The Open Respiratory Medicine Journal

Open Respir Med J. 12: 81-82

Validation of a Clinical Instrument for Measuring the Severity of Acute Bronchitis in Children – The BSS-ped

Siegfried Lehrl¹, Peter Kardos², Heinrich Matthys³, Wolfgang Kamin⁴

1. Department of Psychiatry and Psychotherapy, Friedrich-Alexander University Erlangen-Nuremberg, Erlangen, Germany

2. Group Practice and Centre for Pneumology, Center for Respiratory, Allergy and Sleep Medicine at Red Cross Maingau Hospital, Frankfurt am Main, Germany

3. Department of Pneumology, University Hospital Freiburg, Freiburg, Germany

4. Clinic for Paediatrics, Evangelic Hospital Hamm, Hamm, Germany

© 2018 Lehrl et al.

DOI: 10.2174/1874306401812010081

Published online: 19 December 2018

Validation of a Clinical Instrument for Measuring the Severity of Acute Bronchitis in Children – The BSS-ped

The Open Respiratory Medicine Journal, 2018, 12: 50-60

Figure 2 has been revised as follows:

The original Figure 2 provided was:

A foot note has been added in Table 2 as follows:

° pulmonary rales at auscultation

Articles from The Open Respiratory Medicine Journal are provided here courtesy of Bentham Science Publishers

PMC Copyright Notice

The articles available from the PMC site are protected by copyright, even though access is free. Copyright is held by the respective authors or publishers who provide these articles to PMC. Users of PMC are responsible for complying with the terms and conditions defined by the copyright holder.

Users should assume that standard copyright protection applies to articles in PMC, unless an article contains an explicit license statement that gives a user additional reuse or redistribution rights. PMC does not allow automated/bulk downloading of articles that have standard copyright protection.

See the copyright notice on the PMC site, https://www.ncbi.nlm.nih.gov/pmc/about/copyright/, for further details and specific exceptions.