 2 in this manuscript has given written informed consent to publish these pictures.

Fig. 1View larger versionFig. 1. Location of the 6 marker

Fig. 2View larger versionFig. 2. Group 1: Showing comparative positions 1 / 2

Measurement system

The back scanner “ABW-BodyMapper” (ABW GmbH; Frickenhausen / Germany) scanned the upper body posture by video raster stereography (Fig. 1) with 30 frames per second in the standard mode and a maximum of 50 frames per second. The camera resolution was 640–480 pixel over an area of 640 × 400 mm; depth resolution of the resulting image was 1 / 100 mm, lateral resolution < 1 mm as specified by the manufacturer. In repeated measurements using skin markers for reference positions the localization of a given point was accurate by an error margin of < 0.5 mm.

A sensitivity of 98%, a specificity of 84% and 13.9% false-positive values were published for the video raster stereographic survey [30]. Furthermore, raster stereography and radiological angle values presented excellent correlation according to Drerup (correlation coefficient 0.8 to 0.93; Drerup [31, 32]). Six self-adhesive markers were used to indicate anatomical landmarks as shown in Fig. 1. Drerup et al. [33] found this technique to be reliable with an intraindividual variation of 1 mm for the lumbar spine dimple.

This measurement system has been used in several studies [34–38]. It is a fast non-contact method to quantify body posture and it is suitable for measuring pathological postures like scoliosis, kyphosis or leg length discrepancies.

Evaluation parameter

All parameters derived from the marker positions are listed in Table 1.

See full tableTable 1. List and description of back scan parameters

Investigation protocol

All participants were seated on a regular musician chair and the upper body posture was measured with and without instrument in a randomized order. For measurements in the position without instrument, the markers were fixed on the bare back, and the participants took their preferred position (height, habitus, looking forward and hanging arms) with bared trunk. For measurements with their instrument the participants sat on their chair and played a medium pitch tone in the anticipated loudness “forte” with the middle of the bow. The left hand is placed on the 1st position of the fingerboard. They looked directly at the music stand, which is marked on the wall in front of them (Fig. 2). The posture was scanned for each position for 2 s, 3 scans were taken within 2 min and the parameters were calculated from the average of these data sets. In between the measurements the participants were allowed to relax for at least 2 min, all measurements including preparations lasted no longer than 15 min.

Statistical evaluation

Statistical calculations were performed using the software BiAS 10.03 (Epsilon-Verlag, Darmstadt, Germany). Normal data distribution was tested by Kolmogoroff Smirnoff Lilliefors test. As the data sets were not normally distributed the Wilcoxon-Matched Pairs Test including a Bonferroni-Holm correction was used to test for significance. Significance is assumed at a difference level of 5%; significant differences are gives as: * = p < 0.05; ** = p < 0.01; *** = p < 0.001.

Results

Posture differences in the upper body were quantified by comparing the parameters (Table 1), the results are presented in Table 2. The trunk length D is reduced from position 1 to position 2 with a mean of 497.65 ± 27.85 mm to 490.30 ± 25.22 mm (p < 0.001) in the sagittal plane. Concurrently, the trunk length S decreases (position 1: 551.29 ± 30.64 mm; position 2: 542.80 ± 28.24 mm; p ≤ 0.001). Sagittal trunk decline is characterized by a reduction from position 1 (− 7.67 ± 2.16°) to position 2 (− 3.73 ± 2.51°, p < 0.001), indicating a lower degree of leaning ventrally of the trunk. The lumbar lordosis increases as seen by the increasing lumbar bending angle from position 1 (6.29 ± 3.83°) to position 2 (8.53° ± 3.83°, p < 0.03). Holding the instrument results in an increased spinal rotation to the right; this is seen in the standard deviation rotation and maximal rotation from position 1 (SDR 4.25 ± 2.25°, MR 3.10 ± 7.47°) to position 2 (SDR 7.17 ± 4.84°, MR 12.42 ± 14.16°), with p < 0.001 for SDR and p < 0.01 for MR.

See full tableTable 2. Mean values (MV) and standard deviations (SD) of the all parameters with respect to position 1 and 2 as well as the calculated p-values of the Wilcoxon-Matched-Pairs-Test

For the pelvis position a significant change has been found for the pelvis distance, which decreases from 92.46 ± 7.14 mm (position 1) to 91.32 ± 7.48 mm (position 2, p < 0.02) indicating an “inflare” motion of the os ilium.

As consequence, shoulder parameters were also effected by holding an instrument. The scapula distance increases from 165.81 mm ± 22.48 mm to 176.98 mm ± 20.62 mm (p < 0.001) due to abduced scapulae. The scapula rotation increased as well in position 2 from 2.87 ± 3.18° to 5.76 ± 5.82°, positioning the right angulus inferior scapulae further dorsally than the left one (p < 0.02) as caused by a left backward shoulder inclination and rotation). The right scapula angle decreased from 34.04 ± 9.99° to 27.07 ± 5.51° (p < 0.001), the positive values indicates a lower right shoulder while playing the instrument. In conclusion, differences in shoulder, spine and pelvis posture are detectable after adjusting to the instrument. All significances are shown graphically in Fig. 3.

Fig. 3View larger versionFig. 3. Upper body posture in high string bow instrument players. Legend: a trunk length S/D; b sagittal trunk decline; c lumbal bending angle; d standard deviation of the rotation/maximal rotation; e pelvis distance; f scapula distance; g scapula rotation; scapula angle right; for definition of the parameters see Table 1. Summarizes the significant differences induced when playing the instrument

Discussion

The results show that playing a violin or viola induces major changes in the upper body posture. In order to quantify these changes, we compared the upper posture while playing with the participant’s habitual upper body posture, which has been chosen as the baseline position.

Playing the instrument increases spinal extension (TLD, TLS, STL), reduces the truncal inclination by spinal flexion (STL), increases lumbar lordosis (LBA) and rotated the upper body to the right (SR).

Habitual seating occurs spontaneously and results in an extension of the pelvis in the iliosacral joints with a corresponding decrease in lumbar lordosis [39]. This position centers the pelvis between the most anterior and the most posterior possible pelvis positions. Although it ideally distributes the static load it is difficult to sustain. However, this position is similar to the seated body position when playing a violin [39, 40].

Holding the instrument with the chin and positioning the left arm under the instrument causes a right sided dorsal upper body rotation. This rotation is increased by the requirement of looking at the centrally placed music stand in our setup, with the head rotated to the left to gaze at the imaginary music stand. This posture also changes the shoulder area as characterized by an abduced scapula (SD), a dorsal right shoulder (SR) and a lowered right shoulder with a cranially positioned scapula (SAR). This necessitates unfamiliar tonicity, especially for the right side and affects the M. levator scapulae and M. trapezius.

The changes in the shoulder area are caused by holding the instrument itself and the bow while playing. The shoulder of the instrument arm (left side) is held with the shoulder flexed, abduced, and externally rotated (Fig. 2).

In the pelvis area only the distance of the upper posterior iliacal crest markers is decreased and causes an “inflare” motion of the os ilium. If this also affects the tonicity it would impair the M. quadratus lumborum.

This study shows specific changes in the posture of violinists and viola players. They affect various sections of the upper body including the shoulder, pelvis and spine. Major alterations were observed in the spinal rotation and shoulder position and rotation with smaller effects in the spine length and pelvic distance verifying the working hypothesis. These changes can be explained by the specific demands of violin and viola playing. Corresponding findings were reported by Fishbein [2] and Kok [3]. Since the instrument-specific posture has to be held for many hours every day over many years they may result in chronic health effects.

In further studies, musicians of different playing levels could be differentiated with regard to playing related musculoskeletal disorder [41]. Here, however, the difficulty must be taken into account that professional musicians in particular are scheduled for rehearsals and concerts in such a way that participation in a scientific investigation is not top priority.

Since the physical constitution of the musicians cannot be changed and the postural demands cannot be altered it is advisable to optimize health prevention like as has already been done with exposure factors of farmers or fishermen [42–44]. One possibility would be to use the Cornell Musculoskeletal Discomfort Questionnaire to get a better insight of MSD [45].

Conclusion

Professional musicians often complain about musculoskeletal problems from playing their instrument already early in their professional training [5, 10–15]. The method presented in this study illustrates the magnitude of the muscular changed in string bow players while playing their instrument. While playing the instrument spinal extension (TLD, TLS, STL) increases, the truncal inclination is reduced by spinal flexion (STL), lumbar lordosis (LBA) is increased and the upper body is rotated to the right (SR). Therefore, this information can be used to support physiotherapeutic treatment and to adjust prevention and/or rehabilitation. Due to the muscular changes that can be detected with this method, it should be discussed in the future whether a physical therapy should be a MUST HAVE for a professional orchestra in the future.

Abbreviation

EMG

Elektromyography

Acknowledgements

Not applicable

Funding

There is no funding.

Availability of data and materials

The dataset supporting the conclusions of this article is included within the article.

Authors’ contributions

DO, JM, KC, EMW, SK, DAG and SU made substantial contributions to the conception and design of the manuscript, DO, JM and SU made substantial contributions to the construction of the measurement protocol and DO and JM has been involved in the statistical data analysis. All authors have read and approved the final manuscript.

Notes

Ethics approval and consent to participate

This study was approved by the ethics board for research involving human subjects of the Goethe University (305/12) in Frankfurt am Main, Germany. All participants will sign an informed consent to take part in the study in advance.

Consent for publication

Not applicable

Competing interests

The authors declare that they have no competing interests.

Publisher’s Note

Springer Nature remains neutral with regard to jurisdictional claims in published maps and institutional affiliations.

Articles from Journal of Occupational Medicine and Toxicology (London, England) are provided here courtesy of BioMed Central

PMC Copyright Notice

The articles available from the PMC site are protected by copyright, even though access is free. Copyright is held by the respective authors or publishers who provide these articles to PMC. Users of PMC are responsible for complying with the terms and conditions defined by the copyright holder.

Users should assume that standard copyright protection applies to articles in PMC, unless an article contains an explicit license statement that gives a user additional reuse or redistribution rights. PMC does not allow automated/bulk downloading of articles that have standard copyright protection.

See the copyright notice on the PMC site, https://www.ncbi.nlm.nih.gov/pmc/about/copyright/, for further details and specific exceptions.

References

Schmale H, Schmidtke H, authors. Der Orchestermusiker: seine Arbeit u. seine Belastung: eine empirische Untersuchung. 1985. Mainz [u.a.]: Schott;

Fishbein M, Middlestadt SE, Ottati V, Straus S, Ellis A, authors. Medical problems among ICSOM musicians: overview of a national survey. Med Probl Perform Art. 1988;3(1):1–8

Kok Laura M.; Huisstede Bionka M. A.; Voorn Veronique M. A.; Schoones Jan W.; Nelissen Rob G. H. H., authors. The occurrence of musculoskeletal complaints among professional musicians: a systematic review. International Archives of Occupational and Environmental Health. 2015;89(3):373–396. [CrossRef] [PubMed]

Lee HS, Park HY, Yoon JO, Kim JS, Chun JM, Aminata IW, Cho WJ, Jeon IH, authors. Musicians’ medicine: musculoskeletal problems in string players. Clinics in orthopedic surgery. 2013;5(3):155–160. [CrossRef] [PubMed]

Spahn C, Blum J, authors. MusikerMedizin: Diagnostik, Therapie und Prävention von musikerspezifischen Erkrankungen. 2011. Stuttgart: Schattauer Verlag;

Zaza C, author. Playing-related musculoskeletal disorders in musicians: a systematic review of incidence and prevalence. CMAJ. 1998;158(8):1019–1025. [PubMed]

Davies J, Mangion S, authors. Predictors of pain and other musculoskeletal symptoms among professional instrumental musicians: elucidating specific effects. Med Probl Perform Art. 2002;17(4):155–168

Künzel E, author. Die Anatomie des Geigenspiels: Der Weg zur Überwindung der Geigerschäden. 2002. Schneider Verlag: Tutzing;

Blum J, author. Das Orchester als Ort körperlicher und seelischer Harmonie? Eine Erhebung unter bundesdeutschen Streichern. Das Orchester. 1995;4:23–29

Zander MF, author. Musiker zwischen Gesundheit und Krankheit: Evaluation des Freiburger Präventionsmodells. Freiburger Beiträge zur Musikermedizin. edn. Bochum [u.a.]: Projektverlag. 2006. p. 1–235

Pratt RR, Jessop SG, Niemann BK, authors. Performance related disorders among music majors at Brigham Young university. Int J Arts Med. 1992;1:7–20

Roach KE, Martinez MA, Anderson N, authors. Musculoskeletal pain in student instrumentalists: a comparison with the general student population. Med Probl Perform Art. 1994;9(4):125–130

Spahn C, Richter B, Zschoke I, authors. Health attitudes, preventive behavior, and playing-related health problems among music students. Med Probl Perform Art. 2002;17(1):22–28

Cayea D, Manchester RA, authors. Instrument-specific rates of upper-extremity injuries in music students. Med Probl Perform Art. 1998;13(1):19–25

Larsson LG, Baum J, Mudholkar GS, authors. Nature and impact of musculoskeletal problems in a population of musicians. Med Probl Perform Art. 1993;8(3):73–76

Zaza C, author. Research-based prevention for musicians. Med Probl Perform Art. 1994;9(1):3–6

van de Klashorst GO, author. The disposition of the musician. 2002. Amsterdam: Broekmans & van Poppel;

Tulchinsky E, Riolo L, authors. A biomechanical motion analysis of the violinist’s bow arm. Med Probl Perform Art. 1994;9(4):125–130

Shan G, Visentin P, authors. A quantitative three-dimensional analysis of arm kinematics in violin performance. Med Probl Perform Art. 2003;18(1):3–10

Yagisan N, Karabork H, Goktepe A, Karalezli N, authors. Evalution of three-dimensional motion analysis of the upper right limb movements in the bowing arm of violinists through a digital photogrammetric method. Med Probl Perform Art. 2009;24(4):181–184

Kruta de Araújo NC, Gatto Gárdia MC, Soares Másculo F, Gomes Lucena NM, authors. Analysis of the frequency of postural flaws during violin performance. Med Probl Perform Art. 2009;24(3):108–112

Wasmer C, Eickhoff F, authors. Vergleichende Untersuchungen zur Spielbewegung bei Geigern. Freiburger Beiträge zur Musikermedizin edn. 2011. Bochum: Projekt Verlag; p. 1–123

Turner-Stokes L, Reid K, authors. Three-dimensional motion analysis of upper limb movement in the bowing arm of string-playing musicians. Clinical biomechanics (Bristol, Avon). 1999;14(6):426–433. [CrossRef]

Verrel J, Woollacott M, Lindenberger U, authors. Articulated coordination of the right arm underlies control of bow parameters and quick bow reversals in skilled cello bowing. Front Psychol. 2014;5:885 [CrossRef] [PubMed]

Buckley T, Manchester R, authors. Overuse injuries in non-classical recreational instrumentalists. Med Probl Perform Art. 2006;21(2):80–87

Philipson L, Sorbye R, Larsson P, Kaladjev S, authors. Muscular load levels in performing musicians as monitored by quantitative electromyography. Med Probl Perform Art. 1990;5(2):79–82

Levy CE, Lee WA, Brandfonbrener AG, Press J, Levy AE, authors. Electromyographic analysis of muscular activity in the upper extremity generated by supporting a violin with and without a shoulder rest. Med Probl Perform Art. 1992;7(4):103–109

Berque P, Gray H, authors. The influence of neck-shoulder pain on trapezius muscle activity among professional violin and viola players. Med Probl Perform Art. 2002;17(2):68–75

Wilkinson M, Grimmer K, authors. Ultrasound of the left shoulder girdle in professional violists and violinists. Med Probl Perform Art. 2001;2(16):58–65

Asamoah V, Mellerowicz H, Venus J, Klockner C, authors. Measuring the surface of the back. Value in diagnosis of spinal diseases. Der Orthopade. 2000;29(6):480–489. [CrossRef] [PubMed]

Drerup B, author. Improvements in measuring vertebral rotation from the projections of the pedicles. J Biomech. 1985;18(5):369–378. [CrossRef] [PubMed]

Drerup B, Hierholzer E, authors. Objective determination of anatomical landmarks on the body surface: measurement of the vertebra prominens from surface curvature. J Biomech. 1985;18(6):467–474. [CrossRef] [PubMed]

Drerup B, Hierholzer E, authors. Automatic localization of anatomical landmarks on the back surface and construction of a body-fixed coordinate system. J Biomech. 1987;20(10):961–970. [CrossRef] [PubMed]

Marini I, Alessandri Bonetti G, Bortolotti F, Bartolucci ML, Gatto MR, Michelotti A, authors. Effects of experimental insoles on body posture, mandibular kinematics and masticatory muscles activity. A pilot study in healthy volunteers. J Electromyogr Kinesiol : official journal of the International Society of Electrophysiological Kinesiology. 2015;25(3):531–539. [CrossRef]

Marini I, Gatto MR, Bartolucci ML, Bortolotti F, Alessandri Bonetti G, Michelotti A, authors. Effects of experimental occlusal interference on body posture: an optoelectronic stereophotogrammetric analysis. J Oral Rehabil. 2013;40(7):509–518. [CrossRef] [PubMed]

Ohlendorf D, Himmelreich M, Mickel C, Groneberg DA, Kopp S, authors. Does a temporary leg length discrepancy have an influence on upper body posture and lower jaw position in competitive athletes? Sportverletz Sportschaden : Organ der Gesellschaft fur Orthopadisch-Traumatologische Sportmedizin. 2015;29(3):157–163. [CrossRef]

Ohlendorf D, Turbanski S, Kopp S, Piwowarczyk A, authors. Effects of a temporary asymmetrical occlusion block on upper body posture. J Craniomand Func. 2011;3(4):293–308

Ohlendorf D, Lehmann C, Heil D, Horzer S, Kopp S, authors. The impact of a total hip replacement on jaw position, upper body posture and body sway. Cranio : the journal of craniomandibular practice. 2015;33(2):107–114. [CrossRef] [PubMed]

Suppé B, author. FBL Klein-Vogelbach Functional Kinetics: Die Grundlagen: Bewegungsanalyse, Untersuchung, Behandlung, vol. 6. Auflage. 2007. Heidelberg: Springer Verlag;

Szende O, author. Handbuch des Geigenunterrichts. 1990. Düsseldorf: Sandvoß, F.K.;

Ohlendorf D, Wanke EM, Filmann N, Groneberg DA, Gerber A, authors. Fit to play: posture and seating position analysis with professional musicians - a study protocol. J Occup Med Toxicol (London, England). 2017;12:5 [CrossRef]

Berg-Beckhoff G, Ostergaard H, Jepsen JR, authors. Prevalence and predictors of musculoskeletal pain among Danish fishermen - results from a cross-sectional survey. J Occup Med Toxicol (London, England). 2016;11:51 [CrossRef]

Bhattarai D, Singh SB, Baral D, Sah RB, Budhathoki SS, Pokharel PK, authors. Work-related injuries among farmers: a cross-sectional study from rural Nepal. J Occup Med Toxicol (London, England). 2016;11:48 [CrossRef]

Girbig M, Freiberg A, Deckert S, Druschke D, Kopkow C, Nienhaus A, Seidler A, authors. Work-related exposures and disorders among physical therapists: experiences and beliefs of professional representatives assessed using a qualitative approach. J Occup Med and Toxicol (London, England). 2017;12:2 [CrossRef]

Kreuzfeld S, Seibt R, Kumar M, Rieger A, Stoll R, authors. German version of the Cornell musculoskeletal discomfort questionnaire (CMDQ): translation and validation. J Occup Med Toxicol (London, England). 2016;11:13 [CrossRef]

[Back]

Fig. 1.

Location of the 6 marker

[Back]

[Back]

Fig. 2.

Group 1: Showing comparative positions 1 / 2

[Back]

[Back]

Table 1.

List and description of back scan parameters

Spine parameter

 Trunk length D (TLD) (mm)
Spatial distance between the markers VP and DM

 Trunk length S (TLS) (mm)
Spatial distance between the markers VP and SP

 Sagittal trunk decline (STD) (°)
Inclination of the trunk length D marked line from the perpendicular to the sagittal plane.
Tilt ventrally (negative values) = flexion
Tilt dorsally (positive values) = extension

 Frontal trunk decline (FTD) (°)
Inclination of the trunk length D marked line from the perpendicular to the frontal plane.
Tilt anteriorly (negative values) = possible lordosis
Tilt dorsally (positive values) = possible kyphosis

 Axis decline (AD) (°)
Deviation of the line of the area marked by the trunk length D line of the 90° rotated distance DL-DR
➔decline between upper body and pelvis

 Thoracic bending angle (TBA) (°)
Deviation of the distance VP - KA from the perpendicular

 Lumbar bending angle (LBA) (°)
Deviation of the distance KA - LA from the perpendicular

 Standard deviation lateral deviation (SDLD) (mm)
Root mean squared deviation of the median line of the distance VP - DM

 Maximal lateral deviation (MLD) (mm)
Maximum deviation of the median line of the distance VP - DM
Negative values = deviation to the left
Positive values = deviation to the right

 Standard deviation rotation (SDR) (°)
Root mean square deviation of surface rotation of the median line (torsion of the spinous processes of the spine)

 Maximal rotation (MR) (°)
Maximum positive or negative surface rotation on the median line

 Kyphosis angle (KA) (°)
In the sagittal plane measured angle between the upper inflection point of the spine at the thoracolumbar and VP inflection point IP; point of greatest negative surface decline

 Lordosis angle (LA) (°)
Angle between the inflection point at DM and the thoracolumbar inflection point IP

Pelvis parameter

 Pelvis distance (PD) (mm)
Spatial distance between SIPS L and SIPS R.

 Pelvis height (PH) (°)
Decline of the connecting line between SIPS L and SIPS R to the horizontal in the frontal plane in degrees

 Pelvis height (mm)
Decline of the connecting line between SIPS L and SIPS R to the horizontal in the frontal plane in millimeter

 Pelvis torsion (°)
Angle between the surface normal on the two dimples SIPS L and SIPS R
Negative differential angle = Normal at point SIPS L is stronger upward as at point SIPS R
Positive difference angle = Normal at point SIPS L is stronger downward as at point SIPS R.

 Pelvis rotation (°)
Rotation of the distance SIPS L – SIPS R in the transversal plane

Shoulder parameter

 Scapular distance (SDI) (mm)
Distance between the left (AISL) and the lower right scapular angle (AISR).

 Scapular height (SH) (°)
Height difference between the points AISL and AISR
Positive value = AISR higher than AISL
Negative value = AISR deeper than AISL

 Scapular rotation (SR) (°)
Rotation of the distance DL-DR in the transversal plane

 Scapular angle left (SAL) (°) / Scapula angle right (SAR) (°)
Best fit straight line on the shoulders to the horizontal. The center point of the regression line is set vertically above AISL / AISR. The greater the angle, the more caudally located the shoulder.

[Back]

[Back]

Table 2.

Mean values (MV) and standard deviations (SD) of the all parameters with respect to position 1 and 2 as well as the calculated p-values of the Wilcoxon-Matched-Pairs-Test

Spinal parameters | Position 1 | Position 2 | p-value
 Spinal parameters | MV | SD | MV | SD | p-value
 Trunk length D (mm) | 497.65 | 27.85 | 490.30 | 25.22 | 0.001***
 Trunk length S (mm) | 551.29 | 30.64 | 542.80 | 28.24 | 0.001***
 Sagittal trunk decline (°) | −7.67 | 2.16 | −3.73 | 2.51 | 0.001***
 Frontal trunk decline (°) | 0.53 | 1.03 | 1.34 | 1.99 | 0.13
 Axis decline (°) | 1.21 | 2.47 | 2.16 | 2.59 | 0.09
 Thoracic bending angle (°) | 13.53 | 4.42 | 14.14 | 3.33 | 0.45
 Lumbar bending angle (°) | 6.29 | 3.83 | 8.53 | 3.83 | 0.03*
 Standard lateral deviation (mm) | 3.45 | 2.37 | 4.06 | 3.31 | 0.64
 Maximal lateral deviation (mm) | −3.24 | 6.31 | −0.81 | 9.27 | 0.20
 Standard deviation rotation (°) | 4.25 | 2.25 | 7.17 | 4.84 | 0.001***
 Maximal rotation (°) | 3.10 | 7.47 | 12.42 | 14.16 | 0.01**
 Kyphosis angle (°) | 48.28 | 12.84 | 44.58 | 13.73 | 0.76
 Lordosis angle (°) | 32.89 | 24.58 | 24.79 | 11.10 | 1.00
Pelvis parameters
 Pelvis distance (mm) | 92.46 | 7.14 | 91.32 | 7.48 | 0.02*
 Pelvis height (°) | 0.90 | 2.73 | 0.91 | 2.11 | 0.62
 Pelvis height_2 (mm) | 1.36 | 4.38 | 1.46 | 3.43 | 0.97
 Pelvis torsion (°) | −0.08 | 2.23 | 0.81 | 3.77 | 0.42
 Pelvis rotation (°) | 0.87 | 3.51 | 2.41 | 5.63 | 0.31
Shoulder parameters
 Scapula distance (mm) | 165.81 | 22.48 | 176.98 | 20.62 | 0.001***
 Scapula height (mm) | 0.26 | 8.35 | −3.98 | 11.05 | 0.09
 Scapula rotation (°) | 2.87 | 3.18 | 5.76 | 5.82 | 0.02*
 Scapula angle left (°) | 29.05 | 5.55 | 40.55 | 19.16 | 0.13
 Scapula angle right (°) | 34,04 | 9,99 | 27,07 | 5,51 | 0.001***

Legend: * = p < 0.05; ** = p < 0.01; *** = p < 0.001

[Back]

[Back]

Fig. 3.

Upper body posture in high string bow instrument players. Legend: a trunk length S/D; b sagittal trunk decline; c lumbal bending angle; d standard deviation of the rotation/maximal rotation; e pelvis distance; f scapula distance; g scapula rotation; scapula angle right; for definition of the parameters see Table 1. Summarizes the significant differences induced when playing the instrument

[Back]